en	Sloth

en	Tortoise

en	Snail

en	Firing Mech of the

en	The

en	Unable to locate Hopper

en	Unable to locate Freezon Gas in hopper

en	Storing Freezon, ready to inject!

en	No Freezon-compatible machine located

en	Attempting to drop

en	into hopper!

en	onto conveyor or into hopper!

en	into specific drop-off!

en	Crafted

en	Failed to insert

en	into storage hopper?

en	No Valid attached Hoppers!

en	Looking in attached hopper for:

en	Total of

en	items needed

en	No input conveyor found!

en	Lacking ingredient on input conveyor!

en	of

en	Cannot locate

en	Landing

en	Intersect

en	Configuring Pipe alignment

en	s of Freezon boost left!

en	Place Storage Hopper with Freezon Canister in for 20x PPS boost!

en	Placing and verifying pipes.

en	Pipe drill stuck on hard obstacle. Please remove.

en	Can't locate pipes in adjacent Storage Hopper!

en	Optimal temperature differential reached!

en	Freezon Gas required for full performance!

en	Temperature differential: {0}°C

en	Rush mode active - boost on!

en	Guides

en	No contextual help available at the current time.

en	Materials

en	Ores

en	Crafting Ingredients

en	Machines

en	Suit Upgrades

en	ARTHER Upgrades

en	Machine Upgrades

en	Available Projects

en	Completed Research

en	No projects completed yet. Visit the research station.

en	The helpfile for this has not yet been implemented, sorry!

en	The Player does not know this material

en	Laboratory recipe

en	Requirements

en	Unlocked Recipes

en	Costs an additional

en	RP to research.

en	No specific help available, due to unimplemented help file. Please check the next page for hints and crafting!

en	This material is hidden

en	The player does not know this material

en	This material is paintable with the paint gun

en	This material does not block movement

en	This material can be burned for power in the Central Power Hub or Pyrothermic Generator

en	recipe

en	Costs

en	This recipe creates

en	Hint

en	Title

en	Survival Handbook

en	Creative Handbook

en	Reference

en	Research

en	Materials Reference

en	Eligible Research

en	Complete Research

en	The FortressCraft world extends over 1,000 light-years in every direction

en	Press J to toggle the Player Stats screen on

en	SuperBuild allows you to make massive alterations to the world - try it!

en	Schematics allows to you easily duplicate your creations

en	WSAD to move and Space to jump. LMB to build, RMB to dig, MMB to pick

en	The Xbox version of FortressCraft sold over 1 million units

en	Follow @Fortress_Craft for the latest news and updates to FortressCraft!

en	A complete world would take over 2x10^79 bytes to save

en	Press T to begin exploring

en	SuperBuild lets you create massive simple structures quickly. F10 to exit

en	Schematics lets you easily duplicate your creations. F11 to exit

en	Hivemind killed! Score was

en	It's looking at you.

en	Holobase V1.337 Active!

en	Press U to enable Map Mode

en	Press U to enable Base Mode

en	Press Left-Ctrl to enable Tactical Mode

en	Press Left-Ctrl to disable Tactical Mode

en	Press K to exit HoloBase

en	Currently

en	players in game and using up

en	network slots

en	Bars

en	Bar

en	Total Power

en	Power/Sec

en	Total Time

en	ore/min

en	bars/min

en	Total

en	Average

en	Strength increases melee damage

en	Constitution increases health

en	Agility increases armor

en	Intelligence increases mana

en	Damage adds to the amount of damage done in combat

en	Crit increases the chance of landing a critical strike

en	Armor protects from damage

en	Health prolongs life

en	Mana increases the number of spells that can be cast

en	Item Injector

en	Unable to locate items in hopper

en	Last Item

en	ready to inject!

en	Offloading at Distance

en	You need to be within 5m! Current Distance

en	Switch Mode

en	RP

en	Collect

en	Current

en	Collect Research

en	All projects researched!

en	Start Project

en	Possible Projects

en	Consult the research station for details

en	Analyse

en	Experiment

en	I just started the

en	Project

en	Collected research for an additional

en	I just collected the

en	Wait for full Battery

en	Fire constantly

en	Light is configured optimally

en	Shadows can be slow

en	Soft Shadows are very slow - uses sparingly

en	Warning, large light sizes can have adverse performance

en	Loading

en	Collected Rubble! Use Left-Ctrl to SuperDig Ores.

en	Collected

en	Died from repeated impacts!

en	Unable to exit AFK mode - we're editing text!

en	Releasing from AFK mode back to normal game!

en	Security Warning

en	Mod {0} contains third-party code which could be unsafe. Neither ProjectorGames nor Digital Tribe accept any responsibilty for any losses suffered from running third party code. You will not be asked again for this mod.

en	Cancel

en	Okay

en	Loading

en	Entering

en	Connection timed out

en	Recieved bad data from server. Version mismatch?

en	Not currently in control of a mass storage array

en	Scan me for more information

en	Storage Used

en	Mass Storage Crate

en	Center Block

en	Stored

en	Removed

en	Connected to DELETED BLOCK

en	Error, Centre is null!

en	Solo Storage; Connect more crates!

en	Total Storage

en	(E) Stack Height

en	Crate has no centre!

en	Crate has no connected crates!

en	or

en	Stack

en	Stack Size

en	Crates

en	Empty

en	item

en	Warning! Mass Storage exceeds 100 crates. Consider multiple, smaller storages.

en	Warning! Mass Storage size is critical, and is likely to suffer performance issues!

en	Transfers a stack of up to

en	items into storage

en	per minute

en	Utilisation

en	No storage attached

en	Idle

en	Receiving items

en	Searching for storage space

en	Sending Drone

en	Retrieving Drone

en	Mass Storage Matter-Mover I/O Port

en	Unable to locate attached Mass Storage Plate

en	No Centre Crate found

en	No Mass Storage Controller found!

en	Controller Power

en	Currently outputting

en	Select an item in your Hotbar to use as an Exemplar

en	Press T to clear Output Port

en	Press T to set Output to

en	Dropping off

en	Choose output

en	Trencher Drill

en	No Ore Found

en	Clearing

en	Scanning

en	Idling

en	PRESS H!

en	Vein Cleared!

en	Drill state

en	Ore stored

en	Drill utilisation

en	per haul

en	No ore found for drilling

en	Out of Power. Restarting at

en	stored power

en	Unconnected Trencher Motor

en	Orbital Bombardment requested at Quadrant {0}

en	Quadrant

en	has been cleared!

en	Quadrant {0} has been cleared!

en	Orbital Bombardment has begun!

en	This

en	server-side mod is running

en	This {0} server-side mod is running

en	mod is required on this server

en	This {0} mod is required on this server

en	Install

en	mod at version

en	to connect

en	Install {0} mod at version: {1} to connect

en	mod is optional on this server

en	This {0} mod is optional on this server

en	mod cannot be run on this server

en	This {0} mod can not be run on this server

en	Locked to version

en	Locked to version {0}

en	This mod contains third-party code which could be unsafe. Neither ProjectorGames nor Digital Tribe accept any responsibilty for any losses suffered from running third party code.You will not be asked again for this mod.

en	Enable

en	Disable

en	Enter steam display name here

en	Tutorial not complete!

en	You need to complete the tutorial before hosting a multiplayer game.

en	Good plan!

en	Mutators are permanent and can no longer be changed for this world.

en	Choose your Mutators, Choose your DOOM!

en	CREATIVE selected! The results of running Mutators can be unpredictable!

en	This screen is a preview of the forthcoming Mutator options, available as part of the Adventures Pack DLC! Cool isn't it? You can't play with any of it yet, but I AM still accepting ideas on new ones!

en	The ResinPocalypse is upon us

en	Life will now be relatively resin-free..

en	Everything is dangerous. Don't get too close.

en	Machines have been made safe again.

en	Rock, Dirt and Stone are now ores. This isn't as good as it might sound.

en	A sensible amount of Ore is present again.

en	The Floor Is Lava active. This is not compatible with regular Survival.

en	The Floor Is Lava inactive.

en	Mobs will now attack on sight. Turrets are modified to cope.

en	Mobs will now feign indifference to your presence.

en	Drop Pods will now contain a huge variety of things.

en	Drop Pods will only contain research. Probably for the best.

en	CRUSH. KILL. BLAST. DESTROY. LOOT. REPEAT.

en	Mobs will now only drop sensible things.

en	All Logisitics apart from Robots are super-nerfed.

en	Robots are still pretty cool, you know.

en	All items now have a stack limit in your inventory.

en	Your salty tears have been noted.

en	Your CPH is now super-duper important. Keep it alive or suffer.

en	No penalty for CPH death.

en	Analysing area...

en	Activation in

en	DESTROY NOW TO CANCEL!

en	Bye

en	Connecting

en	Connecting to server at

en	Disconnected

en	No longer connected

en	Not Connected

en	Could not reach server

en	Exception in network thread

en	You need to own the Frozen Factory Expansion pack to access this skin!

en	You need to own AmpuTea to access the Explorer skin!

en	You need to own EVERY piece of DLC and Expansion Pack for access to this super-exclusive skin!

en	User was missing

en	See http://www.patreon.com/Fortresscraft for more details!

en	You need to own the Dapper DLC to access the Union Jack skin!

en	You need to own Steam Heroes to access the Harrison skin!

en	You need to own Skin Pack #1 to access this skin!

en	You need to own the Community Rewards Pack for this! (See http://www.patreon.com/Fortresscraft for more details!)

en	Only good little boys and girls can use this skin!

en	You need to own Skin Pack #2 to access this skin!

en	Tutorial Complete!

en	If you're stuck, Press H for help!

