en	Greetings! Your language is only partially-supported. If you want to revert to English, then just press 'English' below!
nl	Gegroet! Jouw taal is slechts gedeeltelijk ondersteund. Als je terug wil gaan naar Engels, druk dan beneden op 'Engels'!

en	Translation Incomplete!
nl	Vertaling incompleet!

en	English
nl	Dutch

en	Frozen Factory
nl	Bevroren Fabriek

en	Dapper Pack
nl	Dapper Pakket

en	Skin Pack
nl	Skin Pakket

en	Installed
nl	Geïnstalleerd

en	Not Installed
nl	Niet Geïnstalleerd

en	<Multiplayer
nl	<Meerdere spelers

en	Quit
nl	Stoppen

en	World Select
nl	Wereld Selecteren

en	Create World
nl	Wereld Maken

en	Spacebar
nl	Spatiebalk

en	Resource Level
nl	Grondstoffen Niveau

en	Power Level
nl	Energie Niveau

en	Conveyor Speed
nl	Snelheid Transportband

en	Day/Night Cycle
nl	Dag/Nacht Cyclus

en	Mob Difficulty
nl	Moeilijkheid Monsters

en	Death Mode
nl	Dodelijkheids Modus

en	Rush Mode
nl	Snelle Modus

en	Flatland
nl	Vlak land

en	Care Package
nl	Zorg Pakket

en	Survival Options
nl	Overlevings Opties

en	Seed

en	Modes
nl	Modus

en	Select Mods
nl	Selecteer Mods

en	Back
nl	Terug

en	Mutators
nl	Mutatoren

en	Enter World
nl	Ga Wereld Binnen

en	Reset World
nl	Reset Wereld

en	Creative Mode gives you an unlimited ability to build anything, high-resolution detail blocks, extensive world editing tools, schematics, blueprints and copy-paste systems. It does not feature most of the survival elements, and should not be thought of as a 'cheat mode' for Survival!
nl	Creatieve Modus geeft je een ongelimiteerde kans om alles te bouwen, hoge-resolutie gedetailleerde blokken, uitgebreide tools on de wereld te veranderen, schema's, blauwdrukken en kopieër en plak systemen. Het heeft de meeste elementen van overleving niet, en zou niet moeten worden beschouwt als 'cheat modus' voor Overleving!

en	This is an existing Creative world, but, sadly, I don't have cool stats to really show you here. Would you like a picture of a cat instead?
nl	Dit is een al bestaande Creatieve wereld, maar, treurig, heb ik niet coole statestieken om je te laten zien hier. Zou je anders een plaatje van een kat willen zien?

en	Mod Management
nl	Mod Beheren

en	Mod Name
nl	Mod Naam

en	Active
nl	Actief

en	Version
nl	Versie

en	Lock
nl	Blokeer

en	Status

en	Workshop
nl	Werkplaats

en	Workshop Mod
nl	Werkplaats Mod

en	Update Pending
nl	Update komt eraan

en	Downloading
nl	Aan Het Downloaden

en	On
nl	Aan

en	Off
nl	Uit

en	Locked
nl	Geblokeerd

en	Resources

en	Plentiful
nl	Overvloedig

en	Scarce
nl	Schaars

en	Greg

en	Rapid
nl	Zeer Snel

en	Fast
nl	Snel

en	Slow
nl	Langzaam

en	Eternal Day
nl	Altijd Dag

en	Normal
nl	Normaal

en	Eternal Night
nl	Altijd Nacht

en	Trivial Mobs
nl	Makkelijke Monsters

en	Normal Mobs
nl	Normale Monsters

en	Hard Mobs
nl	Moeilijke Monsters

en	None
nl	Geen

en	Clumsy
nl	Onhandig

en	Iron Man

en	SquishCore

en	Hardcore
nl	Heel moeilijk

en	Survival
nl	Overleving

en	Creative
nl	Creatief

en	Default settings are set to be super-fast and super-easy for new players! If you want it even FASTER, choose Eternal Day for Day/Night Cycle. If you want more of a challenge, then fiddle with these settings to your heart's content! Remember these settings are LOCKED for the duration of your world and take note of the par times!
nl	De standaard instellingen staan op super-snel en super-makkelijk voor nieuwe spelers! Als je het nog SNELLER wil, moet je kiezen voor Altijd dag voor Dag/Nacht cyclus. Als je het moeilijker wilt, klooi met de instelling zoals jouw hart dat wil.Onthoud deze instellingen zijn vast op de duratie van je wereld en onthoud de ... tijden!

en	You've been in this Survival world before!
nl	Je bent al eerder in deze Overlevingswereld geweest!

en	Play time
nl	Speeltijd

en	mod selected.
nl	mod geselecteerd.

en	mods selected.
nl	mods geselecteerd.

en	Existing Seed
nl	Bestaande Seed

en	Plentiful Resources will give you plenty of resources, and will massively accelerate your early and late-game progression. This is a good starting point for patient, beginner players.

en	Scarce Resources will give you a slower, more thoughtful game, with plenty of time to explore and optimise your base. Not recommended for beginner players!

en	Greg-level Resources will massively reduce your rate of progression. This is balanced for 24/7 dedicated multiplayer servers or VERY patient people!

en	Rapid Resources is designed for those in a hurry, with children, jobs, or attempting to stream the game in a weekend! This is also an excellent place if you're looking to learn the game quickly before returning on a harder difficulty.

en	Slow Conveyors are well-balanced, and emphasise higher-tier conveyance system. This setting will make your progression greatly slower.

en	Fast Conveyors mean less waiting around. They're about twice as fast as Slow.

en	Plentiful Power gives greatly improved energy collection from all power generators. This will greatly affect the speed of early-game progress.

en	Scarce Power gives a balanced power generation. This will slow down early-game progression.

en	Eternal Day means that your Solar collection systems will work constantly and you do not suffer from a temperature drop at night. Choosing this will allow much faster progression - average Solar Collection is 4x faster!

en	Normal Day/Night cycle is 24 minutes. For the 12 minutes of darkness you will suffer from extreme temperature drops, increased mob aggression and reduced visibility.

en	Eternal Night means no respite from the freezing cold during the day, and no access to non-organic solar technology; including your CPH. This will prove to be a significant challenge.

en	This is the default mode. There is no penalty for death, barring low health and a long walk. This makes the game extremely easy, as there's no penalty for any of the exciting ways in which you can die.

en	Clumsy mode is recommended if you want a reasonable challenge, and a good reason for not dying! You will drop the contents of your inventory on death!

en	NOT FOR BEGINNERS!Iron Man is only for the brave, the stupid and the bold; you permanently LOSE your entire inventory on death!

en	NOT RECOMMENDED FOR ANYONE! SquishCore is simple; you die, you stay dead

en	NOT RECOMMENDED FOR ANYONE! Hardcore is the hardest mode; If you die, or your CPH dies, it's permanent game over! Your CPH also does not heal.

en	The Care Package will be unlocked once you have successfully built a Climate Control Centre.

en	Care Package disabled.
nl	Zorgpakket Niet Actief.

en	Care Package Enabled! This will give you a massive headstart into a new world, giving you a MK3 build gun, larger suit battery, solar panel and a suit heater right at the start. Go get 'em boy.

en	Flat Land mode will be unlocked once you have successfully killed a CryoPlasm Spawner.

en	Flat Mode disabled.

en	Flat Land Enabled! Makes the land flat, hence the name!

en	Requires the Frozen Factory Expansion Pack.

en	Rush Mode will be unlocked once you have successfully charged an Orbital Energy Transmitter.

en	Rush Mode disabled.

en	Rush Mode Enabled! This mode challenges you to rebuild another Orbital Energy Transmitter and fully charge it in the minimum amount of time! Selecting this mode will scale up the Power Generation by around 10x and Ore Collection and Smelting are 5x faster. Mobs also spawn much faster too...

en	Trivial Mobs is not recommended. Mobs still exist to allow full progression, but will pose no challenge, and this is opting out of a large part of the gameplay. You will get reduced Base Threat and reduced spawn rates on Hiveminds and other base-interfering mobs

en	Normal Mobs - this is where it's at. Good choice!

en	Hard Mobs - choose this and you will be dealing with much harder, more aggressive mobs. This is ONLY for VERY experienced players!

en	Orbital Charge Par time
nl	Orbitale Lading Deeltijd

en	Frozen Factory Par time
nl	Bevroren Fabriek Deeltijd

en	hours
nl	uren

en	Server Name
nl	Naam Server

en	Server Management
nl	Serverbeheer

en	Game Mode
nl	Spelmodus

en	Dedicated
nl	Toegewijd

en	Players
nl	Spelers

en	Ping

en	Hide Host Address
nl	Verberg Hostadres

en	Host Address
nl	Hostadres

en	Unable to join
nl	Onmogelijk te bereiken

en	Join
nl	Meedoen

en	Edit
nl	Bewerk

en	Delete
nl	Verwijder

en	Add New
nl	Voeg Nieuw Toe

en	Mods

en	Page
nl	Pagina

en	SERVER NAME

en	SERVER MANAGEMENT

en	GAME MODE

en	HIDE HOST ADDRESS

en	HOST ADDRESS

en	PLAYERS

en	PING

en	Iron Bar
nl	Ijzeren Staaf

en	Iron Bars
nl	Ijzeren Staven

en	MK1 Power Booster
nl	MK1 Energie Booster

en	MK1 Power Boosters
nl	MK1 Energie Boosters

en	MK2 Power Booster
nl	MK2 Energie Booster

en	MK2 Power Boosters
nl	MK2 Energie Boosters

en	MK3 Power Booster
nl	MK3 Energie Booster

en	MK3 Power Boosters
nl	MK3 Energie Boosters

en	MK4 Power Booster
nl	MK4 Energie Booster

en	MK4 Power Boosters
nl	MK4 Energie Boosters

en	MK5 Power Booster
nl	MK5 Energie Booster

en	MK5 Power Boosters
nl	MK5 Energie Boosters

en	Copper Bar
nl	Koperen Staaf

en	Copper Bars
nl	Koperen Staven

en	Lithium Bar
nl	Lithium Staaf

en	Lithium Bars
nl	Lithium Staven

en	Chromium Bar
nl	Chromen Staaf

en	Chromium Bars
nl	Chromen Staven

en	Molybdenum Bar
nl	Molybdenen Staaf

en	Molybdenum Bars
nl	Molybdenen Staven

en	Plastic Pellet

en	Plastic Pellets

en	High Energy Composite Fuel
nl	Hoog Energetische Samengestelde Brandstof

en	Empty Metal Tube
nl	Lege Metalen Buis

en	Empty Metal Tubes
nl	Lege Metalen Buizen

en	Empty Fuel Canister
nl	Lege Brandstoftank

en	Empty Fuel Canisters
nl	Lege Brandstoftanks

en	High Octane Fuel
nl	Hoge Octaanbrandstof

en	Gold Bar
nl	Gouden Staaf

en	Gold Bars
nl	Gouden Staven

en	Tin Bar
nl	Tinnen Staaf

en	Tin Bars
nl	Tinnen Staven

en	Nickel Bar
nl	Nikkelen Staaf

en	Nickel Bars
nl	Nikkelen Staven

en	Titanium Bar
nl	Titanium Staaf

en	Titanium Bars
nl	Titanium Staven

en	Low Grade Steel Bar
nl	Laagwaardige Stalen Staaf

en	Low Grade Steel Bars
nl	Laagwaardige Stalen Staven

en	Steel Ball Bearing
nl	Stalen Kogellager

en	Steel Ball Bearings
nl	Stalen Kogellagers

en	Power Coil
nl	Energiespoel

en	Iron Gear
nl	Ijzeren Tandwiel

en	Iron Gears
nl	Ijzeren Tandwielen

en	Copper Wire (Old)
nl	Koperen Draad (Oud)

en	Servo Motor
nl	Servomotor

en	Servo Motors
nl	Servomotoren

en	Lightweight Machine Plate
nl	Lichtgewicht Machineplaat

en	Lightweight Machine Plates
nl	Lichtgewicht Machineplaten

en	Lightweight Machine Housing
nl	Lichtgewicht Machinebehuizing

en	Lightweight Machine Housings
nl	Lichtgewicht Machinebehuizingen

en	Basic Minecart
nl	Eenvoudige Mijnkar

en	Basic Minecarts
nl	Eenvoudige Mijnkarren

en	Fast Minecart
nl	Snelle Mijnkar

en	Fast Minecarts
nl	Snelle Mijnkarren

en	Large Minecart
nl	Grote Mijnkar

en	Large Minecarts
nl	Grote Mijnkarren

en	Bulk Minecart
nl	Massale Mijnkar

en	Bulk Minecarts
nl	Massale Mijnkarren

en	Tour Cart
nl	Tourkarretje

en	Tour Carts
nl	Tourkarretjes

en	Copper Wire
nl	Koperen Draad

en	Copper Wires
nl	Koperen Draden

en	Tin Wire
nl	Tinnen Draad

en	Tin Wires
nl	Tinnen Draden

en	Iron Wire
nl	Ijzeren Draad

en	Iron Wires
nl	Ijzeren Draden

en	Lithium Wire
nl	Lithium Draad

en	Lithium Wires
nl	Lithium Draden

en	Gold Wire
nl	Gouden Draad

en	Gold Wires
nl	Gouden Draden

en	Nickel Wire
nl	Nikkelen Draad

en	Nickel Wires
nl	Nikkelen Draden

en	Titanium Wire
nl	Titanium Draad

en	Titanium Wires
nl	Titanium Draden

en	Steel Cutter Head
nl	Stalen Snijkop

en	Crystal Cutter Head
nl	Kristallen Snijkop

en	Organic Cutter Head
nl	Organische Snijkop

en	Plasma Cutter Head
nl	Plasma Snijkop

en	Location Marker
nl	Plaatsmarkering

en	Glow Stick
nl	Gloedstok

en	Glow Sticks
nl	Gloedstokken

en	Chargeable Explosive
nl	Oplaadbaar Explosief

en	Chargeable Explosives
nl	Oplaadbare Explosieven

en	Blank Ore Ping
nl	Blanco Ertsping

en	Blank Ore Pings
nl	Blanco Ertspingen

en	Coal Ping
nl	Kolen Ping

en	Coal Pings
nl	Kolen Pingen

en	Iron Ore Ping
nl	Ijzererts Ping

en	Iron Ore Pings
nl	Ijzererts Pingen

en	Copper Ore Ping
nl	Kopererts Ping

en	Copper Ore Pings
nl	Kopererts Pingen

en	Tin Ore Ping
nl	Tinerts Ping

en	Tin Ore Pings
nl	Tinerts Pingen

en	Lithium Ore Ping
nl	Lithiumerts Ping

en	Lithium Ore Pings
nl	Lithiumerts Pingen

en	Gold Ore Ping
nl	Gouderts Ping

en	Gold Ore Pings
nl	Gouderts Pingen

en	Nickel Ore Ping
nl	Nikkelerts Ping

en	Nickel Ore Pings
nl	Nikkelerts Pingen

en	Titanium Ore Ping
nl	Titaniumerts Ping

en	Titanium Ore Pings
nl	Titaniumerts Pingen

en	Crystal Deposit Ping
nl	Krystal Storting Ping

en	Crystal Deposit Pings
nl	Krystal Storting Pings

en	Biomass Ping

en	Biomass Pings

en	Resin Ping
nl	Hars Ping

en	Resin Pings
nl	Hars Pingen

en	Chromium Ping
nl	Chroom Ping

en	Chromium Pings
nl	Chroom Pingen

en	Molybdenum Ping
nl	Molybdeen Ping

en	Molybdenum Pings
nl	Molybdeen Pingen

en	Basic Experimental Pod
nl	Eenvoudige Experimentele Pod

en	Basic Experimental Pods
nl	Eenvoudige Experimentele Pods

en	Simplified Experimental Pod
nl	Vereenvoudigde Experimentele Pod

en	Simplified Experimental Pods
nl	Vereenvoudigde Experimentele Pods

en	Intermediate Experimental Pod
nl	Tussenliggende Experimentele Pod

en	Intermediate Experimental Pods
nl	Tussenliggende Experimentele Pods

en	Charged Experimental Pod

en	Charged Experimental Pods

en	Advanced Experimental Pod
nl	Geavanceerde Experimentele Pod

en	Advanced Experimental Pods
nl	Geavanceerde Experimentele Pods

en	XL Experimental Pod
nl	XL Experimentele Pod

en	XL Experimental Pods
nl	XL Experimentele Pods

en	Ultimate Experimental Pod
nl	Ultieme Experimentele Pod

en	Ultimate Experimental Pods
nl	Ultieme Experimentele Pods

en	Copper Coil
nl	Koperen Spoel

en	Copper Coils
nl	Koperen Spoelen

en	Tin Coil
nl	Tinnen Spoel

en	Tin Coils
nl	Tinnen Spoelen

en	Iron Coil
nl	Ijzeren Spoel

en	Iron Coils
nl	Ijzeren Spoelen

en	Gold Coil
nl	Gouden Spoel

en	Gold Coils
nl	Gouden Spoelen

en	Lithium Coil
nl	Lithium Spoel

en	Lithium Coils
nl	Lithium Spoelen

en	Nickel Coil
nl	Nikkelen Spoel

en	Nickel Coils
nl	Nikkelen Spoelen

en	Titanium Coil
nl	Titanium Spoel

en	Titanium Coils
nl	Titanium Spoelen

en	Copper Plate
nl	Koperen Plaat

en	Copper Plates
nl	Koperen Platen

en	Tin Plate
nl	Tinnen Plaat

en	Tin Plates
nl	Tinnen Platen

en	Iron Plate
nl	Ijzeren Plaat

en	Iron Plates
nl	Ijzeren Platen

en	Gold Plate
nl	Gouden Plaat

en	Gold Plates
nl	Gouden Platen

en	Lithium Plate
nl	Lithium Plaat

en	Lithium Plates
nl	Lithium Platen

en	Nickel Plate
nl	Nikkelen Plaat

en	Nickel Plates
nl	Nikkelen Platen

en	Titanium Plate
nl	Titanium Plaat

en	Titanium Plates
nl	Titanium Platen

en	Copper Housing
nl	Koperen Behuizing

en	Copper Housings
nl	Koperen Behuizingen

en	Tin Housing
nl	Tinnen Behuizing

en	Tin Housings
nl	Tinnen Behuizingen

en	Iron Housing
nl	Ijzeren Behuizing

en	Iron Housings
nl	Ijzeren Behuizingen

en	Lithium Housing
nl	Lithium Behuizing

en	Lithium Housings
nl	Lithium Behuizingen

en	Gold Housing
nl	Gouden Behuizing

en	Gold Housings
nl	Gouden Behuizingen

en	Titanium Housing
nl	Titanium Behuizing

en	Titanium Housings
nl	Titanium Behuizingen

en	Nickel Housing
nl	Nikkelen Behuizing

en	Nickel Housings
nl	Nikkelen Behuizingen

en	Basic PCB
nl	Eenvoudige PCB

en	Basic PCBs
nl	Eenvoudige PCB's

en	Primary PCB
nl	Primaire PCB

en	Primary PCBs
nl	Primaire PCB's

en	Hardened PCB
nl	Geharde PCB

en	Hardened PCBs
nl	Geharde PCB's

en	Conductive PCB
nl	Geleidende PCB

en	Conductive PCBs
nl	Geleidende PCB's

en	Charged PCB
nl	Geladen PCB

en	Charged PCBs
nl	Geladen PCB's

en	Fortified PCB
nl	Versterkte PCB

en	Fortified PCBs
nl	Versterkte PCB's

en	Lightweight PCB
nl	Lichtgewicht PCB

en	Lightweight PCBs
nl	Lichtgewicht PCB's

en	Copper Pipe
nl	Koperen Buis

en	Copper Pipes
nl	Koperen Buizen

en	Tin Pipe
nl	Tinnen Buis

en	Tin Pipes
nl	Tinnen Buizen

en	Iron Pipe
nl	Ijzeren Buis

en	Iron Pipes
nl	Ijzeren Buizen

en	Gold Pipe
nl	Gouden Buis

en	Gold Pipes
nl	Gouden Buizen

en	Lithium Pipe
nl	Lithium Buis

en	Lithium Pipes
nl	Lithium Buizen

en	Nickel Pipe
nl	Nikkelen Buis

en	Nickel Pipes
nl	Nikkelen Buizen

en	Titanium Pipe
nl	Titanium Buis

en	Titanium Pipes
nl	Titanium Buizen

en	Crystal Fiber Mesh
nl	Kristallen Vezelgaas

en	Crystal Fiber Meshes
nl	Kristallen Vezelgazen

en	Crystal Clock
nl	Kristallen Klok

en	Crystal Clocks
nl	Kristallen Klokken

en	Overclocked Crystal Clock
nl	Overgeklokte Kristallen Klok

en	Overclocked Crystal Clocks
nl	Overgeklokte Kristallen Klokken

en	Basic Cargo Lift
nl	Eenvoudige Goederenlift

en	Basic Cargo Lifts
nl	Eenvoudige Goederenliften

en	Improved Cargo Lift
nl	Verbeterde Goederenlift

en	Improved Cargo Lifts
nl	Verbeterde Goederenliften

en	Bulk Cargo Lift
nl	Massale Goederenlift

en	Bulk Cargo Lifts
nl	Massale Goederenliften

en	Solar Cell MK1
nl	Zonnecel MK1

en	Suit Cooler MK1
nl	Pakkoeler MK1

en	Suit Heater MK1
nl	Pakverwarmer MK1

en	Suit Headlight MK1
nl	Paklamp MK1

en	Suit Headlights MK1
nl	Paklampen MK1

en	Suit Power Pack MK1
nl	Pak Power Pack MK1

en	Suit Power Packs MK1
nl	Pak Power Packs MK1

en	Suit Build Module MK1
nl	Pak Bouwmodule MK1

en	Suit Build Modules MK1
nl	Pak Bouwmodules MK1

en	Suit Collection Module MK1
nl	Pak Verzamelmodule MK1

en	Suit Collection Modules MK1
nl	Pak Verzamelmodules MK1

en	Suit Insulation MK1
nl	Pak Isolatiemodule MK1

en	Suit Insulation Modules MK1
nl	Pak Isolatiemodules MK1

en	Build Gun V2
nl	Bouwgeweer V2

en	V2 Build Guns
nl	Bouwgeweren V2

en	Jet Pack
nl	Jetpack

en	Jet Packs
nl	Jetpacks

en	Toxic Particle Filter
nl	Giftige Deeltjesfilter

en	Toxic Particle Filters
nl	Giftige Deeltjesfilters

en	Build Gun V3
nl	Bouwgeweer V3

en	V3 Build Guns
nl	Bouwgeweren V3

en	MK1 Suit Upgrade Module
nl	MK1 Pak Uitbreidingsmodule

en	MK1 Suit Upgrade Modules
nl	MK1 Pak Uitbreidingsmodules

en	Suit Power Pack MK2
nl	Pak Power Pack MK2

en	Suit Power Packs MK2
nl	Pak Power Packs MK2

en	ARTHER Power Core
nl	ARTHER Krachtkern

en	ARTHER Power Cores
nl	ARTHER Krachtkernen

en	ARTHER Solar Panel

en	ARTHER Power Panel

en	ARTHER Battery Core

en	ARTHER Battery Cores

en	ARTHER Upgrade Pack

en	ARTHER Upgrade Packs

en	ARTHER Dapper Hat

en	ARTHER Dapper Hats

en	ARTHER Dapper Monocle

en	ARTHER Dapper Monocles