en	Tutorial in progress

en	The Central Power Hub (CPH) is the focus of your base.

en	Power Storage Blocks (PSBS) are the main method of storing power.

en	Ore Extractors collect resources automatically.

en	Storage Hoppers automate resource handling

en	Use LMB to Ping Unknown if you can't find anything!

en	Researching Scans gives you Research Points

en	Repair your robotic assistant ARTHER by crafting it at the manufacturing plant!

en	Look at the CPH and press E!

en	Charge your suit from the PSB!

en	Add at least 200 power to the Ore Extractor

en	Collect Coal from the Hopper!

en	Hold RMB to Scan something!

en	Research your new scan!

en	Craft a Power Core!

en	CPH Rebooting

en	Killed

en	attackers!

en	CPH Health

en	LOIC En-Route!

en	LOIC returning to recharge!

en	Discharge Volley

en	OET ready for Strike Controller!

en	OET Charge

en	Converting world, please wait!

en	Placed in Quadrant

en	Current Quadrant is already cleared!

en	Current Quadrant has active Overmind!

en	Too close to CPH to activate! Move near a valid target!

en	Scanning area for optimal targetting...

en	Looking for Orbital Transmitter...

en	Scan complete.

en	Orbital Bombardment requested

en	LOIC Travel distance still

en	You should probably run away now. There's an achievement if you if don't look at the strike!

en	No charged Orbital Transmitter located.

en	Press E to blow up everything within a very big range of here

en	NO OVERMIND DETECTED!

en	Press E to confirm Strike Location.

en	Overmind within

en	destruction chance

en	Upgraded!

en	Hopper Scanner

en	Other

en	Unknown Ore

en	Unknown Material

en	Closest

en	Press X for Build Gun

en	Wheelmouse to Select

en	Ping Unknown

en	Ping Known Ore

en	Ping Air

en	Ping Coloured Ore

en	NO POWER

en	Resource Scanner

en	LMB to Ping RMB to Scan Wheelmouse to Select

en	Ore Scanner

en	Automation is going to be the key to success. Your Smelter can interface with adjacent Hoppers of any type. However, if you're not specific with your instructions, then all sorts of bad things could happen! Set the permissions now, to have one Add-Only hopper and one Remove-Only hopper. Convey Ore into the Remove-Only Hopper and Ingots will be added to the Add-Only Hopper. Remove from the Add-Only Hopper via Conveyors.

en	Smelting Automation

en	Insert Ore to start

en	Obtaining materials

en	Need

en	Need {0} found {1}

en	found

en	Unable to find any ore

en	Unable to clear output hopper

en	Please empty manually!

en	Needs more Ore!

en	-- Creative Mode --No Information availableFor fancy Statistics, play Survival

en	Played

en	It looks like you've been disconnected!

en	Sorry

en	Client Thread is null!

en	Network Client is closing!

en	Network Client is not connected!

en	Detail block loading

en	Empty Detail slot

en	{0} cannot be dug up!

en	You dont have permissions to build here!

en	You cannot build with {0}!

en	Whoops! Nulldata for {0}

en	You failed to craft a {0}

en	You don't have the resources to auto-craft a {0} - you need {1}

en	You need to craft a {0} at your base!

en	You don't have a {0} in your inventory!

en	You cannot build with unknown items!

en	You cannot build on top of {0}

en	You cannot build on top of this!

en	You can't build {0} at height {1}!

en	You can't build this at height {0}!

en	Warning! Cannot be dug up once constructed!

en	You don't have permissions to delete this.

en	Loading Detail Block

en	Unnamed

en	You need the Dapper DLC to colourise torches!

en	Progression! You've killed {0} helpless innocent lifeforms!

en	Progression! You've generated {0}k power!

en	Progression! You've smelted {0} ingots!

en	Progression! You've crafted {0} items!

en	{0} baked

en	{0} archives to compress!

en	Safe to exit

en	Save Queue: {0}

en	I just processed the {0} scan!

en	I just researched the {0} recipe!

en	I just researched the {0} project!

en	PROCESS

en	NO SCANS

en	RESEARCH

en	Power required to research: {0}

en	Process Unknown Material scans to unlock new Research Projects and Manufacturing Recipes, as well as earn Research Points.

en	Find more unknown materials using the ore scanner's ping facility.Press M to select the ore scanner then Left Mouse Button to send off a material ping.

en	For more information on the {0} open the handbook (press H).

en	Scans ({0})

en	Scans

en	Recipes

en	Projects

en	Recipes ({0})

en	Projects ({0})

en	Value

en	Research Points

en	In order to know what this material is, you will have to process the scan.

en	Unprocessed Scan

en	Power required to research : {0}

en	Research this project at the laboratory - Requires:

en	Unlocked from

en	Unknown Requirement: {0}

en	For more information on the {0} and a list of what it will unlock, open the handbook (press H).

en	CONTACT LOST!REASON: {0}

en	Unknown

en	Altitude : {0}m. Accel: {1}m/s²

en	Fuel : {0}l /{1}kg

en	Velocity: {0}m/s. Orbital Velocity: {1}m/s

en	Mass : {0}kg

en	Thrust : {0}N / {1}N

en	TOO HEAVYNEED AT LEAST {0}N of Thrust!

en	Out of fuel

en	Launch in T - {0}s

en	LaunchPad Collision

en	Unset

en	Perfect

en	Deadly

en	Exact

en	Precise

en	Accurate

en	Careful

en	Careless

en	Crappy

en	Lax

en	Sloppy

en	Inaccurate

en	Useless

en	{0} Scope

en	Refreshing...

en	[PUBLIC] (Waiting for response)

en	Contacting server...

en	Server Readout -

en	World Uptime : {0}

en	{0} out of {1} players connected.

en	{0} active machines (Load : {1})

en	{0} active mobs (Load : {1})

en	Server Transmission Progress : {0}

en	{0} segments left to send

en	({0} Bars/ {1} Ores/ {2} Power/min

en	Forced

en	Half

en	Limited

en	Off

en	Power-saving

en	Helmet: Open

en	Helmet: Closed

en	Gender: Male

en	Gender: Female

en	Gender: Other

en	Slime Attractor

en	Bait active!

en	Needs Ruined Organic Matter in adjacent Storage Hopper!

en	Temperature

en	Heating

en	Requires {0} Ore

en	Click icon to clear

en	Add Ore

en	Add Ore to begin!

en	Click icon to retrieve

en	Ingredient in Ore Smelter

en	Gathering Materials

en	Gained {0} power!

en	Undamped

en	Impeded

en	Inhibiting

en	Damped

en	Absorbing

en	Interdicting

en	Vibration

en	Wobbliness

en	Balance

en	Steadiess

en	Solidness

en	Fixation

en	{0} Stock of {1}

en	Error machine tier not recognized!

en	Looking for Attached Storage

en	Searching for Storage

en	Fully Stocked

en	Looking for Mass Storage Crate...

en	Surveying mass storage crate distances...

en	Currently stocking : Unknown Material

en	Currently stocking : {0}

en	Stockpile quantity: {0}/{1} Press E to configure Stock limits

en	Press E to configure item to stock

en	Local inventory: {0} Drone inventory: {1}

en	Set Item to Stock

en	Decrease Limit

en	Increase Limit

en	Refuse items when above limit

en	Choose Item

en	Enter Item Search Term

en	Inventory Item

en	Stock: {0}/{1}

en	Collect items when above limit

en	Searching for:

en	Stocking: {0}

en	Stockpile cleared!

en	Storage full

en	Storage Empty

en	{0} free slots

en	Processing...

en	ERROR Unknown cube[{0}] added

en	Mini Hopper (Small and Very Slow)

en	Logistics Hopper (Tiny and Somewhat Slow)

en	Cryo Hopper

en	Used: {0}. Free:{1} (E) Open Storage Interface

en	Last Item: {0}

en	Internal Temp: {0}°C. Power: {1}

en	Using {0} PPS.

en	Overheating! NEEDS MORE POWER!

en	Overheating! Contents Spoiling!

en	CryoStorage Active!

en	(Shift+E)Toggle Vacuum Status : {0}

en	(T) to store {0}

en	(Try Shift and Ctrl)

en	Hopper full!

en	(Q) to retrieve contents!

en	(Shift+Q) to toggle permissions!

en	Scan for more information!

en	NetworkSync: {0}

en	Failed! Inventory Full?

en	Stored {0}

en	UNKNOWN TYPE

en	Add + Remove

en	Add Only

en	Remove Only

en	Toggle Vacuum

en	Vacuum: Off

en	Press I to toggle (I)nventory

en	Shift/Ctrl to remove 10/1

en	Vacuum: On

en	Used: {0}/{1}

en	Stacked {0}x {1}

en	Suit Power: {0}/{1}

en	Solar Efficiency: {0}

en	Mag Range: {0}

en	Suit Heater : Active

en	Suit Heater : Offline

en	Toxic Filter : Active

en	Toxic Filter : Offline

en	Radiation protection : Active

en	Radiation protection : Offline

en	Orders: {0}

en	Select Shape First

en	Instant

en	Smooth

en	Layered

en	FILL-SOLID

en	FILL-HOLLOW

en	Anchor : Base

en	Anchor : Centre

en	Not Buildable

en	Hold Left-Shift to dismantle MultiBlock Machines!

en	Valuable machine!

en	Multiblock machine!

en	Quarry!

en	Too large! Use LeftShift!

en	Hold LeftShift to break this!

en	This is too hard!There is no way to dig this up yet!

en	This is too hard!Upgrade your Build Gun may help!

en	Use an Ore Extractor!

en	Use-Left Ctrl to SuperDig!