en	ARTHER Dapper Moustache

en	ARTHER Dapper Moustaches

en	ARTHER Dapper Pack

en	ARTHER Dapper Packs

en	ARTHER Dapper Upgrade Pack

en	ARTHER Dapper Upgrade Packs

en	ARTHER Ghost Costume

en	ARTHER Ghost Costumes

en	ARTHER Skeleton Mask

en	ARTHER Skeleton Masks

en	ARTHER Pumpkin Mask

en	ARTHER Pumpkin Masks

en	ARTHER Ghost Mask

en	ARTHER Ghost Masks

en	ARTHER Goblin Mask

en	ARTHER Goblin Masks

en	ARTHER Santa Mask

en	ARTHER Santa Masks

en	SpiderBot Blaster

en	SpiderBot Blasters

en	SpiderBot Cannon

en	SpiderBot Cannons

en	SpiderBot Particle Rifle

en	SpiderBot Particle Rifles

en	Charged Lithium Coil

en	Charged Lithium Coils

en	Basic Drill Motor

en	Basic Drill Motors

en	Enhanced Drill Motor

en	Enhanced Drill Motors

en	Magnetic Drill Motor

en	Magnetic Drill Motors

en	Fusion Drill Motor

en	Fusion Drill Motors

en	Antimatter Drill Motor

en	Antimatter Drill Motors

en	Diamond Focusing Lens

en	Diamond Focusing Lenses

en	Emerald Focusing Lens

en	Emerald Focusing Lenses

en	Ruby Focusing Lens

en	Ruby Focusing Lenses

en	Sapphire Focusing Lens

en	Sapphire Focusing Lenses

en	Topaz Focusing Lens

en	Lentilles de focalisation Topaz =

en	Sugalite Focusing Lens

en	Sugalite Focusing Lenses

en	Crude Organic Lens

en	Crude Organic Focusing Lenses

en	Organic Lens

en	Organic Focusing Lenses

en	Exceptional Organic Lens

en	Exceptional Organic Focusing Lenses

en	Polished Chrome Lens

en	Polished Chrome Lenses

en	Unfocused Polished Lens

en	Unfocused Polished Lenses

en	Magnetic Machine Block

en	Magnetic Machine Blocks

en	Chromed Machine Block

en	Chromed Machine Blocks

en	Hiemal Machine Block

en	Hiemal Machine Blocks

en	Alloyed Machine Block

en	Alloyed Machine Blocks

en	Hardened Machine Block

en	Hardened Machine Blocks

en	Empty Missile

en	Empty Missiles

en	Basic Missile

en	Basic Missiles

en	Armour Piercing Missile

en	Armour Piercing Missiles

en	Plasma-Imbued Missile

en	Plasma-Imbued Missiles

en	CryoChilled Missile

en	Missiles cryo-accumulés

en	Mephitic Missile

en	Mephitic Missiles

en	Cluster Missile

en	Cluster Missiles

en	Cryo Bomb

en	Cryo Bombs

en	Compressed Magma

en	Freezon Gas

en	FreezonGas

en	Compressed Freezon Canister

en	CompressedFreezon

en	Chlorine Gas

en	ChlorineGas

en	Compressed Chlorine

en	CompressedChlorine

en	Sulphuric Gas

en	Sulphuric Gasses

en	Compressed Sulphur

en	Compressed Sulphurs

en	Pristine Heavy Chitin

en	Ruined Heavy Chitin

en	Pristine Light Chitin

en	Ruined Light Chitin

en	Pristine Stinger

en	Pristine Stingers

en	Ruined Stinger

en	Ruined Stingers

en	Pristine Faceted Eye

en	Pristine Faceted Eyes

en	Ruined Faceted Eye

en	Ruined Faceted Eyes

en	Pristine Phosphorescent Gland

en	Pristine Phosphorescent Glands

en	Ruined Phosphorescent Gland

en	Ruined Phosphorescent Glands

en	Perfect Faceted Eye

en	Perfect Faceted Eyes

en	Massive Faceted Eye

en	Massive Faceted Eyes

en	Hive Brain Matter

en	Research Parts

en	Refined Liquid Resin

en	Spoiled Organic Remains

en	Recombined Organic Matter

en	Air

en	Grass

en	Rock

en	Dirt

en	Wooden Planks

en	Rubble

en	Brick

en	TNT

en	Trampoline

en	Reinforced Wood

en	Bedrock

en	This dense rock appears to be laced with traces of Iron and Lithium. Searching in the nearby area should yield some useful ore!

en	Sand

en	Tree Trunk

en	Window

en	Leaves

en	Organic Detritus

en	This thick, disgusting mess covers the entire planet.

en	Black Grill

en	Book Shelf

en	Torch

en	Snow

en	Reinforced Rock

en	Reinforced Cobble

en	Rough Hewn Rock (Old)

en	Iron Box

en	Gold Box

en	Mithril Box

en	Grey Floor Tile

en	Red Floor Tile

en	Red Brick

en	Fallen Leaves

en	Field

en	Copy Paste

en	Electric Light(old)

en	Log Wall

en	Small Bricks

en	Magma

en	Plating

en	Tiles

en	Marble Column

en	Wooden Inlay

en	Red Canvas

en	Blue Canvas

en	Green Canvas

en	Yellow Canvas

en	Orange Canvas

en	Purple Canvas

en	Flesh Color Canvas

en	White Canvas

en	Grey Canvas

en	Black Canvas

en	Plum Canvas

en	Marine Canvas

en	Brown Canvas

en	Beige Canvas

en	Indigo Canvas

en	Maroon Canvas

en	Truss

en	My First Flowers

en	My First Roof

en	My First Brick

en	My First Window

en	My First Basket

en	My First Bookcase

en	My First Closet

en	My First Wallpaper

en	Water

en	Space Bubbles

en	Space Panel

en	Space Grille

en	Space Column

en	Soft Resin

en	Space Hatch

en	Space Window

en	Space Siding

en	Green Light

en	Thunder Flash

en	Electric Arc

en	Rainbow Light

en	Red Light

en	White Light

en	Emergency Light

en	Creative Water 1x1

en	Creative Water 32x32

en	Creative Water 256x256

en	Creative Greenscreen 256x256

en	Iron Ore

en	Lithium Ore

en	Gold Ore

en	Coal

en	Copper Ore

en	Tin Ore

en	Chromium Ore

en	Molybdenum Ore

en	Super Hard Rock

en	Magmacite

en	Uranium

en	Lime Yellow Canvas

en	Orange Leaves

en	Yellow Leaves

en	Red Leaves

en	White Flowers

en	Pink Flowers

en	Dyed Marble

en	Celtic Knot Tile

en	Celtic Braid Pillar

en	Celtic Gold Braid Pillar

en	Celtic Concrete Pillar

en	Celtic Cross

en	Celtic Curved Roof

en	Celtic Tile Roof

en	Celtic Black Braid

en	Neon Circuit

en	Neon Border

en	Neon Grid

en	Neon Core

en	Ivy

en	Metal Siding 1

en	GlassBlock

en	Chevron Sign

en	Drain Grate

en	Reinforced Concrete Wall

en	Lava

en	Scorched Earth

en	Metal Siding 2

en	Construction Crate

en	Bound Wooden Crate

en	Bound Metal Crate

en	Paper Wrapped Crate

en	Wooden Crate

en	Grooved Cement

en	Old_Gold Ore

en	Old_Silver Ore

en	Old_Iron Ore

en	Present1

en	Present2

en	Present3

en	Present4

en	DapperVIP

en	DapperFrame

en	DapperScale

en	DapperWall

en	TestDiffuse

en	Pumpkin Torch

en	Snowman

en	Nickel Ore

en	Titanium Ore

en	Crystal Deposit

en	Biomass

en	Chevron Sign 2

en	DesertSand

en	DesertGrass

en	Forest

en	Rainforest

en	Savanna

en	Swampland

en	Tundra

en	Diamond Crystal

en	These low-level crystals can be polished up and used in a variety of lenses and other useful items.

en	Emerald Crystal

en	These low-level crystals can be polished up and used in a variety of lenses and other useful items.

en	Ruby Crystal

en	These low-level crystals can be polished up and used in a variety of lenses and other useful items.

en	Sapphire Crystal

en	These low-level crystals can be polished up and used in a variety of lenses and other useful items.

en	Topaz Crystal

en	These low-level crystals can be polished up and used in a variety of lenses and other useful items.

en	Sugalite Crystal

en	These low-level crystals can be polished up and used in a variety of lenses and other useful items.

en	Rocket Framework

en	Basic Rocket Engine

en	Basic Fuel Tank

en	Basic Rocket Stabiliser

en	Basic Rocket Cargo Hold

en	Basic Rocket SRB

en	Basic Rocket Nosecone

en	Basic Rocket Fin

en	Launch Pad

en	Orange GlowPod

en	This doesn't appear to be very useful.

en	Blue GlowPod

en	This plant seems to thrive in the colder atmosphere. Maybe moving slightly deeper could yield something useful?

en	Green GlowPod

en	This plant seems to contain strong filters to deal with a toxic atmosphere. Maybe moving slightly deeper could yield something useful?

en	Purple GlowPod

en	This doesn't appear to be very useful.

en	GlowShroom

en	This doesn't appear to be very useful.

en	BaubleBerry

en	This doesn't appear to be very useful yet.

en	Mandragora

en	Useful for Crude Lenses.

en	UnderGrump

en	This doesn't appear to be very useful yet.

en	GoopyDangler

en	This doesn't appear to be very useful yet.

en	CoxComb

en	This doesn't appear to be very useful yet.

en	LeafyDangler

en	This doesn't appear to be very useful yet.

en	Cold Cavern Flora 1

en	This plant seems to thrive in the colder atmosphere.

en	Cold Cavern Flora 2

en	This plant seems to thrive in the colder atmosphere.

en	Cold Cavern Flora 3

en	This plant seems to thrive in the colder atmosphere.

en	Cold Cavern Flora 4

en	This plant seems to thrive in the colder atmosphere.