en	ERR. TOO COLD

en	Died from hypothermiaCraft a Suit Heater.

en	Died from hypothermiaPlace Torches to keep warm!Power Boosters give emergency power!

en	You went swimming in magma!

en	You went wading in magma!

en	Died from heat exposure

en	Died from temperature exposure (See log file for details!

en	Save count: {0}

en	Central Power Hub (CPH)

en	Your CPH is the centre of your base, and will provide small amounts of power when fed resources.Look at your CPH and press E to access it.You can then click Add Resources to feed it some coal.

en	Power Storage Batteries (PSB)

en	PSBs are your primary way of storing power for your base.Locate your PSB in your base now, then highlight it.Pressing Q will draw power from the PSB into your suit, which in turn will keep you warm.

en	Ore Extractors (OE)

en	Ore Extractors (OE) collect ore whilst you are busy doing other things, and require power.Locate your OE, and access it with E again. Feed it 200 power, and it will work for over 8 minutes!

en	Storage Hoppers (SH)

en	Storage Hoppers (SH) store and process items automatically.Your machines will take resources from, or give them to, a Storage Hopper. Locate your SH, and press Q to empty it. Remove the Coal that has been mined.

en	Scanning

en	You can 'ping' to locate known or unknown items in the world.Once an unknown item is found, you can then scan it.Find an unscanned item now (inside OR outside the forcefield), highlight it, and hold Right Mouse until it is scanned.

en	Researching

en	Once scanned, Unknown Items need to be researched.Locate and highlight your Research Station, then press E to interact and complete the research.Researching earns points to unlock new technologies.

en	Simple Crafting

en	ARTHER has helped you through the start of your survival mission - now it's time to say Thank you. Head to the Crafting Plant, select it, press E and make a Power Core for ARTHER.

en	Automation

en	You've got a few Storage Hoppers, Laser Power Transmitters and Conveyor Belts left over.Locate the holo-tutorial around the CPH.This shows you an ideal miniature Automation setup. Place your machines there.

en	Good luck!

en	From now, you're on your own. Everything you need to know is in your Survival Handbook. Open it by pressing H.

en	You died in a previous game! You're still dead!

en	The CPH does not heal on Hardcore difficulty!

en	Ran out of health for some reason!

en	Died from Toxic FumesTry crafting a Toxic Filter!

en	Unknown block detected...Hold RMB to scan!

en	Block has been scanned but not researched!Return to your Research Station to identify it!Press X to switch to Build Gun

en	{0} has been researched!

en	X to return to Build Gun

en	Scanning unknown block...Continue to hold button to complete Scan

en	Cannot re-scan block...Already Scanned!Scan this at your Research Station!Press X to switch to Build Gun

en	Scanning {0} vein...Continue to hold button to complete Scan

en	Block Type: {0}

en	Distance : {0}m.

en	New Scan Complete!

en	Scanned new Block!Return to your Research Station!

en	Scanned new Block!Return to your Research Station!X to select Build Gun

en	Already Scanned!Return to your Research Station!

en	Already Scanned!Return to your Research Station!X to select Build Gun

en	Return to Research Station!

en	Block Type: {0}Already Known

en	Already Scanned!

en	unknown

en	Ore Report:Type: {0}Volume: {1} m3Total Ore Amount: {2:N0}

en	Ore Report:Type: {0}Volume: {1} m3Total Ore Amount: {2:N4}m

en	{0}Volume: {1} m3Total: {2:N0}

en	{0}Volume: {1} m3Total: {2:N4}m

en	Scanned {0}m, {1}

en	I just scanned a vein of {0} containing {1}m Ore at {2},{3},{4}

en	Extend: {0}/ {1}

en	Pressure: {0}bar

en	Current Speed: {0}m/s

en	Powered compressor required beyond {0}m

en	(Home) Raise Lift.

en	(End) Lower Lift.

en	Initialising...

en	Locating Resources...

en	Looking to offload {0} high octane fuel canisters

en	Compositing materials...

en	Looking for {0} more coal and {1} more HEFC...

en	Compositing; {0}s left. @ {1}pps

en	STORAGE FULL! OFFLOAD!

en	No fuel to offload

en	{0} High Octane Fuel ready to offload

en	Power: {0}/ {1}

en	DigiStructing Rocket

en	Fuelling Rocket

en	Rocket Launched!

en	Pad Empty.

en	DigiStruct power needed: {0}

en	Waiting for target lock...

en	High Octane Fuel needed: {0}

en	CPH Offline; Dazzler Offline.

en	CryoPlasm Cleared: {0}m³

en	Inferno has successfully neutralised a CryoPlasm Spawner!

en	CryoPlasm Inferno

en	Please attach a Magma Storage via Fluid Pipes...

en	Scanning for CryoPlasm Spawns within 64 metres...

en	Cannot target CryoPlasm Spawner, blocked by {0}!

en	Time remaining: {0}

en	WARNING! REGROWTH IN: {0}

en	NEED COMPRESSED MAGMA NOW!

en	Waiting on gas from a Gas Storage Tank.

en	Storing: {0}.

en	Next bottle filled in : {0}s

en	Looking for Hopper to offload to...

en	Gas Storage

en	Waiting for gas from a Particulate Compressor.

en	Connected to Gas Bottling Plant.

en	Scanning for pipe connections to a Gas Bottling Plant in {0}s

en	Looking For Ore

en	Please wait, paging...

en	Place on 3x3 Ore only!

en	Place on 3x3 identical Ore only!

en	Grinding Ore...

en	Grinder finalising...

en	Finalising...WARNING! Ore is volatile state, DO NOT DELETE MACHINE!

en	Ore ground; looking to offload.WARNING! Ore is volatile state, DO NOT DELETE MACHINE!

en	Grinding...

en	Kaboom!

en	Grinder cannot function without active Cold Cavern Climate Control Centre

en	Grinding: {0}

en	{0}x {1} to offload!

en	CPH Offline; Borer Offline.

en	Unable to locate input Storage Hopper

en	Looking for High Energy Composite Fuel...

en	Checking Gantry Clearance...

en	Checking Drill Clearance...

en	DigiStructing Drill...

en	Drilling...

en	Stuck.

en	Retriving Drill Head.

en	Collecting Magma!

en	Gantry Search completed {0} of {1}

en	Gantry cannot be deployed due to obstruction of {0}

en	Drill Search completed {0} of {1}

en	Drill cannot be deployed due to obstruction of

en	Looking for linked centre...

en	PPS Delta: {0}

en	{0}m power still required.

en	Drilling at depth {0}m

en	Retriving Drill (at depth {0}m)

en	Offloading to Magma Storage Unit

en	Failed to find Magma Storage Unit; searched {0}m

en	Please attach a Magma Bore to this storage...

en	Offloading to CryoPlasm Inferno Turret.

en	Failed to find CryoPlasm Inferno Turret.; searched {0}m

en	Compressing...

en	Waiting for resources...

en	Maximum internal pressure reached

en	Particulate Compressor

en	Compressing: {0} using {1}PPS

en	Collecting...

en	Nothing to compress.Please attach a Particle Filter.

en	{0} ready to compress.

en	Need {0} more to begin.

en	Storing {0} stored.

en	Connected to Gas Storage.

en	Scanning for pipe connections to Gas Storage in {0}s

en	Error, no particulates found.

en	Particulate Filter

en	CPH Offline - filtration paused!

en	POWER LOW!

en	Filtering using {0} PPS

en	Unable to locate Particulates.Please place in a particle-filled cavern.

en	{0} stored.

en	Connected to Particulate Compressor.

en	Scanning for pipe connection to Particle Compressor in {0}s

en	Built to {0}

en	Built Ring at {0}m

en	Dist: {0}/{1}

en	Need {0} more alloyed blocks to construct

en	Requires Adventures Pack or Patronage!

en	--WARNING {0} ACTIVE HIVEMINDS FOUND--

en	You will be REQUIRED to kill these before using this item in full release

en	--WARNING No C5 found - this will be a requirement before release!

en	--WARNING ALL EIGHT CRYOPLASM SPAWNERS MUST BE KILLED BEFORE USING THIS--

en	Storing {0} Coal and {1} HEF Canisters

en	No linked centre found!

en	Orbital RailGun Link

en	Temperature {0}°C

en	HECF Canisters Needed {0}

en	Power Cost:

en	No Marker

en	No location stored

en	This block was added by a mod which has been deactivated

en	The Gameplay thread has not responded for {0} seconds!

en	Fluid processing: {0}

en	Empty Waypoint

en	Place a Sign next to this machine to name it!

en	This machine needs 0.1 PPS.

en	Marked Location

en	usage: {0} 'command'

en	valid commands: add remove

en	usage: {0} add 'name' ('r' 'g' 'b')

en	added waypoint '{0}'

en	usage: {0} remove 'name'

en	"{0}" removed from waypoint list

en	"{0}" not found in waypoint list

en	Unknown command: {0}

en	Ricocheting

en	Flubbing

en	Bouncy

en	Crazy-ass

en	Tingling

en	Electrifying

en	Shocking

en	Electrocuting

en	Pistol

en	Blaster

en	Sniper Rifle

en	Assault Rifle

en	SMG

en	Cannon

en	Minigun

en	{0} of

en	Level {0} {1} {2}

en	Range: {0}

en	Shot Delay: {0}

en	{0}shots/sec

en	Spread: {0}

en	Recoil Reduction: {0}%

en	Max Charge: {0}

en	Charge Rate: {0}

en	Mod Socket {0}

en	Whitelisting is currently

en	valid commands: on off add remove

en	whitelist turned on

en	whitelist turned off

en	usage: whitelist add 'name'

en	"{0}" added to single access list

en	usage: whitelist remove 'name'

en	"{0}" removed from single access list

en	"{0}" removed from whitelist

en	"{0}" not found in whitelist

en	workshop command only works inside a workshop

en	usage: {0}

en	Design name changed to " {0} "

en	Available behaviours: {0}

en	Unknown behaviour {0}

en	Behaviour {0} added

en	Behaviour {0} updated

en	size and/or speed parameter could not be parsed

en	Missing size or speed parameter

en	usage: {0} 'behaviour'

en	Design does not have behaviour {0}

en	Behaviour {0} removed

en	usage: {0} 'library design path'

en	Import not finished yet

en	usage: {0} 'slot number'

en	failed to parse slot number

en	slot number not a custom!