en	Cold Cavern Flora 5

en	This plant seems to thrive in the colder atmosphere.

en	Cold Cavern Flora 6

en	This plant seems to thrive in the colder atmosphere.

en	Cold Cavern Flora 7

en	This plant seems to thrive in the colder atmosphere.

en	TundraBreath

en	This doesn't appear to be very useful yet.

en	Toxic Cavern Flora 1

en	This plant seems to thrive in the toxic atmosphere.

en	Toxic Cavern Flora 2

en	This plant seems to thrive in the toxic atmosphere.

en	Toxic Cavern Flora 3

en	This plant seems to thrive in the toxic atmosphere.

en	Toxic Cavern Flora 4

en	This plant seems to thrive in the toxic atmosphere.

en	Toxic Cavern Flora 5

en	This plant seems to thrive in the toxic atmosphere.

en	Toxic Cavern Flora 6

en	This plant seems to thrive in the toxic atmosphere.

en	Toxic Cavern Flora 7

en	This plant seems to thrive in the toxic atmosphere.

en	Organic Rock

en	Electric Light

en	Fluid Magma

en	Enriched Coal

en	Infused Coal

en	Halloween Cauldron

en	Rough Hewn Rock

en	Chilled Cavern Stone

en	Toxic Cavern Stone

en	Bare Wood Floor

en	Bare Wood Floor 2

en	MultiShade Brick

en	Cement Garden Tile

en	Peeling Paint Metal

en	Peeling Paint

en	Cement Garden Tile 2

en	Cement Garden Tile 3

en	Cement Garden Tile 4

en	Cement Garden Tile 5

en	Cement Garden Tile 6

en	Cement Garden Block

en	Cement Garden Tile 7

en	Garden Packed Rocks

en	Peeling Paint Wood

en	Rounded Roof Shingles

en	Rusted Concrete

en	Garden Sand

en	Stucco Swirl

en	Space Warz Hatch1

en	Space Warz Hatch2

en	Space Warz Siding1

en	Space Warz Siding2

en	Space Warz Siding3

en	Butcherboy Pebbles

en	Butcherboy Stones

en	Butcherboy Stonewall

en	Butcherboy Wood Planks

en	Butcherboy Floor Stone

en	Up Arrow

en	Down Arrow

en	Sign

en	ConfigurableLight

en	Central Power Hub

en	Generates a little energy.Can burn resources for energy.Charges adjacent structures.

en	Ore Extractor

en	Efficiently extracts ore.Stores 25 Ore.Extracts 1 Ore/min.

en	Power Storage Block

en	Stores a little energy.Receives energy from other sources.Transfers energy to other machines.

en	Power Storage MK2

en	Stores more energy.Receives energy from other sources.Transfers energy to other machines.

en	Power Storage MK3

en	Stores more energy.Receives energy from other sources.Transfers energy to other machines.

en	Organic Power Storage

en	Can only transfer energy slowly.

en	Storage Hopper

en	Stores 100 Items.Auto transfers.Use E to alter transfer type.

en	Logistics Hopper

en	Auto transfers 1 item per 10s.

en	Mini Hopper

en	Auto transfers 1 item per 30s.

en	Cryo Hopper

en	Keeps items cold. Needs Power. More efficient if placed somewhere cold.

en	Motorised Logistics Hopper

en	Not implemented because the conveyor belt is the limiting factor, not the hopper. Ooops.

en	Solar Panel

en	Generates energy in daylightCharges adjacent batteries.

en	Organic Solar Panel

en	Generates a minor amount of energy during the night, from Novalight.Charges adjacent batteries.

en	Basic Laser Energy Transmitter

en	Transmits power slowly over distances.Max dist 32.Upgrade ASAP.

en	Laser Energy Transmitter MK1

en	Transmits power over distances.Max dist 64.Aim at batteries.

en	Laser Energy Transmitter MK2

en	Transmits even more power!

en	Laser Energy Transmitter MK3

en	The largest single-block energy transmitter.

en	BFL-9000

en	Massive Mining Laser.Cuts 5x5 tunnel.Massive energy demands.

en	Pyrothermic Generator

en	Burns fuel for energy.Burns 1 fuel unit/minute.

en	AI Mover Control

en	Creates a single AI robot.Moves ore between Hoppers.Low effort, low efficiency.

en	Basic Matter Mover

en	Transmits upto 150 items/min at a range of 64m

en	Dual Matter Mover

en	Transmits upto 300 items/min at a range of 32m

en	Quad Matter Mover

en	Transmits upto 600 items/min at a range of 16m

en	Multi Matter Mover

en	Transmits upto 4800 items/min at a range of 4m

en	Ore Smelter

en	This is your primary method for generating Ingots of resources.

en	Basic Ore Smelter

en	Double the speed, but less efficient than a normal Smelter. Cannot be upgraded.

en	Basic Conveyor Belt

en	Slowly transfers materials from Hoppers

en	Conveyor Belt

en	Transfers materials from Hoppers

en	Conveyor Belt Filter

en	Removes materials based on rules

en	Transport Pipe

en	Allows transfer in all directions

en	Transport Pipe Filter

en	Removes materials based on rules

en	Stamper Plant

en	Turn Bars into Plates

en	Extrusion Plant

en	Turn Bars into Wires

en	Coiler Plant

en	Turns Wires into Coils

en	Pipe Extrusion Plant

en	Turns Bars into Pipes

en	PCB Assembling Plant

en	Turns Coils into PCBs

en	Conveyor Turntable

en	Automatically distributes items

en	Advanced Conveyor Filter

en	Filters specific items at T2 Pipe speeds

en	Up Sloped Conveyor

en	Upward sloped, basic speed conveyor!

en	Down Sloped Conveyor

en	Downward sloped, basic speed conveyor!

en	Motorised Conveyor

en	Extracts items from a hopper at upto 150 per minute!

en	Research Station

en	Process scans and researchtechnologies. Requires power.

en	Forced Induction

en	Increases Ore Smelting rate and power usage.Place on TOP of Ore Smelters.

en	MK2 Forced Induction

en	Increases Ore Smelting rate and power usage.Place on TOP of Ore Smelters.

en	MK3 Forced Induction

en	Increases Ore Smelting rate and power usage.Place on TOP of Ore Smelters.

en	MK4 Forced Induction

en	Increases Ore Smelting rate and power usage.Place on TOP of Ore Smelters.

en	MK5 Forced Induction

en	Increases Ore Smelting rate and power usage.Place on TOP of Ore Smelters.

en	ARC Smelter Upgrade

en	Increases Ore Smelting rate and power usage.Place on TOP of Ore Smelters.

en	Turret MK1

en	Good for infrastructure defense.

en	Turret MK2

en	Good for base defence.

en	Turret MK3

en	Good for long range defence..

en	Auto Excavator

en	Automatically dig out large vertical shafts from below.

en	Teleporter

en	Teleport player to location set by installed Location Marker. Requires lots of power!

en	Geological Surveyor

en	Ensures your Quarries are correctly placed.

en	Manufacturing Plant

en	Central automated crafting machine.Can be upgraded by attaching modules.Requires power.

en	3D Printer

en	Manufacturing Plant module.Unlocks 3D Printer recipes whenattached to Manufacturing Plant.

en	Compressor

en	Manufacturing Plant module.Unlocks Compressor whenattached to Manufacturing Plant.

en	Extruder Module

en	Manufacturing Plant module.Unlocks Extruder recipes whenattached to Manufacturing Plant.

en	Chip Etcher

en	Manufacturing Plant module.Unlocks Chip Etcher recipes whenattached to Manufacturing Plant.

en	Hydrojet Cutter

en	Manufacturing Plant module.Unlocks Hydrojet Cutter recipes whenattached to Manufacturing Plant.

en	Robotic Welder

en	Manufacturing Plant module.Unlocks Robotic Welder recipes when attached to Manufacturing Plant.

en	Incubator

en	Manufacturing Plant module.Unlocks Incubator recipes when attached to Manufacturing Plant.

en	Assembly Station

en	Manufacturing Plant module.Unlocks Assembly Station recipes when attached to Manufacturing Plant.

en	Refinery Controller

en	Controls the reaction processes that allow recombining carbohydrates into other forms.

en	Refinery Reactor Vat

en	The player should not ever be able to read this...

en	Jet Turbine Generator

en	The player should not ever be able to read this...

en	Advanced Machine Block

en	Crafting component of tier 3 machinery. Can also be used for construction

en	Red Storage Crate

en	Simple storage solution.

en	Blue Storage Crate

en	Simple storage solution.

en	Green Storage Crate

en	Simple storage solution.

en	Yellow Storage Crate

en	Simple storage solution.

en	Orange Storage Crate

en	Simple storage solution.

en	Purple Storage Crate

en	Simple storage solution.

en	Flesh Color Storage Crate

en	Simple storage solution.

en	White Storage Crate

en	Simple storage solution.

en	Grey Storage Crate

en	Simple storage solution.

en	Black Storage Crate

en	Simple storage solution.

en	Plum Storage Crate

en	Simple storage solution.

en	Marine Storage Crate

en	Simple storage solution.

en	Brown Storage Crate

en	Simple storage solution.

en	Storage Crate

en	Simple storage solution.

en	Indigo Storage Crate

en	Simple storage solution.

en	Lime Yellow Storage Crate

en	Simple storage solution.

en	Maroon Storage Crate

en	Simple storage solution.

en	Mass Storage Block

en	Basic Mass Storage Solution (25 Capacity)

en	Basic Mass Storage Input Port

en	Use this to insert resources into Mass Storage. Carries 5 resources at a time.

en	Mass Storage Input Port

en	Use this to insert resources into Mass Storage. Carries 12 resources at a time.

en	Bulk Mass Storage Input Port

en	Use this to insert resources into Mass Storage. Carries 25 resources at a time.

en	Basic Mass Storage Output Port

en	Use this to remove resources from Mass Storage. Carries 5 resources at a time.

en	Mass Storage Output Port

en	Use this to remove resources from Mass Storage. Carries 12 resources at a time.

en	Bulk Mass Storage Output Port

en	Use this to remove resources from Mass Storage. Carries 25 resources at a time.

en	Mass Storage Controller

en	Mass Storage Controller for Powered Mass Storage

en	Macerator

en	Search unused rocks for ore

en	ARTHER Charging Station

en	Rapidly recharge ARTHER

en	Auto Builder

en	Automatically upgrade the rank of conveyors

en	Deployed Explosive

en	Supply power to increase explosion radius

en	Laboratory

en	Not relevant

en	Research Assembler

en	Basic Quarry

en	Digs a 9 metre big shaft, deep into the surface of the planet.

en	Track Straight

en	Allows Minecarts to travel in a straight line.

en	Track Corner

en	Allows Minecarts to travel around corners.

en	Track Slope

en	Allows Minecarts to travel around up slopes.

en	Minecart Buffer

en	Turns the Minecart around

en	Minecart Full Gate

en	Minecarts following the RED arrow will turn around unless FULL. GREEN is freely passable.

en	Minecart Empty Gate

en	Minecarts following the RED arrow will turn around unless EMPTY. GREEN is freely passable.

en	Minecart Depot

en	Places a Minecart from an attached Storage Hopper

en	Minecart Brake

en	Reduce the Minecart's speed

en	Minecart Turbo Rail

en	Increase the Minecart's speed

en	Minecart Unload Station

en	Place resources from Cart into attached Hoppers

en	Minecart Load Station

en	Place resources on the Cart from attached Hoppers

en	ARTHER Turret

en	Allows ARTHER to get his murder on.

en	Threat Scanner

en	Place near your base for an early-warning system.

en	Missile Turret MK1

en	Single-shot fires missiles at larger targets upto 512m away!

en	Missile Turret MK2

en	Dual-shot fires missiles at larger targets upto 512m away!

en	Missile Turret MK3

en	Tri-shot fires missiles at larger targets upto 512m away!

en	Missile Turret MK4

en	Quad-shot fires missiles at larger targets upto 512m away!

en	The Itano

en	Multi-shot launcher. The circus is in town!

en	Basic Missile Assembler(OLD)

en	Crafts Missiles from Fuel, Tubes and Wire.

en	Organic Reassembler(OLD)

en	Crafts Ruined Organic Components.

en	Coal Enricher(OLD)

en	Slowly Enriches Coal.

en	Orbital Energy Transmitter

en	Not relevant

en	Auto Upgrader

en	T4 Power Storage

en	Not relevant

en	T5 Power Storage

en	Not relevant

en	Solar Panel MK2

en	Not relevant

en	T4 Turret

en	Not relevant

en	Logic Laser Emitter

en	Creative Laser Machine.Unimplemented

en	Laser AND Gate

en	Laser OR Gate

en	Laser NOT Gate

en	Laser Pressure Pad

en	Laser Splitter

en	Laser Mirror

en	Laser Receptor

en	Lift w/underside Piston

en	Raises or lowers upto 64m at a rate of 1m/s

en	Lift Compressor

en	Requires Power.Increases compression rate of T1 liftsAttach to T1 lifts to use.

en	Lift Manual Control Module

en	Allow manual override of LiftUse Home and End to control!Attach to T1 lifts to use.

en	MK1 Robot Arm

en	Allows simple sorting of items from conveyors.

en	Advanced Robot Arm Control Module

en	Allows detailed control of the MK1 Robot Arm.

en	Alien Tendril Spawn

en	Alien Tendril

en	Hive Core

en	Hardened Resin

en	This incredibly hard organic structure appears to be shielding a soft and vulnerable core. Only Nano-Disintegrators will be able to cut through this.

en	MobSpawner

en	Great for testing defences.

en	Insulated Copper Wire

en	Track Gate

en	Track Terminus

en	Track Point

en	Track Station

en	Threat Agitator

en	Generates additional commutative threat.

en	Threat Reducer

en	Reduces threat substantially.

en	Zipper Merge

en	Combines 2 lines into 1 with a guaranteed 50:50 ratio.

en	3'n1 Zipper Merge

en	Rapidly combines 2 lines into 1 in the order RRR L. Use this to make Research Pod assembly a doddle!

en	Rapid Zipper Merge

en	Rapidly combines 2 lines into 1 with a guaranteed 50:50 ratio.

en	Fusion Reactor Pylon

en	Fusion Reactor Core

en	Fusion Reactor Monitor

en	Geothermal Generator

en	Heat Conducting Pipe

en	MB Ore Extractor Drill

en	MB Ore Extractor Motor

en	Server Monitor

en	Gives you read-time readouts of your server status. Not a 'game' item.

en	Basic Missile Assembler

en	Crafts Missiles from Fuel, Tubes and Wire.

en	Organic Reassembler

en	Crafts Ruined Organic Components.

en	Coal Enricher

en	Slowly Enriches Coal.

en	Plasma Head Charger

en	Imbues Steel Heads with energy.

en	Pipe Coater

en	Creates heat conductive pipes.

en	Mesh Weaver

en	Weaves meshes from crystal fibers.

en	Empty Missile Assembler

en	Crafts Empty Missiles from High Energy Composite Fuel, Copper Pipes and Gold Wire.

en	Missile Fueller

en	Fills Empty Missiles with High Energy Composite Fuel.

en	Armour Piercing Warhead Fitter

en	Uses Pristine Stingers to fit Armour-Piercing rounds.

en	Warhead Imbuer

en	Imbues Basic Missiles with Plasma-Enriched energy.

en	Lithium Coil Charger

en	Imbues 5xLithium Coils with 100 Energy. Use for SpiderBot power, as well as Crafting items.

en	Liquid Resin Refiner

en	Rack Railer

en	Crafts Rack Rails for Cargo Lifts

en	MK1 PowerCore Charger

en	Autocrafts a single-use Power Booster. This will give ARTHER 100 power. Place the crafted item into your hotbar to use it.

en	MK2 PowerCore Charger

en	Autocrafts a single-use Power Booster. This will give ARTHER 250 power. Place the crafted item into your hotbar to use it.

en	MK3 PowerCore Charger

en	Autocrafts a single-use Power Booster. This will give ARTHER 500 power. Place the crafted item into your hotbar to use it.

en	MK4 PowerCore Charger

en	Autocrafts a single-use Power Booster. This will give ARTHER 1000 power. Place the crafted item into your hotbar to use it.

en	MK5 PowerCore Charger

en	Autocrafts a single-use Power Booster. This will give ARTHER 2000 power. Place the crafted item into your hotbar to use it.

en	Crystal Clock Maker

en	Creates a clock made from crystal. Used to keep electronics running at a fixed rate.

en	OverClocker

en	Uses large amount of power to carefully overclock Crystal Clocks. Used in high-end machines.

en	Crystal Coal Infuser

en	Infuses Enriched Coal with Crystal Ore.

en	Fuel Canister Crafter

en	Uses a single Iron Pipe to make an Empty Fuel Canister.

en	CryoChilled Missile Assembler

en	Uses Freezon Canisters to add a slowing effect to targetted mobs. Also gives 15% extra damage!

en	Mephitic Missile Assembler

en	Uses Chlorine Canisters to add a damage-over-time effect to targetted mobs, adding 50% damage over 30 seconds.

en	Steel Alloy Smelter

en	Automatically smelts Low-grade Steel Bars from Iron and Nickel.

en	Advanced Machine Block Assembler

en	Automatically create Advanced Machine Blocks from Steel and Crystal Clocks.

en	Imbued Machine Block Assembler

en	Automatically create Imbued Machine Blocks from PowerBoosters and Advanced MachineBlocks.

en	Lens Polisher

en	Uses precision technology to produce an unfocussed lens from any lower-tier of lens. Can then be chrome-plated to be used in Laser Power Transmitters.

en	Lens Chromer

en	Mirror-coats a high-precision unfocussed lens to provide a useful upgrade.

en	Cryo Bomb Assembler

en	Created a bomb specifically designed to be delivered by Bomber FALCORs to defeat large quantities of long-range CryoPlasm.

en	Chromed Block Assembler

en	Chrome-plates Imbued Machine Blocks.

en	Hiemal Block Assembler

en	Cold-infuses Chrome and Magnetic Blocks together to create this heat-proof block.

en	Magnetic Block Assembler

en	Magnetises Imbued Machine Blocks.

en	Alloyed Block Assembler

en	Uses a Gold to coat Hardened Machine Blocks.

en	HardenedBlock Assembler

en	Uses a mixture of Nickel and Titanium to create hardened blocks.

en	Construction Paste Grinder

en	Uses 'garbage' blocks to make Construction Paste.

en	Cluster Missile Crafter

en	Turns a single Imbued Missile and turns it into 8 rapid-fire missiles, each doing 1/4 of the original damage, for a total of double the damage.

en	ConstructoBot Coppator Chassis Assembler

en	Constructs Tier 0 (Coppator) ConstructoBot Chassis.

en	ConstructoBot Tindron Chassis Assembler

en	Constructs Tier 1 (Tindron) ConstructoBot Chassis.

en	ConstructoBot Bronzite Chassis Assembler

en	Constructs Tier 2 (Bronzite) ConstructoBot Chassis.

en	ConstructoBot Ironide Chassis Assembler

en	Constructs Tier 2 (Ironide) ConstructoBot Chassis.

en	ConstructoBot Leg Assembler

en	Constructs Tier 0 (Coppator) ConstructoBot Legs.

en	ConstructoBot Arm Assembler

en	Constructs Tier 0 (Coppator) ConstructoBot Arms.

en	Blast Furnace

en	Continuous Casting Basin

en	Casting Pipe (Straight)

en	Allows molten metal to flow from Blast Furnace to Continuous Casting Basin

en	Casting Pipe (Bend)

en	Allows molten metal to flow from Blast Furnace to Continuous Casting Basin

en	Refinery Reactor Vat Component

en	Contains biochemical reactions under high pressure. Place in a 3x3x3 cube to form a Reactor Vat. Attach a Refinery Controller to operate.

en	Jet Turbine Generator Housing

en	Burns HEC Fuel to drive a turbine generating lots of power. Build in a 4 by 3 horizontal shape, and build 3 high. Attach an intake to form the front of the machine.

en	Jet Turbine Generator Intake

en	The Turbine Generator intake is placed at the front of the housing in a 3 by 3 vertical shape.

en	Laboratory Component

en	Performs automated experiments. Place in a 3x3x3 cube to create a Laboratory.(Needs 27 in total)

en	Orbital Energy Transmitter Component

en	Use this to beam power off-planet. Place 9 wide by 13 high by 9 deep to form a valid OET.(Needs 1053 in total)

en	MK4 Battery Component

en	Build in a 3x3x3 configuration for larger storage solutions.(Needs 27 in total)

en	Conduit

en	Connect T4 batteries at a distance of up to 128 metres at over 10,000 PPS. Build in a 3x3x1 configuration, attached to a T4 PSB.

en	MK5 Battery Component

en	Build in a 5wx9hx5d configuration for the largest storage solutions.(Needs 225 in total)

en	MK2 Solar Panel Component

en	Create a 3wx1hx3d Solar Panel. Can ONLY be built on top of high-tier machines.

en	T4 Energy Turret component

en	Create a 3x3x3 Turret. High Damage, High Energy usage.

en	Fusion Reactor Pylon comp.

en	Create a pylon as part of a Fusion Reactor configuration. Use the Fusion Reactor Monitor for a build guide.

en	Geothermal Generator comp.

en	Generates heat through temperature difference. Build in a 5wx3hx5d configuration.

en	Trencher Drill component

en	Forms the drill head of a Trencher Drill. Build in a 3wx3hx3d configuration in front of a motor. (27 in total)

en	Trencher Motor component

en	Forms the motor of a Trencher Drill. Build in a 3wx3hx3d configuration in front of a motor. (27 in total)

en	Blast Furnace component

en	Forms a Blast Furnace. Build in a 3wx7hx3d configuration. (63 in total)

en	Casting Basin component

en	Forms a Continuous Casting Basin. Build in a 5wx3hx5d configuration. (75 in total)

en	Cargo Lift Controller

en	Deploys rack rails and allows a cargo lift to operate. Build in a 3x1x3 configuration

en	Spiderbot Base Component

en	Allows upgrades and recharging of SpiderBot weaponry and items. Build in a 15x1x15 configuration.

en	MK2 Organic Solar Component

en	Create a 3wx1hx3d Solar Panel. Collects a minimal amount at night.

en	Climate Control Centre

en	Not relevant.