en	Buildable slot {0} selected

en	Workshop deleted

en	World parameter usage: {0}

en	Gravity: {0}

en	Movement Speed: {0}

en	Maximum Fall Speed: {0}

en	Jump Speed: {0}

en	usage: {0} 'gravity-amount'

en	Gravity set to {0}

en	Could not parse

en	usage: {0} 'speed-amount'

en	Movement Speed set to {0}

en	Current maxfallspeed: {0}

en	Maximum falling speed set to {0}

en	Jump Speed set to {0}

en	If you can read this, I messed up

en	Loads

en	Tons

en	SuperFast

en	Day

en	Lots

en	Basic MedBay

en	MedBays must be built inside rooms!

en	This must be built inside a room!

en	Basic Ampule Crafter

en	Ampule Dispenser

en	Press E to Extract

en	Base Production Scanner

en	Awaiting Network Data...

en	#NoFilter

en	Room Light #1. Paintable!

en	Room Light #2. Paintable!

en	Room Light #3. Paintable!

en	Room Light #4. Paintable!

en	Room Light #5. Paintable!

en	Room Light #6. Paintable!

en	Room Light #7. Paintable!

en	Room Light #8. Paintable!

en	#1 Room Lights. Paintable!

en	#2 Room Lights. Paintable!

en	#3 Room Lights. Paintable!

en	#4 Room Lights. Paintable!

en	#5 Room Lights. Paintable!

en	#6 Room Lights. Paintable!

en	#7 Room Lights. Paintable!

en	#8 Room Lights. Paintable!

en	Paintable light that only works in Rooms.

en	Paintable light that only works in Rooms.

en	Paintable light that only works in Rooms.

en	Paintable light that only works in Rooms.

en	Paintable light that only works in Rooms.

en	This Room light will alert you to CPH attacks silently.

en	Paintable light that only works in Rooms.

en	Paintable light that only works in Rooms.

en	Uses Paste - you'll lose Paste if you dig it up, so place with care!

en	Requires the Dapper DLC Pack

en	Requires the Dapper DLC Pack

en	Requires the Dapper DLC Pack

en	Requires the Dapper DLC Pack

en	Uses Paste - you'll lose Paste if you dig it up, so place with care!

en	Requires the Dapper DLC Pack

en	Requires the Dapper DLC Pack

en	Basic MedBay

en	Place on a wall in a room, give it power, and stand near it to heal.

en	Place on a wall in a room, give it power, and stand near it to heal.

en	No hint. It's that simple.

en	Place Plant Seeds onto these to grow them.

en	Grows plants much faster.

en	Advanced Hydroponics Bay

en	Grows plants much faster. Maybe requires power, haven't decided.

en	Place Plant Seeds onto these to grow them.

en	Grows plants much faster.

en	MK1 Ampule

en	MK2 Ampule

en	MK3 Ampule

en	MK4 Ampule

en	MK5 Ampule

en	Regenerates Health over a fixed amount of time.

en	Place in Suitinventory to auto use

en	Iron Gear Maker

en	Creates Iron Gears.

en	A machine that supports autocrafting of Iron Bars into Iron Gears.

en	Much more efficient than doing it by hand!

en	THIS IS INCORRECT LOCATE IT AND FIX THE CASE

en	AirLock Inner

en	Not relevant.

en	AirLock Inner

en	Connects Rooms to Airlocks

en	Connects Rooms to Airlocks

en	Build in a 3x3x1 or 1x3x3 layout

en	THIS IS INCORRECT LOCATE IT AND FIX THE CASE

en	AirLock Outer

en	Not relevant.

en	AirLock Outer

en	Connects Airlocks to the Outside

en	Connects Rooms to Airlocks

en	Build in a 3x3x1 or 1x3x3 layout

en	Reinforced Plated Room Floor

en	Paintable, reinforced floor, specifically designed for Rooms.

en	Paintable, reinforced floor, specifically designed for Rooms.

en	Uses Paste - you'll lose Paste if you dig it up, so place with care!

en	Room Decoration 1

en	Reinforced wall decoration, specifically designed for Rooms.

en	Reinforced wall decoration, specifically designed for Rooms.

en	Uses Paste - you'll lose Paste if you dig it up, so place with care!

en	Alloyed Space Window

en	Paintable, reinforced window.

en	Paintable, reinforced window. Not recommended for use in Rooms.

en	Uses Paste - you'll lose Paste if you dig it up, so place with care!

en	Room Ventilation Grille

en	Lets air passthrough

en	Use this to improve the Clean rating of your room, required to hit Clean Room designation.

en	You need 1 per 150m3 of the room

en	Reinforced Plating

en	Reinforced, Paintable Wall designed for Rooms.

en	Paintable, reinforced wall, specifically designed for Rooms.

en	Uses Paste - you'll lose Paste if you dig it up, so place with care!

en	Room Wall Panel

en	Paintable, reinforced wall, specifically designed for Rooms.

en	Uses Paste - you'll lose Paste if you dig it up, so place with care!

en	Room Light Reflector

en	Reinforced ceiling reflector, specifically designed for Rooms.

en	Uses Paste - you'll lose Paste if you dig it up, so place with care!

en	Logistics Grommet

en	Conveyors transfer items through this.

en	Conveyors transfer items through this.

en	First pass!

en	Energy Grommet

en	PTGs, Solar Panels and PSBs will transfer power through this.

en	PTGs, Solar Panels and PSBs will transfer power through this.

en	First pass!

en	Room Extractor Fan

en	Future machine - use this to improve the Clean rating of your room, required to hit Clean Room designation.

en	Future machine - use this to improve the Clean rating of your room, required to hit Clean Room designation.

en	DON'T BOTHER BUILDING THIS YET!

en	Reinforced Plated Room Wall

en	Paintable, reinforced wall, specifically designed for Rooms.

en	Uses Paste - you'll lose Paste if you dig it up, so place with care!

en	BaubleBerry Seed

en	BaubleBerry Seeds

en	Tri Seed

en	Tri Seeds

en	UnderGrump Seed

en	UnderGrump Seeds

en	GoopyDangler Seed

en	GoopyDangler Seeds

en	Coxcomb Seed

en	Coxcomb Seeds

en	LeafyDangler Seed

en	LeafyDangler Seeds

en	TundraBreath Seed

en	TundraBreath Seeds

en	Super Construction Paste Grinder

en	Uses 'garbage' or Coal blocks to make Construction Paste at a 1:8 ratio.

en	Converts useless garbage and Coal into Construction Paste. All aesthetic blocks use construction paste!

en	Only works if you have the Dapper Indie Supporter DLC.

en	Lightweight Machine Housing Crafter

en	Turns 6 plates into 1 Housing.

en	A machine that supports autocrafting of Tin Plates into Lightweight Machine Housings.

en	Much more efficient than doing it by hand!

en	Priority Splitter

en	Sends all incoming items Right, unless blocked, then Left.

en	Sends all incoming items Right, unless blocked, then Left.

en	Connect directly to conveyor belts or Hoppers. Only works correctly if both sides have an output.

en	HerbiCor

en	Collects nearby outdoor unharvested Plants and returns them.Needs attached storage hopper.

en	Collects nearby outdoor unharvested Plants and returns them. Requires attached Storage Hopper.

en	Also good for framerate!

en	Generic Room Controller

en	Creates a Room. Will give Informations about the Room itself

en	Place in a Room and follow the instructions.

en	Build it on the floor. Instructions are in the bottom left once you do!

en	Ampule Dispenser

en	Place above an Ampule Crafter

en	Use to craft and upgrade Ampules from an attached Ampule Crafter

en	Carry one. ALWAYS carry one. (Put into suit inventory to fire automatically)

en	Ampule Crafter

en	Place below an Ampule Dispenser, attached to a Storage Hopper of plants.

en	Use to craft and upgrade Ampules into an attached Ampule Crafter

en	Carry one. ALWAYS carry one. (Put into suit inventory to fire automatically)

en	Base Scanner

en	Place in a room. Observe. Learn. Progress!

en	A filterable, real-time graph monitoring every aspect of your base's performance.

en	Place in a room. Observe. Learn. Progress!

en	I Understand

en	Low-end computer detected!

en	Only 2 Logical/Physical CPUs detected. Your PC is at or below the minimum requirements for FortressCraft, and you may experience a number of visual or performance issues. Threaded visibility has been disabled.

en	INTEL VIDEO CARD DETECTED!

en	FortressCraft has detected that you're running on an {0} - if you are using a gaming laptop, then please use the high-performance card! If this is your only video card, then you are likely to experience a number of visual or performance issues.

en	Fastest detail selected!!

en	FortressCraft has detected that you're running on FASTEST detail. This detail setting is designed only for very low-spec computers with a minimal amount of RAM, and it is not really recommended for normal gameplay. You will have pop-in, low poly models and blurry textures.

en	Low Texture Detail selected!!