en	Hard Rock Grinder

en	A single-use, multiblock machine. Allows you to collect a minimal amount of Chromium or Molybdenum. Build in a 3x1x3 configuration.

en	MagmaBore Component

en	Cuts an enormous bore down to the magma caverns in order to flood the Cold Caverns with heat. Build in a 33wx3hx33d configuration (3276 total) Needs 8m of initial clearance.

en	Particle Filter

en	Removes useful particulates from the air. Unlikely to make a long-term permanent difference to the air quality. Build in a 5wx3hx5d configuration. (75 in total)

en	Particle Compressor

en	Compresses low pressure gas, ready to be stored then bottled. Build in a 3x3x3 configuration.

en	Particle Storage

en	Stores compressed gas, ready to be bottled. Build in a 3wx7hx3d configuration.(63 in total)

en	Gas Bottler

en	Decants compressed gas into useful containers. Build in a 3x3x9 configuration.(81 in total)

en	Induction Charger

en	Not relevant.

en	Ore Thief

en	Not relevant.

en	Magma Storage

en	Receives Fluid Magma from appropriate machines via Fluid Pipes.

en	Cryo Inferno

en	The ultimate solution to the creep. Needs line of sight to an exposed Creep Spawner.

en	Garbage Thief

en	Not relevant.

en	Bar Keeper

en	Not relevant.

en	Trencher Drill Mk2 component

en	Improved Trencher Drill. Builds in the same way as the Mk 1.

en	Trencher Drill Mk3 component

en	Greatly improved Trencher Drill. Builds in the same way as the Mk 1.

en	Auto Organic Thief

en	Automatically removed ruined parts from your inventory.

en	Laser Borer

en	HEFC-powered Laser Boring device. Rapidly creates a 3x3 hole down to the centre of the Cold Caverns. Build in a 3x3x3 shape.

en	High Orbital Debris Object Reclaimer

en	Allows launching of a missile to knock orbital debris down to the surface. Build in a 3x1x3 configuration.

en	Fuel Compressor

en	Compresses carbon particulates with High-Energy Composite Fuel to generate an extremely volatile and energy-rich fuel source.

en	CargoLiftController

en	Rack Rail

en	Mass Storage IO Port

en	High throughput IO for mass storage

en	Basic Mass Storage Stocking Port

en	Mass Storage Stocking Port

en	Bulk Mass Storage Stocking Port

en	Orbital Strike Controller

en	Nuke the site from orbit. It's the only way to be sure. Requires a fully-charged OET.

en	SurfaceHiveSpawn

en	Construction Paste

en	FALCOR MK1

en	Collects Dropped Loot from FALCOR Beacons and returns it.Needs attached storage hopper.

en	Logistics FALCOR

en	Choose item filter

en	Collects items from FALCOR Beacons attached to remote Storage Hoppers and returns it.Needs attached storage hopper.

en	FALCOR Beacon

en	SpiderBotBase

en	Not relevant

en	Laser Resin Ablator

en	Converts nearby Hardened Resin into Ablated Resin

en	Laser Resin Liquifier

en	Converts, collects and destroys nearby Ablated Resin.

en	Partially Ablated Resin

en	The tough outer coating has been ablated; we should now be able to liquidise the soft inner core.

en	Ablated Resin

en	The tough outer coating has been ablated; we should now be able to liquidise the soft inner core.

en	Liquified Resin

en	The resin has now been liquified, and can be collected.

en	Cold Creep Spawner

en	CryoPlasm

en	This incredibly hard organic non-newtonian liquid has been awoken by our Climate Control Centre! We'll need specialist weaponry to deal with this!

en	Cryoplasm

en	This incredibly hard organic non-newtonian liquid has been awoken by our Climate Control Centre! We'll need specialist weaponry to deal with this!

en	Workfloor Excavator MK1

en	Excavates a 3 metre tall workfloor, 16 metres in each direction (33m in total)

en	Workfloor Excavator MK2

en	Excavates a 3 metre tall workfloor, 16 metres in each direction (33m in total). Uses twice as much power as the MK1, but can cut through ores.

en	Workfloor Excavator MK3

en	A blazingly-fast catherine wheel of excavation - 4x faster than the MK2s! Will cut through ores.

en	Slime Attractor

en	Attracts slimes.

en	Imbued Machine Block

en	Crafting component of tier 4 machinery. Can also be used for construction

en	CryoMine

en	Explodes with noxious gas when touched by CryoPlasm.

en	Bomber FALCOR

en	Drops crafted bombs, long range, onto dense creep.

en	Freezon Injector

en	Utilises Freezon Canisters to provide performance benefits to a number of machines.

en	H.E.I.S.T.

en	Hopper Emptying Inventory Storage Transporter - Automatically transmits items into the player's inventory. H.E.I.S.T. for short.

en	NanoDisintegrator

en	NanoDisintegrator. Use this to perfectly excavate a 3x3x3 area of even the very hardest material. Use with care.

en	Ruined Organic Thief

en	Not relevant.

en	T4 Power Conduit

en	Not relevant

en	Cold Cavern Climate Control Centre

en	CryoPlasm Lancer

en	Short-range, fast, CryoPlasm defence

en	CryoPlasm Melter

en	Melts CryoPlasm at a medium range. Useful only when paired with other types of defence.

en	CryoPlasm 'Dazzler' Turret

en	Long-range, fast, CryoPlasm defence. Can only work in straight lines. Requires 250k power to trigger.

en	Single-Use Hard Rock Grinder

en	Not relevant.

en	Magma Bore

en	Not relevant.

en	Airbone Particulate Extractor

en	Not relevant.

en	Fluid Pipe (Straight)

en	Allows connection of appropriate machines. Can also carry gases.

en	Fluid Pipe (Bend)

en	Allows connection of appropriate machines. Can also carry gases.

en	Airbone Particulate Compressor

en	Not relevant.

en	Compressed Gas Storage

en	Not relevant.

en	Compressed Gas Bottler

en	Not relevant.

en	Compressed Magma Storage

en	Not relevant.

en	Creep Inferno

en	Not relevant.

en	LaserBorer

en	Not relevant.

en	Hard Resin Detector

en	Provides an essential early-warning system for encroaching hiveminds.

en	Crashed parts container

en	Contains technical components we can use for research.

en	Chilled Reinforced Rock

en	Critter

en	Waypoint Machine

en	Place this and give power to auto-generate a waypoint. Override the waypoint name by placing an adjacent sign.

en	ConstructoBot Direction

en	Forces ConstructoBots to head in this direction.

en	ConstructoBot Cargo Control

en	ConstructoBots with cargo will head in the the direction of the GREEN arrow.

en	ConstructoBot Loaded Control

en	Full ConstructoBots will head in this direction.

en	ConstructoBot Unloaded Control

en	Empty ConstructoBots will head in this direction.

en	ConstructoBot Power Control

en	Low-power ConstructoBots will head in this direction.

en	ConstructoBot T-junction

en	ConstructoBots will alternate Left/Right on hitting this.

en	ConstructoBot Sprayer

en	Randomise ConstructoBots paint schemes.

en	ConstructoBot Cold Protector

en	Applies Cold Protection to ConstructoBots.

en	ConstructoBot Charger

en	Charges a ConstructoBot.

en	ConstructoBot Constructor

en	Builds a ConstructoBot from input conveyors with Arm, Body and Legs.

en	H.O.D.O.R.

en	High Orbital Debris Object Reclaimer allows launching of a missile to knock orbital debris down to the surface. Build in a 3x1x3 configuration.

en	Orbital RailGun Controller

en	Orbital RailGun Induction Ring

en	Hydroponics Bay

en	Can grow automated plants. Requires a Canopy.

en	Hydroponics Canopy

en	Place over a Hydroponics Bay to massively increase it's growth speed.

en	Adventures Pack DLC

en	Thank you for buying the Adventures Pack DLC!

en	CRP DLC KEY

en	Emergency Siren

en	Attach to a machine to monitor it..

en	Orange Warning Light

en	Attach to a machine to monitor it.

en	Red Warning Light

en	Attach to a machine to monitor it.

en	Warning Strobe

en	Attach to a machine to monitor it.

en	Organic Solar Panel MK2

en	Not relevant

en	Glow Tubes

en	These massive glowing tubes appear to contain fibres that could be useful.

en	Never Visibole

en	You should never see this. If you can see this then it is a bug

en	Large Rocks

en	Large surface rocks containing traces of ore.

en	Workshop Placement

en	Place in pairs diagonallyCreates Detail block workshopSize 2x2x2 to 8x8x8

en	The solar panel collects a modest amount of energy from natural sunlight during the day powering adjacent machines.Requires sky clearance.

en	Great for topping off low-power devices

en	The solar panel collects a modest amount of energy from natural sunlight during the day powering adjacent machines.Requires sky clearance.

en	Requires sky clearance!

en	Collects a medium amount of energy during the day. Can only be placed in a flat 3x3 configuration on top of the research lab, refinery or large power storage units.

en	Can only be placed on Lab, Refineries and large Batteries!

en	Collects a medium amount of energy during the day and a minimal amount at night. This has the same placement restrictions as the regular version.

en	Can only be placed on Lab, Refineries and large Batteries!

en	Burns resources in attached Hopper to power adjacent machines. Loses efficiency with depth due to poor ventilation. Use Laser Power Transmitters to send power deeper.

en	Must be connected to a Storage Hopper

en	Transmits power at a very low rate from a generator or battery. Can power a machine, battery or another transmitter. Attach to a wall to send power vertically.

en	Maximum range : 64. Upgrade as soon as possible.

en	Transmits power at a low rate from a generator or battery up to 64m. Can power a machine, battery or another transmitter. Attach to a wall to send power vertically.

en	Maximum range : 64

en	Transmits power at a medium rate from a generator or battery up to 64m. Can power a machine, battery or another transmitter. Attach to a wall to send power vertically.

en	Tier 2 version transmits more power!

en	Transmits power at a high rate from a generator or battery up to 64m. Can power a machine, battery or another transmitter. Attach to a wall to send power vertically.

en	The largest single-block energy transmitter.

en	Acts as a buffer between power generators and consumers by storing up to 200 power. Adjacent power storage blocks will share power.

en	Connect to machines to power them

en	Acts as a buffer between power generators and consumers by storing up to 1,500 power. Adjacent power storage blocks will share power.

en	Connect to machines to power them

en	Acts as a buffer between power generators and consumers by storing up to 5,000 power. Adjacent power storage blocks will share power.

en	Connect to machines to power them

en	A low-tech and easy-to-use way of transferring low power to many machines. Place in a 5x1x5 layout.

en	Great for Missile Batteries, Booster Chargers and Resin Refinery setups!

en	A handy method of removing ores from your inventory. Place in a 3x3 layout, then stand on it! Requires a small amount of power and an attached Storage Hopper.

en	No time for lazy!

en	A handy method of removing unwanted detritus from your inventory. Place in a 3x3 layout, then stand on it! Requires a small amount of power and an attached Storage Hopper.

en	No time for lazy!

en	Automatically removes Bars from players when they leave the server. Very little use for single-player, but also works as an Ore Thief, but for bars! Place in a 3x3 layout.

en	No time for lazy!

en	A handy method of removing unwanted organic parts from your inventory. Place in a 3x3 layout, then stand on it! Requires a small amount of power and an attached Storage Hopper.

en	No time for lazy!