en	FortressCraft has detected that you're running on LOW texture detail. This detail setting is design only for very LOW-MEMORY computers with a minimal amount of RAM. It does NOT increase performance or FPS, and it is NOT recommended for normal gameplay. You will experience blurry textures.

en	World Validation

en	World Validation is Complete

en	Your world is being converted to a new format, please wait.Current Progress: {0}%

en	{0} completed of {1}!

en	Conversion Time {0}h:{1}m:{2}s of estimated {3}h:{4}m:{5}s

en	World Conversion

en	Your movement has been paused!You may have moved outside of the loaded world.Please wait a short while for your disk or network connection to catch up.If this happens often in single player please check your anti-virus software is not interfering.Count is now {0}

en	Attached to Lift

en	Compressor Active!

en	Compressor Idle.

en	Tier 1 Vertically-Extending Central Piston Lift

en	Current Range: {0}

en	Adjust range by holding (Q) or (E).

en	Powered compressor required beyond {0}m

en	Lifts limited to 64m for network clients. Sorry!

en	Current Pressure : {0}/{1}bar

en	Lift is under Manual Control

en	Stored Pressure : {0}bar

en	Work complete. No blocks to shoot

en	Scanning for Hardened Resin - {0} complete.

en	Clearing area - {0} complete.

en	Ablated {0} blocks

en	Scan Size : {0}

en	Scanning for Ablated Resin - {0} complete

en	Liquified {0} blocks

en	Press Q to Reset

en	Please place facing a Conveyor!

en	Please place facing a Conveyor or Scrap Track!

en	Upgrade complete - {0} conveyors upgraded

en	Upgrade complete - {0} track upgraded

en	Low Power!

en	Need Attached Hopper!

en	Unable to locate conveyors to upgrade with!

en	Unable to locate material to upgrade with!

en	Search Distance {0}m

en	Conversions {0}

en	Blocked! Please check and clear!

en	Build complete!

en	Needs {0} more Power

en	Looking for valid attached Storage Hopper!

en	Looking for Basic Conveyors...

en	Looking for Conveyors...

en	Looking for Transport Pipes...

en	Looking for Minecart Tracks...

en	Build Distance is {0}

en	Build Distance is {0} using:

en	Basic Conveyors

en	Transport Pipes

en	Minecart Tracks

en	Time left: {0}s

en	Items Added : {0}. Items found {1}.

en	SpiderBot Recharge and Docking Bay

en	SpiderBot Power {0}/{1}

en	Holding [{0}] ready for Spiderbot!

en	Bay ready to receive items

en	Bay offloading final item to SpiderBot before undock

en	SpiderBot is Docking

en	SpiderBot is Docked and awaiting resources!

en	SpiderBot is Defending!

en	Hint : Connect Hoppers with Charged Lithium Coils to power SpiderBot

en	ERROR! LET DJ KNOW THAT YOU HAVE A SPIDERBASE NOT IN THE ENTITYMANAGER!

en	Internal Power: {0}/{1}

en	Illegal placement!MK2 Solar Arrays must be placed on:

en	MK4 Batteries

en	MK5 Batteries

en	Refineries

en	Not collecting! Cannot see the sun!

en	Collecting at rate of {0} power per second

en	Not collecting! Sun is below horizon!

en	Collecting novalight at a reduced rate of {0} power per second

en	MK4 Power Storage

en	MK5 Power Storage

en	Power In: {0} (Avg: {1})

en	Power Out: {0} (Avg: {1})

en	Located {0} attached Power Consumers

en	T4 Conduit

en	Must be built upright!

en	Collecting at rate of {0}%

en	Current Rate is {0} PPS.

en	Organic Solar PanelCollecting Novalight at reduced rate of {0}%

en	Solar PanelNot collecting! Sun is below horizon!Sun rises in {0} minutes

en	Vat not formed after loading. Bug!

en	Connected to Controller

en	Processing {0}

en	Not connected to Controller

en	Vat State: {0}

en	Controller State: {0}

en	Connected to {0} reactor vat

en	Stored (Q): {0}x {1}

en	Selected Recipe (E): {0} {1}

en	Processing {0}, {1} complete

en	Not connected to a reactor vat.Must be connected in order to operate.

en	Tank: {0}, Operating {1}

en	Link State: {0}

en	Fuel Level: {0}

en	Current Power/Second: {0}

en	Not Collecting. (E) to Toggle

en	(E) to Toggle

en	MK1 Robot Arm + + Status: {0} {1}

en	Burn Time {0}s

en	Active {0}s of the last {1}s

en	Efficency: {0}

en	PTG is starved of oxygen!PTG cannot function this deep!

en	ERROR - No centre?

en	Stack: 1 Crate

en	Stack: {0} Crates

en	Total Storage: {0}

en	Power Delta: {0}

en	T to Store power

en	Q to Retrieve power

en	Automated Zipper Merge(Patent Pending)

en	Zipper Merge (Three'n'One edition!)(Patent Pending)

en	Rapid Zipper Merge(Patent Pending)

en	Bender Plant

en	Pipe Extruder PlantConverts Bars into Tubes

en	Extruder PlantConverts Bars into Wires

en	Bender PlantBends in sorts of Angles

en	Stamper PlantTakes Bars from a Conveyor, converts to Plates and then offloads to another Conveyor.

en	Coiler PlantWires into Coils

en	PCB AssemblerConverts Coils into PCBs

en	Conveyor TurntableEvenly splits resources.

en	Basic ConveyorUpgrade as soon as you can!

en	Advanced Conveyor FilterSorting Items since 1291 A.D.

en	Transport PipeRapid Armoured transportation.

en	Conveyor Belt Filter

en	Transport Pipe Filter

en	Motorised ConveyorUltra-fast Storage Hopper connector.

en	(R) and (Shift+R) to Rotate

en	Items transported: {0} at {1}/min

en	Conveyor Blocked!

en	Transporting: {0}

en	(E) Set Filter to {0}

en	Shift (E) Set Filter to {0}

en	Press E to smash the ice!

en	WARNING - FROZEN!

en	Filter set to everything EXCEPT: [{0}]

en	Filter set to : [{0}]

en	Press T to invert filter.

en	Select an item in your Hotbar to use as an Exemplar

en	Press Q to set Output to {0}

en	Error, Conveyor filter can't deal with [{0}]

en	WARNING - INFESTED! - See Handbook (H)

en	ALL types

en	GARBAGE

en	COMBUSTIBLE types

en	ORE

en	NOTHING

en	CRYSTALS

en	GEMS

en	BIOMASS

en	BARS ONLY

en	ORGANIC ITEMS

en	CRAFTED ITEMS

en	SMELTABLE

en	RESEARCHABLE

en	UNKNOWN

en	Current Power: {0}

en	Power to fire

en	Success/Fail: {0}/{1}

en	Press (E) to open interface

en	No Location Marker installed

en	Location Marker does not contain a marked location

en	Target is {0}m away

en	Stand on teleporter and press jump to activate

en	T-Minus {0}

en	FlightTime: {0}

en	Press Q to self destruct.

en	USER ABORT

en	Launch in progres...

en	Press Q to scan construction

en	Fuel Efficiency: {0}

en	Engine Smoothness: {0}

en	Engine Power: {0}

en	Rocket has {0} Parts and is {1}m tall

en	Rocket weighs {0}t and has {1}kN thrust.

en	Delta/V: {0}m/s

en	Dry mass {0}t, Fuel mass {1}t

en	Rocket is launch-capable.

en	NEEDS {0} THRUST!

en	Press E to launch your rocket ship

en	LP had no Entity?

en	LightMode {0}

en	(E) to cycle LightMode

en	Attached is empty - active!

en	Attached is empty - inactive!

en	Attached is not empty - inactive!

en	Attached is not empty - active!

en	Looking for machine

en	Error value of {0}

en	Basic Missile Turret

en	Dualshot Turret

en	Tri-shot Turret

en	Quad-launcher

en	No missiles loaded!

en	Can't find Missiles in attached Hopper!

en	{0} missiles loaded!

en	Next shot's damage is {0}

en	Reloading for {0}s

en	Searching for Large Targets...

en	Aiming...

en	Attacking ! [{0} HP left!]

en	Client Delay: {0}

en	Turret

en	Searching... (Considered {0} targets!)

en	Shots: {0}. Kills: {1}. Damage: {2}

en	Press E to show turret range

en	Track Straight

en	Track Corner

en	Track Slope

en	Minecart Buffer

en	Minecart Full Gate

en	Minecart Empty Gate

en	Track One Way

en	Scrap Track Straight

en	Scrap Track Corner

en	Scrap Track Slope

en	Scrap Track One Way

en	Please wait, processing...

en	Please attach a Hopper

en	Please place a Minecart into the Hopper!

en	Cart here with {0} items, {1}s before leaving

en	Cannot find any hoppers!

en	Unable to find resources in attached hoppers!

en	Awaiting Cart

en	Holding {0}

en	Station empty

en	Station has dealt with {0} carts

en	All surface attacks neutralised.

en	CryoPlasm detected at {0}m!

en	Threat Scanner (Client)

en	Kills: {0}

en	Attack: {0}

en	Base Rating: {0}

en	Heavy Chance : 0%

en	Heavies expected: {0} (approx)

en	Boss Chance : 0%

en	Bosses expected: {0} (approx)

en	No threats detected...

en	Next Attack: {0}s

en	Power: {0}%

en	Base Rating approx {0}

en	(Agitator Threat {0}) + {1} mob bonus

en	Calmer reducing threat by {0}

en	Calmers offline due to OET charging!

en	Mobs: {0}, Heavies: {1}, Bosses: {2}

en	Attack underway, {0} killed

en	Wave {0}/{1}

en	Next spawns in {0}

en	{0} left to spawn!

en	You've killed {0} mobs in {1} waves, and lost {2} times

en	No threats detected...

en	ATTACK IMMINENT!

en	Attack estimated in {0} minutes

en	Last Attack. Kills: {0}, Power Used: {1}

en	Mob Spawner

en	Type: {0}

en	Press E to spawn a {0}

en	At Depth {0}m

en	Found {0} smeltable Ore.

en	Found {0} coal.

en	Found {0} crystals.

en	Found {0} non-ore Blocks.

en	Quarry

en	Quarry is unable to draw sufficient O2 for cooling!

en	Please move the Quarry close to the surface.

en	Thank you!

en	Quarry cannot locate Input Hopper

en	This should contain Red and White Chevrons

en	Quarry cannot locate Health and Safety Resources!

en	Quarry needs more Red and White Chevrons

en	Place these in an attached Storage Hopper

en	Quarry currently constructing Edge Warning

en	SAFETY FIRST!

en	Quarry cannot find Output Hopper

en	All output hoppers full or locked!

en	Press E to confirm Quarry position

en	Power Low ({0} needed to dig, {1} available)

en	Found {0} in {1} ore blocks

en	Work Ratio {0}

en	Total Idle Time: {0}

en	(E to reset)

en	State: {0}

en	Forward Connected

en	Backward Connected

en	Fully Connected

en	Timer: {0}

en	You have an old and bugged machine in your world. I recommend you macerate this one, then make a brand new one, with my apologies - DjArcas

en	Desires {0}PPS. Current PPS: {1}

en	{0} {1} ({2}s left)

en	No valid Hoppers found (Locked or Full?). All attached conveyors missing or blocked!

en	Crafting: {0}s

en	Place resources in attached Hoppers.

en	{0} more power needed!

en	Combines 6xPlates and 2xPCBs into Research Pods

en	Basic Pods need Copper Plates and Basic PCBs

en	Simplified Pods need Tin Plates and Primary PCBs

en	Intermediate Pods need Iron Plates and Hardened PCBs

en	Complex Pods need Lithium Plates and Charged PCBs

en	Advanced Pods need Gold Plates and Conductive PCBs

en	XL Pods need Nickel Plates and Fortified PCBs

en	Ultimate Pods need Titanium Plates and Lightweight PCBs

en	Orbital Power Transmitter

en	{0} charged

en	Charge Rate {0}/sec.

en	Press (E) to interact

en	Power available : LOW. Supply more power for faster research.

en	Power available : MEDIUM. Research not at optimal speeds.

en	Power available : OPTIMAL. Research at full speed. More power may give a small boost.

en	Mode: {0}

en	Project: {0}

en	Progress: {0}

en	Current Item: {0}

en	Decomposition Progress: {0}

en	Banked Research Points: {0}

en	Unlinked multiblock

en	Placing and verifying pipes.

en	Pipe drill stuck on hard obstacle. Please remove.

en	Can't locate pipes in adjacent Storage Hopper!

en	Optimal temperature differential reached!

en	Power per second: {0}

en	Selected recipe: {0}

en	Output full, can't continue

en	Currently crafting {0}

en	Tutorial active!

en	Press E to open the CPH then click Add Resources!

en	Coal Burn Efficiency: {0}

en	Press E to configure

en	{0}% damaged

en	Defensive Missiles Fired: {0}

en	Time of Day: {0} ({1})

en	Research StationProcess scans and research new technologies.Power: {0}/{1}Press E to open

en	Research StationPress E to close

en	Fusion Power Monitor

en	Core status:

en	Fuel: {0}

en	Generating: {0:N0} PPS

en	Cooldown period: {0:N1}s

en	Required Charge level for ignition: {0:N0}

en	(E) to add Fuel

en	(T) to Ignite

en	Core diameter: {0} (T)

en	Pylon size: {0}

en	Offset: {0} (Q - E)

en	ServoMotor

en	Accurate, fast, low Torque Motor

en	Minimal torque.

en	Accurate and fast motor. Difficult to make by hand, easier to automate.

en	Everything EXEPT

en	Filter set to

en	Servomotor Maker

en	Turns 3 Wires into 1 Servo Motor.

en	Much more efficient than doing it by hand!

en	A machine that supports autocrafting of Copper Wires into Servo Motors.

en	SUPER H.E.I.S.T.

en	Like the H.E.I.S.T. only 16 times faster. This item requires the Dapper DLC to work

en	No time for lazy!

en	Automatically removes items from adjacent Storage Hoppers and transmits it to player within 5 metres - SUPER FAST! Requires Dapper DLC.

en	Attack Scanner

en	Place somewhere obvious!

en	Subtle is no good. Subtle is dead!

en	Allows a REALLY OBVIOUS way of reminding yourself how long before an attack.

en	Super Heist!

en	Room-based CryoCloner

en	Basic Robotic Sorter

en	Allows simple bus setups.

en	Automatically moves a specified item between conveyors.

en	Use this for a straightforward Bussing system.

en	Upgraded Robotic Sorter

en	Allows faster bus setups.

en	Automatically moves a specified item between conveyors.

en	Use this for a straightforward Bussing system.

en	Bulk Robotic Sorter

en	Allows for the fastest bus setups.

en	Automatically moves a specified item between conveyors.

en	Use this for the fastest Bussing system.

en	Intermediate Robotic Sorter

en	Allows fast bus setups.

en	Automatically moves a specified item between conveyors.

en	Use this for a straightforward Bussing system.

en	(or drag from (I)nventory)

en	ARTHER now charging {0}

en	Ray Gun V1

en	V1 Ray Guns

en	This will allow you to gently scratch the local life forms, but may be useful to clear weak, defenseless creatures. Press V to select.

en	Suit Item! You only need 1!

en	Upgraded Crystal Scanner

en	Upgraded Crystal Scanners

en	This will let you see the closest Crystal when Pinging. Press M to select.

en	Suit Item! You only need 1!

en	Advanced Crystal Scanner

en	Advanced Crystal Scanners

en	This will let you see ALL Crystals when Pinging! Press M to select.

en	Suit Item! You only need 1!

en	Mandragora Seed

en	Mandragora Seeds

en	ConstructoBot Coppator Arms

en	ConstructoBot Herb Arm

en	ConstructoBot Herb Arms

en	Room Air Scrubber

en	DON'T BOTHER BUILDING THIS YET!

en	Future machine - use this to improve the Clean rating of your room, required to hit Clean Room designation.

en	DON'T BOTHER BUILDING THIS YET!

en	ConstructoBot Herb Arm Assembler

en	Crafts ConstructoBot Herb Arms.

en	Assembles ConstructoBot Herb Arms.

en	Arms that deal with Plants.

en	Cloning Vat

en	Not relevant.

en	Place on a room to make dying more convenient.

en	Build in a 1x3x1 layout, using 3 in total.

en	SpiderCor

en	Collects nearby outdoor unharvested Plants and returns them.Needs attached storage hopper.

en	Automatically collects marked loot from FALCOR Beacons mounted on SpiderBot. Requires attached Storage Hopper.

en	Ideal for Wasp drops!

en	ConstructoBot Crate

en	A Logistics-compatible Robot in a crate!

en	S.A.R.A.H Dock

en	Place to give acces to the Storage And Retrieval Automated Hauler

en	Cloning Bay

en	Place in a room, give it power, and dying becomes less annoying.

en	Room Heater

en	Used in the Cold Cavern to reduce suit power usage.

en	Place in a Room to offset the Cold

en	Examine the Room Controller for your Room's current rating.

en	Room Cooler

en	Used in the Magma Cavern to reduce suit power usage.

en	Place in a Room to offset the Heat

en	Examine the Room Controller for your Room's current rating.

en	Room Vaporator

en	Use to increase the rate of Plant growth inside your rooms.

en	Place in a Room to increase the growth rate of Plants

en	Examine the Room Controller for your Room's current rating.

en	Imbues Lithium Coils with Energy. Feed into the SpiderBot Upgrade and Recharge Dock via a Storage Hopper.

en	SpiderBot needs energy to defend your base with.

en	Composites Coal Ore and High Energy Composite Fuel into High Octane Fuel. Build in a 3x3x3 layout.

en	Use to bore out straight tunnels

en	Scanning for items...

en	Falcor en-route!

en	No free FALCOR to collect!

en	Beacons require power to digiport items!

en	Beacons require skyclearance; please clear above the beacon!

en	Mounted on top of Storage Hopper; only Logistics FALCORs can service

en	FALCOR

en	Calculating route to Target.

en	Travelling to Target.

en	Dropping off item.

en	Collecting item.

en	No hoppers found. FALCOR cannot offload

en	All hoppers locked or full! FALCOR cannot offload

en	Press (T) to transfer [{0}]

en	Connected to host {0}

en	Survival mode server

en	Creative mode server

en	Dedicated server

en	Locally-hosted server

en	Server Uptime : {0}

en	MUST BE BUILT INSIDE A ROOM

en	Plant planted!

en	{0} grown

en	No plant detected

en	Planted!

en	Warning CryoPlasma detected at {0}m!

en	Surface Map StatusComplete

en	Surface Map StatusScanning...

en	Build a room!

en	Scanning for Room Extents...

en	Cannot locate 4 walls!

en	Cannot locate ceiling!

en	Room controller works best on the floor!

en	Ceiling too low! Is controller under something?

en	Verifying Room Requirements...

en	Located air block in wall? (Look for red error block!)

en	Rooms do not support transparent blocks! (Look for red error block!)

en	Rooms cannot have machines as walls! (Look for red error block!)

en	Inner Airlock unable to locate matching valid Outer airlock? (Look for red error block!)