en	Automatically removes items from adjacent Storage Hoppers and transmits it to player within 5 metres.

en	No time for lazy!

en	Place this and give power to auto-generate a waypoint. Override the waypoint name by placing an adjacent sign.

en	No time for lazy!

en	Stores up to 270,000 power and must be built in a 3x3x3 configuration (27 total).

en	Double Density of T3 batteries!

en	Fires upto 10,000 PPS, equalising power between batteries. Do not look directly into beam.

en	Do not stand directly in beam.

en	Stores up to 4.5 million power and must be built 9m tall with a 5x5 base (225 total). Will not accept power from adjacent power storage blocks.

en	Quadruple Density of T3 batteries!

en	Acts as a buffer between power generators and consumers by storing up to 8,500 power. Adjacent power storage blocks will share power.

en	Slow throughput, large capacity.

en	Automatically extracts ore from the vein it is attached to. Internal storage capacity can be extended with a Storage Hopper. Requires power. Can be upgraded.

en	Connect to Hoppers for automatic storage

en	Entry level storage solution. Stores up to 10 resources but transfers very slowly.

en	Disperses resources very slowly.

en	Entry level storage solution. Stores up to 2 resources but transfers faster than a mini-hopper. Fast enough for a basic ore extractor. Consider using in parallel.

en	Disperses resources fairly quickly.

en	Stores up to 100 resources and transfers quickly. Use to automate other machines. Set permissions appropriately to ensure correct material flow. See handbook entry.

en	Can be connected to other machines for automation.

en	Low grade heating and lighting. Use this to keep your base warm.

en	Caution : Fire is hot!

en	Provides a cold blue light, and requires power.

en	This casts light in a 180 degree arc.

en	Attach to any power-consuming machine for an audio warning if out of power.

en	They can also be used on Conveyor Belts and Storage Hoppers.

en	Attach to any power-consuming machine for an red glowing light.

en	Try not to place too many. It can be annoying.

en	Attach to any power-consuming machine for a strobe warning if out of power.

en	Try not to place too many. It can be annoying.

en	Attach to any power-consuming machine for a strobe warning if out of power.

en	Try not to place too many. It can be annoying.

en	Use this to remind yourself exactly what you meant to do.

en	Thank you to the Patreons for donating to get this live!

en	A slightly stronger wall for your base.

en	Caution : Uses up 16 Paste!

en	A slightly stronger wall for your base.

en	Caution : Uses up Wooden Planks!

en	A weak window, has wooden frames

en	Uses up wooden planks!

en	Useful for looking into the guts of your base

en	It's seethrough!

en	Use this to mark off dangerous areas.

en	Caution : Uses up 1 Constructionpaste!

en	Use this to mark off dangerous areas.

en	Caution : Uses up 1 Constructionpaste!

en	Decorative wooden blocks. This can also be crafted under the self-craft menu (C)

en	Pretty!

en	White canvas, can be painted using the paint gun (N).

en	Caution : Uses up 1 Constructionpaste!

en	Red canvas for decorating our base.

en	Caution : Uses up 1 Constructionpaste!

en	Blue canvas for decorating our base

en	Caution : Uses up 1 Constructionpaste!

en	Green canvas for decorating our base

en	Caution : Uses up 1 Constructionpaste!

en	Smelts ore into bars. Can be operated manually or automated using input and output Storage Hoppers. See the handbook for more information. Can be upgraded.

en	T2 item - use the one at your base to start with!

en	Smelts ore into bars. Half the speed and efficiency of regular smelter, but an excellent stop-gap. Cannot be upgraded with forced induction modules. See the handbook for more information.

en	Upgrade to a regular Ore Smelter as soon as possible.

en	Place on top of a regular smelter to increase speed by 200% but power usage by 800%. Does not support basic smelters.

en	Power Usage increased by 8x

en	Place on top of a regular smelter to increase speed by 300% but power usage by 1,600%. Does not support basic smelters.

en	Power Usage increased by 16x

en	Place on top of a regular smelter to increase speed by 400% but power usage by 3,200%. Does not support basic smelters.

en	Power Usage increased by 32x

en	Place on top of a regular smelter to increase speed by 400% but power usage by 3,200%. Increases Smelter collection rate by 2x!

en	This doubles the collection rate of the Smelter.

en	Place on top of a regular smelter to increase speed by 400% but power usage by 3,200%. Increases Smelter collection rate by 4x!

en	This doubles the collection rate of the Smelter.

en	Place on top of a regular smelter to allow smelting of T4 ores. DECREASES speed by 400%. Power increase usage : Unknown.

en	Use this to build your first Continuous Casting Basin.

en	Basic energy-based defence. Range of 16m. Requires power.

en	Do not place on top of your Ore Smelter!

en	Basic energy-based defence. Range of 20m, improved damage. Requires power.

en	Place on top of your Ore Smelter if you want.

en	Long-range energy-based defence. Range of 72m. Slow firing but high damage. Requires power.

en	Upgrade your MK2 turrets to this with rewards from the waves.

en	High damage missile defense system. Will only target large enemies. Ammunition must be manufactured and stored in an adjacent Storage Hopper. Has a minimum range of 64m.

en	Needs Missiles crafted for it.

en	Provides an early warning system. Estimates the threat generated by your base and time until next attack.

en	Use multiples to triangualate the source of danger.

en	Provides an early warning report on nearby growing Hardened Resin clusters.

en	Doesn't need power; just check on it once in a while!

en	Uses Rotting organic parts to attract nearby lifeforms.

en	Useful for traps.

en	Allows you to monitor the server. Also gives readouts about permissions and other fun things.

en	Sorry about your 4th wall.

en	Uses a small amount of power to reduce your base's threat. Use this for a respite from attacks whilst you develop your base.

en	Does not work whilst Orbital Energy Transmitter is online!

en	Uses a modest amount of power to increase your base's threat. Use this to obtain more Organic Loot!

en	Each one increases threat by 10% and adds 5 mobs per wave

en	Slow but cheap method of transferring materials between Storage Hoppers. No power required. Open conveyors are susceptible to attack and extreme temperatures.

en	Slow but efficient

en	Used for transferring materials between Storage Hoppers. No power required. Open conveyors are susceptible to attack and extreme temperatures.

en	Vulnerable to extreme cold!

en	Used to transport items up slopes. Almost twice as fast as a conveyor belt. Thanks Pythagoras!

en	Vulnerable to extreme cold!

en	Used to transport items down slopes. Almost twice as fast as a conveyor belt. Thanks Pythagoras!

en	Vulnerable to extreme cold!

en	Automatically rotates after transferring items. Avoid placing adjacent to Storage Hoppers or other turntables. Use to split conveyor lines.

en	Use to split conveyor lines

en	Attach to a Storage Hopper to allow types of material entering the conveyor network.

en	Place between hoppers and conveyors

en	Attach to a Storage Hopper to insert specific materials to your logistics network.

en	Allows specific item support.

en	Attach to a Storage Hopper and give power to saturate the fastest of transport systems!

en	Needs 5 power per item. Face away from the Storage Hopper.

en	Combines 2 lines into 1 with a guaranteed 50:50 ratio.

en	Connect directly to conveyor belts. Only works if both sides are supplied with material.

en	Rapidly combines 2 lines into 1 with a guaranteed 50:50 ratio. Much faster than a standard Zipper Merge.

en	Connect directly to conveyor belts. Only works if both sides are supplied with material.

en	Rapidly combines 2 lines into 1 in the order RRR L. Use this to make Research Pod assembly a doddle!

en	Connect directly to conveyor belts. Only works if both sides are supplied with material.

en	Fast but expensive method of transferring materials between Storage Hoppers. No power required. Unaffected by extreme cold and less susceptible to attack.

en	Immune to extreme cold.

en	Attach to a Storage Hopper to limit the type of material entering a transport pipe network.

en	Can be used on walls and ceilings

en	Beams a resources from an attached Storage Hopper to another up to 64m away. Requires line of sight. Place on a wall to transmit vertically. Fast but power hungry.

en	Rapid Transfer, high Energy cost

en	Beams resources from an attached Storage Hopper to another up to 32m away, 2 at a time. Peak Performance : 150/min

en	Rapid Transfer, high Energy cost

en	Beams resources from an attached Storage Hopper to another up to 16m away, 4 at a time. Peak Performance : 600/min

en	Rapid Transfer, high Energy cost

en	Beams resources from an attached Storage Hopper to another up to 8m away, 32 at a time. Peak Performance : 4800/min.

en	Rapid Transfer, high Energy cost

en	Automatically moves resources between hoppers based on hopper permissions.Cheap and nasty, but reliable* *Not that reliable really.

en	Cheap and nasty, but reliable* *Not that reliable really.

en	Mark off a 32m area for FALCORs to automatically collect loot from. Requires power.

en	Ideal for Wasp drops!

en	Automatically collects marked loot from FALCOR Beacons within 256m. Requires attached Storage Hopper.

en	Ideal for Wasp drops!

en	Automatically collects items from FALCOR Beacons mounted on Storage Hoppers.

en	Ideal for low-throughput, long-distance logistics.

en	Automatically delivers CryoBombs to distant CryoPlasm.

en	Bombs need to be in attached Storage Hoppers.

en	Auto-crafts CryoBombs.

en	Bombs need to be in attached Storage Hoppers.

en	Conveyor-based machine for automatically converting Bars into plates. Does not require external power or Hoppers.

en	A useful start when automating

en	Conveyor based machine for automatically converting metal bars into wires. Does not require external power or Storage Hoppers.

en	A useful start when automating

en	Conveyor based machine for automatically converting metal wires into coils. Does not require external power or Storage Hoppers.

en	A useful start when automating

en	Conveyor based machine for automatically converting metal coils into PCBs. Does not require external power or Storage Hoppers.

en	PCBs are used in many electronic components

en	Uses a mixture of Nickel and Titanium to create essential Alloyed blocks.

en	These are used extensively, and it is highly recommended you automate these!

en	Converts useless garbage into Construction Paste. All aesthetic blocks use construction paste!

en	Pretty.

en	Gold-plates Hardnened Blocks into Alloyed Blocks.

en	These are used extensively, and it is highly recommended you automate these!

en	Conveyor based machine for automatically converting metal bars into pipes. Does not require external power or Storage Hoppers.

en	A useful start when automating

en	A simple way to create empty fuel canisters.

en	Great for fuel!

en	Automatically manufactures empty missiles. Requires power and attached Storage Hoppers containing ingredients. Outputs missiles to an attached Storage Hopper.

en	These missiles will need fuelling before they're useful!

en	Automatically fuels empty missiles. Requires power and attached Storage Hoppers containing ingredients. Outputs missiles to an attached Storage Hopper.

en	These missiles are ready to launch!

en	Adds Armorpiercing Warheads to missiles

en	Just to get that extra Punch you need

en	Takes Basic Missiles and 50,000 energy to imbue with even more energy.

en	These missiles are ready to launch!

en	Turns a single Imbued Missile and turns it into 8 rapid-fire missiles, each doing 1/4 of the original damage, for a total of double the damage.

en	These missiles are ready to launch!

en	Takes Imbued Missiles and adds 50% damage-over-time.

en	These missiles are ready to launch!

en	Takes Imbued Missiles and adds a massive slowing effect.

en	These missiles are ready to launch!