en	Error: {0}

en	Room Working...

en	{0} machines inside the room!

en	Room Volume {0}m³ with {1} Fans and {2} Filters

en	Clean Rating: {0}

en	Bio-Filter Rating: {0}

en	Heat Rating: {0}

en	Cold Rating: {0}

en	Greenhouse Rating: {0}

en	No room classification found

en	Error. GeoThermal is too far from the CCCCC and cannot communicate. Maximum transmission range is 320 metres

en	AirLock

en	Airlock needs a matching pair with a gap of 3 metres in front or behind it

en	Airlock without an Room Controller owner will just open if you go near it.

en	THIS DOOR CONFERS NO PERFORMANCE BENEFIT

en	Airlock linked to RoomID {0}

en	Player Room ID {0}

en	Player AirLock ID {0}

en	Unloading {0}

en	Power Transmitted : {0} over {1}s ({2} PPS)

en	Laser has impacted wall - please re-align!

en	Laser has found nothing - please re-align!

en	Laser searching for Power Interface Consumer ({0}/{1})

en	Press E to put materials into the smelter!Or place a Hopper next to it.

en	Need more {0}!Press E to put MORE materials into the smelter!{1} ore ready for smelting!

en	Smelter heating: {0}/{1}°C

en	{0} raw {1} ready for smelting!

en	Smelting {0}. {1}% complete{2} more ore ready for smelting!

en	Power {0}% ({1}PPS)

en	Press (Q) to retrieve materials

en	Smelter is starved of oxygen!Smelter cannot function this deep!

en	Efficiency: {0} - (Q to Reset)

en	Laser Power Transmitter MK1

en	Laser Power Transmitter MK2

en	Laser Power Transmitter MK3

en	Scanning for Targets - {0} complete.

en	Destroyed {0} Blocks!

en	Shots: {0}, Kills {1}

en	(E) to have ARTHER mount!

en	Transporting everything EXCEPT {0}

en	{0} servers online

en	Version Mismatch: {0} should have been {1}

en	Server full: {0} maximum

en	Banned

en	Not Whitelisted

en	Connected to [{0}] at dist of {1}m

en	Discharging at {0}m

en	Rotating to new Direction

en	Searching for Cryo

en	Charging up system

en	Getting Ready to Fire

en	Cooling down Barrels

en	Total of {0} items needed

en	No resources in attached Hopper?

en	Attempting to drop {0} into hopper!

en	Crafted {0}

en	Cannot locate {0}x {1}

en	{0}x {1} needed

en	Found {0} of {1} items.

en	You're only allowed one CCCCC!

en	DISCONNECTED

en	Press (T) to Sort [{0}]

en	Not collecting

en	Collecting {0}

en	Spawn set!

en	{0} Power.

en	Cool. Geddit?

en	Need Carry Arms!

en	Need Herb Arms!

en	NONE

en	Req.{0}

en	Clearing!

en	Kill!

en	Boom!

en	Reloading!

en	CPH Initialising...

en	Crafting

en	Emergency Orange Light

en	Emergency Red Light

en	Emergency Strobe Light

en	Uhm... run?

en	BOSS RUSH x {0}

en	Happy Feet!

en	BUILD {0} ROBOTS!

en	Let it go...

en	The floor is now lava...

en	It's coarse and rough and irritating and it gets everywhere.

en	...if you're brave enough..

en	...don't lick it.

en	I hope you have a V2 build gun...

en	Critical Failure!

en	Epic Fail!

en	Unlucky!

en	No strong feelings one way or the other!

en	Lucky!

en	Great Success!

en	A winner is you!

en	Natural 20!

en	Perfection!

en	Chevron Radiation

en	Caution, Radiation Ahead!

en	Caution, Radiation Ahead!

en	Caution, Radiation Ahead!

en	Chevron First Aid

en	First AidKit nearby (hopefully)

en	First AidKit nearby (hopefully)

en	First AidKit nearby (hopefully)

en	Chevron Aisle Marking

en	Storage Area Closeby, Hart Hats required

en	Storage Area Closeby, Hart Hats required

en	Storage Area Closeby, Hart Hats required

en	Chevron Traffic

en	Beware of Cargohauling Equiptment

en	Beware of Cargohauling Equiptment

en	Beware of Cargohauling Equiptment

en	Chevron Defective Machinery

en	Caution, Defective Machine, handle with Care

en	Caution, Defective Machine, handle with Care

en	Caution, Defective Machine, handle with Care

en	Directional Storage Hopper

en	Error, cannot offload to MultiBlock machines!

en	Identical to a normal Storage Hopper, but can only output in one direction. Use R to rotate.

en	Stores up to 100 resources and transfers quickly. Use to automate other machines. Only outputs in one direction.

en	Use for compact setups!

en	Primary Upgrade Module Maker

en	Makes Primary Upgrade Modules

en	Makes Primary Upgrade Modules

en	Makes Primary Upgrade Modules

en	Primary Upgrade Module

en	Primary Upgrade Modules

en	Secondary Upgrade Module Maker

en	Makes Secondary Upgrade Modules

en	Makes Secondary Upgrade Modules

en	Makes Secondary Upgrade Modules

en	Secondary Upgrade Module

en	Secondary Upgrade Modules

en	Alloyed Upgrade Module Maker

en	Makes Alloyed Upgrade Modules

en	Makes Alloyed Upgrade Modules

en	Makes Alloyed Upgrade Modules

en	Alloyed Upgrade Module

en	Alloyed Upgrade Modules

en	Ultimate Upgrade Module Maker

en	Makes Ultimate Upgrade Modules

en	Makes Ultimate Upgrade Modules

en	Makes Ultimate Upgrade Modules

en	Ultimate Upgrade Module

en	Ultimate Upgrade Modules

en	Not used

en	Not used

en	Not used

en	Not used

en	Freight Cart Station

en	Supplies freight carts with designated resources as demanded by other freight stations.

en	Supplies freight network with designated resources from hoppers or mass storage.

en	Intelligent resource distribution.

en	Freight System Monitor

en	Panel for accessing information about your freight networks.

en	Displays useful information about your freight system.

en	See all the items!

en	Freight Cart Depot

en	Lanches and recalls freight carts as needed to serve freight cart stations.

en	Used to place Freight Carts onto Tracks from an attached Storage Hopper.

en	Only launches carts to stations that need them.

en	Tour Cart Station

en	Station for deploying tour carts to travel to distant locations.

en	Travel between stations automatically by rail.

en	Uses tour carts from your inventory or an accessible hopper.

en	Track Junction

en	Allows Freight Carts to travel multiple directions.

en	A track piece that allows carts to travel multiple directions.

en	Travel the world!

en	Scrap Track Junction

en	Allows Freight Carts to travel multiple directions at low speeds.

en	A track piece that allows carts to travel multiple directions at low speeds.

en	Travel the World!

en	Scrap Track Straight

en	Allows freight carts to travel in a straight line at low speeds.

en	A simple, low speed straight track piece for freight carts.

en	Scrap Track Corner

en	Allows freight carts to travel around corners at low speeds.

en	A simple, low speed corner track piece for freight carts.

en	Scrap Track Slope

en	Allows freight carts to travel up and down slopes at low speeds.

en	A simple, low speed inclined track piece for freight carts.

en	Scrap One Way Track

en	Directs Freight Carts in one direction at low speeds.

en	A directional, low speed straight track piece for freight carts.

en	Prevent collisions by directing cart traffic.

en	One Way Track

en	Directs Freight Carts in one direction

en	A directional straight track piece.

en	Prevent collisions by directing cart traffic.

en	Scrap Freight Cart

en	Scrap Freight Carts

en	Low-speed cart with 5 capacity, designed for transporting all items.

en	Gets items where they're needed... slowly

en	Scrap Ore Freighter

en	Scrap Ore Freighters

en	Low-speed cart with capacity for 25 ore

en	Gets items where they're needed... slowly

en	Basic Ore Freighter

en	Basic Ore Freighters

en	Freight cart with 125 Ore Capacity.

en	Can only carry one kind of ore at once.

en	Fast Ore Freighter

en	Fast Ore Freighters

en	Fast Freight cart with 125 Ore Capacity.

en	Can only carry one kind of ore at once.

en	Large Ore Freighter

en	Large Ore Freighters

en	Freight cart with 250 Ore Capacity.

en	Can only carry one kind of ore at once.

en	Bulk Ore Freighter

en	Bulk Ore Freighters

en	Fast Freight cart with 250 Ore Capacity.

en	Can only carry one kind of ore at once.

en	Basic Tour Cart

en	Basic Tour Carts

en	Travel by way of Tour Cart Stations.

en	Functions only with Tour Cart Stations.

en	ERROR: No valid track connection found!

en	No filled hoppers found

en	No valid deposit hoppers

en	No valid return path to this depot

en	No valid outgoing track connection

en	All station cart assignments are satisfied

en	1 station requires carts

en	{0} stations require carts

en	Cart found does not meet station requirements

en	No suitable cart found for station {0}

en	Station Accepts {0}

en	Depot is currently blocked

en	Illegal placement! Carts cannot drive up walls!

en	No work for station {0}

en	Freight Cart Station ({0})

en	Freight Cart Station (ID: {0})

en	NO NETWORK

en	Press E to configure this station

en	This station is fully stocked!

en	Top requests for this station:

en	This station has nothing to offer!

en	Top offers from this station:

en	Press (T) to transfer [{0}]

en	Freight Cart Station {0} could not deposit item into storage. Storage is full.

en	Any

en	T2/T3+

en	T4 only

en	Ore Freighters Only

en	T2/T3+ Ore Freighters

en	T4 Ore Freighters

en	No Ore Freighters

en	No Scrap Carts

en	Station cannot find hopper or mass storage

en	No where to offload excess {0}!

en	Traveling to {0}

en	Returning to depot

en	Ore Freighter Idling

en	Cannot find a depot to park

en	Offloading excess freight

en	Station {0} is full

en	Cannot route to station {0}

en	Press E to access Freight System Status

en	Location: {0}

en	Press E to access the list of destinations

en	Press E to set this location's name

en	{0} Tour Carts available

en	Track Network ID: {0}

en	No demand for offered {0}

en	No source for requested {0}

en	Track Junction (ID: {0})

en	{0} valid track connections

en	Track lengths: {0}

en	Press Q to reset the junction

en	No valid track connections detected

en	Locations: {0}

en	Set Name

en	Enter Station Name

en	Select Tour Cart Destination

en	Change Name

en	Add Additional Tour Cart Stations

en	to Track Network

en	Connect Tour Cart Station to

en	a Freight Track Network

en	Set Network

en	Enter Network ID

en	Set Mass Storage Name

en	Enter Storage Name

en	Name

en	Network

en	No Storage

en	Name Storage

en	Set Freight

en	Cart Assignment

en	Add Cart

en	Remove Cart

en	Active / Requested

en	Wait for {0}

en	Load Orders

en	Cart Filter

en	Register Freight

en	Done

en	Add New Freight

en	Target Stock:

en	Decrease Stock

en	Increase Stock

en	Help

en	Waiting for server...

en	Servicing freight for:

en	Item to Stock

en	Or select existing

en	Freight Config Help

en	Close

en	This example shows a simple manufacturing station for tin goods. Tin bars are supplied and tin plates and lightweight machine housings are shipped out.

en	Target inventory is set to 200 for tin bars to have carts bring enough to the station to keep plenty on hand for crafting into higher tier components.

en	Tin plates are stocked at a lesser quantity as some are needed available to convert to housings.

en	Lightweight machine housings target of 0 allows carts to take all of them for distribution to other stations as none are required on hand for further processing.

en	Handbook

en	See the handbook for additional details.

en	Connect to freight provider

en	Connect Station to Mass Storage

en	Last Network

en	All Inventory

en	Select Network

en	Transport Grid

en	View Inventory

en	Next Network

en	Viewing status of freight network:

en	Surplus

en	Deficit

en	In Transit

en	Inventory

en	No freight networks found...

en	Network Status

en	No transport grid found...

en	(Click to expand)

en	ID: {0} {1} Locations

en	Carts: {0} / {1}

en	Name - Network ID {0} cart en route

en	Name - Network ID {0} carts en route

en	Inventory: {0} / {1}

en	Estimated arrival in {0} seconds

en	Loading at station '{0}'

en	Unloading at station '{0}'

en	Travelling to station '{0}'

en	Idling at '{0}'

en	Awaiting clear path to '{0}'

en	Inventory is empty

en	Order by Count

en	Order by Name

en	Last Storage

en	Next Storage

en	Viewing inventory of mass storage:

en	Freight status help {0} / {1}

en	Next Page

en	Last Page

en	Surplus is the sum of the excess items in storage above the stations' target inventory. It indicates how much is available for carts to collect for delivery.

en	Deficit is the sum required to safisfy all stations' inventory targets. It indicates how much must be delivered to satisfy all stations.

en	Inventory is the sum of the item that is found across all storage containers that is associated with this freight network.

en	In transit quantity is the sum of the item that carts are currently carrying for delivery. Carts never collect more than is required to satisfy the deficit.

en	This example shows healthy status for a particular item on the freight network.

en	The deficit implies the item is needed but a healthy surplus will more than cover for the total demand.

en	Current quantity in transit shows that several carts are at work to meet the demand.

en	Surplus and deficit are color coded to provide the relative health of the system at a glance.

en	A low surplus may lead to a hold in deliveries due to a supply shortage as the deficit (demand) exceeds available plates.

en	The inventory is fairly healthy so it may be possible to decrese the supply storage's target inventory to inject extra in an emergency.

en	If the surplus remains low it may be time to increase production.

en	Stations appear to both offer and request goods on this network but no goods are in transit. Why might this be?

en	Carts must be assigned to stations for depots to send carts to work. Carts in the depots must also satisfy any filter for the cart assignment.

en	Depots will indicate what is required to send another cart or whether station needs are all satisfied.

en	If carts are assigned they will indicate with a red flashing light if they cannot find a path to their target.

en	Carts will only collect as much as the current deficit to avoid having excess that is not needed.

en	This can slow transfer of items between stations as additional carts will not be able to collect any more items.

en	Increasing a station's target inventory will increase the deficit and the maximum number of items that can be trasnferred at once.

en	A larger target inventory at the destination also provides a bigger buffer to allow time for carts to make further deliveries.

en	CryoInferno

en	Searching for CryoInferno...

en	Build a CryoInferno!

en	Out of Magma!

en	Can't see Spawner!

en	Burning CryoSpawner!

en	No CryoSpawner in range.

en	Please Purchase the Adventures Pack to continue!

en	Build the Orbital Railgun!

en	Orbital Railgun

en	Kill all CryoSpawners and Surface Mobs!

en	Verifying Clearance

en	Looking for Tube Resources!

en	Building Tube.

en	Waiting for Charge...

en	Waiting for Mass...

en	Firing!

en	Looking to offload!

en	Ready for firing.

en	Eliminate all the Cryo-Spawners.

en	Build Orbital Railgun to launch GPS satellite.

en	Buy The Adventures Pack to continue!

en	Choose an experiment!

en	Press H for Help.

en	GPS : Offline.

en	Basic Conveyor(Clockwise)

en	The same as Basic Conveyors, only prettier.

en	Convert a Straight Basic Conveyor into a Corner Conveyor.

en	Vulnerable to extreme cold!

en	Basic Conveyor(CounterClockwise)

en	The same as Basic Conveyors, only prettier.

en	Convert a Straight Basic Conveyor into a Corner Conveyor.

en	Vulnerable to extreme cold!

en	Conveyor(Clockwise)

en	The same as Basic Conveyors, only prettier.

en	Convert a Straight Conveyor into a Corner Conveyor.

en	Vulnerable to extreme cold!

en	Conveyor(CounterClockwise)

en	The same as Basic Conveyors, only prettier.

en	Convert a Straight Conveyor into a Corner Conveyor.

en	Vulnerable to extreme cold!

en	Chevron Danger

en	Use this to mark off dangerous areas.

en	Caution : Uses up 1 Constructionpaste!

en	Rainbow Anti-Grav Lift

en	And UP you GO!

en	Slow and efficient vertical transport. Stand in it and press Space.

en	Requires the Dapper DLC pack!

en	Techno Anti-Grav Lift

en	And UP you GO!

en	Slow and efficient vertical transport. Stand in it and press Space.

en	Requires the Frozen Factory DLC pack!

en	Predator Anti-Grav Lift

en	And UP you GO!

en	Slow and efficient vertical transport. Stand in it and press Space.

en	Requires the Adventures DLC pack!

en	Basic Conveyor Crafter

en	Turns 1 Copper Bar into 15 Basic Conveyors.

en	Conveyor-based machine for automatically converting Bars into plates. Does not require external power.

en	A useful start when automating

en	Conveyor Crafter

en	Upcrafts Basic Conveyors into faster Conveyors using Tin Plates and Copper Wire.

en	Conveyor-based machine for automatically upcrafting Basic Conveyors into faster Conveyors Belts. This is best configured with 3x hoppers for input, and 1x Conveyor belt for the output.

en	Automated Crafting is more efficient than hand-crafting.

en	ScrapTrack Crafter

en	Builds cheap but slow ScrapTrack.

en	Crafts Straight ScrapTracks

en	Minecart Track Crafter

en	Upcrafts ScrapTrack Rails into into faster Minecart Track Trails.

en	Upcrafts Straight Minecart Tracks from older ScrapTracks.

en	Gold Foil

en	Flattened Piece of Gold Wire

en	Flattened Piece of Gold Wire

en	Flattened Piece of Gold Wire

en	Gold Foil Crafter

en	Turns 5 Gold Wire into 1 Gold Foil.

en	A machine that supports autocrafting of Gold Wire into useful Gold Foil.

en	Don't think about it too much.

en	Titanium Housing Crafter

en	Turns 6 plates into 1 Housing.

en	A machine that supports autocrafting of Titanium Plates into Titanium Machine Housings.

en	Much more efficient than doing it by hand!

en	Suit Beacon

en	Marks the Location of your Death

en	Very obvious when dropped. Designed for Boy Scouts in Clumsy Mode.

en	#AlwaysBePrepared

en	Bulk Gas Freighter

en	Small Gas Storage on Wheels

en	Fast Freight cart with 500 Gas Capacity.

en	Can only carry one kind of gas at once.

en	Precision Alloy Machine Block Assembler

en	Uses an alternate method of creating Alloyed Machine Blocks, more useful for certain base setups.

en	Crafts Alloyed Blocks from T2 crafting Materials.

en	These are used extensively, and it is highly recommended you automate these!

en	Left-Ctrl - Super-Building

en	Your BuildGun allows you to create straight runs of machines. This technique will make connecting your base up via Conveyor Belts much easier.Super-Building a Conveyor touching an existing Conveyor will 'copy' its forward direction.Revisit the Video Tutorial on SuperBuild if you get stuck!

en	SuperBuild at least {0} more blocks.

en	Basic Manufacturing Plants allow automated crafting to complete a manufacturing line.

en	Does not support manual crafting.

en	
fi	Ivy_DESC