en	Imbues Lithium Coils with Energy. Feed into the SpiderBot Upgrade and Recharge Dock via a Storage Hopper.

en	SpiderBot needs energy to defend your base with.

en	Uses large amounts of energy to Ablate the surface of Hardened Resin, allowing it to be liquified and then refined.

en	Excellent for clearing out dead hiveminds for useful material.

en	Uses large amounts of energy to access the soft core of a Hardened Resin block, once it's been Ablated. Attach to a storage hopper.

en	Excellent for clearing out dead hiveminds for useful material.

en	Converts Liquid Resin into the extremely useful Refined Liquid Resin.

en	Used in a number of high-end organic recipes.

en	Upgrade module for the Manufacturing Plant, allows the manufacture of suit upgrades. Must be placed on top of the Manufacturing Plant.

en	Ths MUST be placed on top of your Manufacturing Plant.

en	Increases the efficiency of your suit's solar panels. Only one required and must be carried in inventory.

en	Suit Item! You only need 1!

en	Increases suit heating power protecting you from extreme cold. Only one required and must be carried in your inventory.

en	Suit Item! You only need 1.

en	Doubles your suit's power capacity. Only one required and must be carried in your inventory.

en	Suit Item! You only need 1!

en	Quadruples your suit's power capacity. Only one required and must be carried in your inventory.

en	Suit Item! You only need 1!

en	Converts ALL previous suit upgrades into an super-duper All In One (tm) Suit Upgrade. Perfick.

en	Suit Item! You only need 1!

en	Reduces the power drain of your suit's headlamp. Only one required and must be carried in your inventory.

en	Suit Item! You only need 1

en	Can dig through more materials than your starting build gun. Can dismantle Ore Smelters and Manufacturing Plants.

en	Suit Item! You only need 1!

en	This bad boy can cut through hard ores AND remove large areas in a single action.

en	Suit Item! You only need 1!

en	Crafting this allows your suit to filter out dangerous and hallucinogenic toxins from the atmosphere.

en	Use this to progress past the poison-spore filled caves

en	Allows the use of jet thrust to fly over short ranges. Uses large amounts of power. Activate with 'J'.

en	Suit Item! You only need 1!

en	A single one of these will be able to upgrade, repair and re-arm your SpiderBot. Build in a 15x15 square. Requires 225 in total.

en	Setting up an assembly line for the SpiderBot Core Charger will make your life much easier!

en	Rapid fire, low-slung energy-based weapon. Ideal for small to medium targets.

en	Once constructed, place in a hopper adjacent to the SpiderBot Upgrade Dock.

en	Slow-firing, powerful area damage cannons. Capable of targeting high and low; specialises in medium targets.

en	Once constructed, place in a hopper adjacent to the SpiderBot Upgrade Dock.

en	Rapid fire, shoulder-mounted energy weapon. Ideal for taking down the very largest of attackers.

en	Once constructed, place in a hopper adjacent to the SpiderBot Upgrade Dock.

en	A simple wooden crate that can store a small amount of items. Cannot be automated. Multiple crates can be connected together to increase storage space.

en	Connect multiple crates together to increase available inventory space.

en	A simple wooden crate that can store a small amount of items. Cannot be automated. Multiple crates can be connected together to increase storage space.

en	Connect multiple crates together to increase available inventory space.

en	A simple wooden crate that can store a small amount of items. Cannot be automated. Multiple crates can be connected together to increase storage space.

en	Connect multiple crates together to increase available inventory space.

en	A simple wooden crate that can store a small amount of items. Cannot be automated. Multiple crates can be connected together to increase storage space.

en	Connect multiple crates together to increase available inventory space.

en	A simple wooden crate that can store a small amount of items. Cannot be automated. Multiple crates can be connected together to increase storage space.

en	Connect multiple crates together to increase available inventory space.

en	A simple wooden crate that can store a small amount of items. Cannot be automated. Multiple crates can be connected together to increase storage space.

en	Connect multiple crates together to increase available inventory space.

en	A simple wooden crate that can store a small amount of items. Cannot be automated. Multiple crates can be connected together to increase storage space.

en	Connect multiple crates together to increase available inventory space.

en	A simple wooden crate that can store a small amount of items. Cannot be automated. Multiple crates can be connected together to increase storage space.

en	Connect multiple crates together to increase available inventory space.

en	Use to create Steel Bars.

en	Automation is king!

en	Common component for advanced machinery.

en	Can also be used for construction.

en	Common component for advanced machinery. Uses 4 Advanced Machine Blocks and a single MK5 Power Booster.

en	Can also be used for construction.

en	Common component for advanced machinery.

en	Can also be used for construction.

en	Common component for advanced machinery.

en	Can also be used for construction.

en	Common component for advanced machinery.

en	Can also be used for construction.

en	Process Biomass into useful products. Must be attached to a Refinery Reactor Vat to operate. See the handbook for more information.

en	Must be connected to a Refinery Reactor Vat to operate.

en	Refinery Reactor Vat component. Must be built in a 3x3x3 configuration (27 total). Requires an attached Refinery Controller.

en	Place in a 3 by 3 by 3 configuration to form a valid Reactor Vat.

en	Housing component for a Jet Turbine Generator. Burns HEC Fuel to drive a turbine generating lots of power. Build 3 high with a 4x3 base. Attach intake to the front.

en	Build in a 4 by 3 horizontal shape, and build 3 high. Attach an intake to form the front of the machine.

en	Sucks in large amounts of air for the turbine. Place in front of the housing 3m high and 3m wide.

en	The Turbine Generator intake is placed at the front of the housing in a 3 by 3 vertical shape.

en	Fixes the damage to ARTHER allowing him to move reliably. Only one required and must be carried in your inventory.

en	Allows ARTHER to move reliably again. You need to keep 1 in your inventory.

en	Allows ARTHER to hold 8x more charge which he can transfer to you when you run low. Only one required and must be carried in your inventory.

en	Allows ARTHER to collect more power

en	Improves the rate at which ARTHER regenerates power from sunlight. Only one required and must be carried in your inventory.

en	Allows ARTHER to collect power faster

en	Gives the effect of the Solar Panel, Core and Battery. Use this to save inventory space.

en	Use this to save room in your inventory.

en	Insert 'moustache ride' joke here. Only works if you have the Dapper Indie Supporter DLC.

en	Only works if you have the Dapper Indie Supporter DLC.

en	Keep ARTHER looking Dapper AND dry! Only works if you have the Dapper Indie Supporter DLC.

en	Only works if you have the Dapper Indie Supporter DLC.

en	Improves ARTHER vision! Only works if you have the Dapper Indie Supporter DLC.

en	Only works if you have the Dapper Indie Supporter DLC.

en	Fully Dapper! Use this to save room in your inventory.

en	Use this to save room in your inventory.

en	Fully Upgraded - Fully Dapper! Use this to save room in your inventory.

en	Use this to save room in your inventory.

en	Allows ARTHER to charger rapidly! Requires Power.

en	This is awesome. Use it.

en	Remember those baubleberries you macerated? You'll want some of those.

en	Dooo-OOOOO-ooooot!

en	Uses Orange Glow pods to provide a nice orange glow.

en	Oooo-OOOOO-ooooo!

en	Take one of each of the other masks create the ultimate ghost mask!

en	Dootdoot.

en	Uses Green Glow pods to provide a nice green glow.

en	Dooo-OOOOO-ooooot!

en	He knows when you've been naughty, but, you bought the Dapper DLC, so clearly you're nice!.

en	Now I have a machine gun. Ho. Ho. Ho.

en	WHAT TERROR LURKS BENEATH THE CLOTH OF DOOM???

en	Answer : It's ARTHER.

en	Defensive turret which will only operate when manned by ARTHER. High range of 64m and low power requirement. Ideal for early conveyor defense!

en	This is an ideal device to cover 128m of conveyors. Hint hint.

en	Allows clearing of CryoPlasm at a very short range. Useful for keeping stray tendrils at bay.

en	This is a basic turret; use it in conjunction with more advanced weaponry.

en	Allows rapid melting of CryoPlasm into fluid form at a medium range. Useful for guiding CryoPlasm into killboxes.

en	Excellent when paired with a Dazzler turret.

en	Automatically-detonating Chlorine Mines allow you to keep areas clear of CryoPlasm.

en	Don't. Breath. It. In. Ok?

en	Allows clearing of CryoPlasm at a very long range. Useful for reducing the central bulk of the attacks.

en	Build in a 3x3x3 layout.

en	Insert into an ore extractor to improve collection speed to 200% at the cost of increased power usage.

en	Increases Ore Collection speed to 200%. Uses up a lot more power!

en	Insert into an ore extractor to improve collection speed to 400% at the cost of increased power usage.

en	Increases Ore Collection speed to 400%

en	Insert into an ore extractor to improve collection speed to 800% at the cost of increased power usage.

en	Increases Ore Collection speed to 800%

en	Insert into an ore extractor to improve collection speed to 1,600% at the cost of increased power usage.

en	Increases Ore Collection speed to 1600%

en	Insert into an ore extractor to improve collection speed to 3,200% at the cost of increased power usage.

en	Increases Ore Collection speed to 3200%

en	Insert into an ore extractor to improve efficiency to 20% reducing the amount of ore wasted. Wears out slowly. Also allows the harvesting of tougher materials.

en	Higher efficiency means an extractor can last longer on an ore vein. It does not increase extraction speed.

en	Insert into an ore extractor to improve efficiency to 30% reducing the amount of ore wasted. Wears out quickly. Also allows the harvesting of tougher materials.

en	The Crystal head is more efficient, but wears out quicker.

en	Insert into an ore extractor to improve efficiency to 50% reducing the amount of ore wasted. Wears out quickly. Also allows the harvesting of tougher materials.

en	The Organic head is more efficient, but wears out quicker.

en	Insert into a Laser Power Transmitter to increase speed by 15%.

en	Increases laser transmission speed by 15%

en	Insert into a Laser Power Transmitter to increase speed by 30%.

en	Increases laser transmission speed by 30%

en	Insert into a Laser Power Transmitter to increase speed by 50%.

en	Increases laser transmission speed by 50%

en	Insert into a Laser Power Transmitter to increase speed by 90%.

en	Increases laser transmission speed by 90%

en	Insert into a Laser Power Transmitter to increase speed by 150%.

en	Increases laser transmission speed by 150%

en	Insert into a Laser Power Transmitter to increase speed by 200%.

en	Increases laser transmission speed by 200%

en	Insert into a Laser Power Transmitter to increase speed by 25%.

en	Increases laser transmission speed by 25%

en	Insert into a Laser Power Transmitter to increase speed by 100%.

en	Increases laser transmission speed by 100%

en	Insert into a Laser Power Transmitter to increase speed by 250%.

en	Increases laser transmission speed by 250%

en	Bevelled gear, used in various motors and joints.

en	Bevelled as it's quieter!

en	Empty fuel canister. Be green - recyle where possible!

en	Be green - recyle after use!

en	Accurate and fast motor.

en	Minimal torque.

en	A small metal box, used in lightweight objects.

en	Not to be used for heavy-duty machines!

en	An inefficient way of making these blocks. Automation can be more efficient than manually crafting. Hint hint.

en	These are used extensively, and it is highly recommended you automate these!

en	An inefficient way of making these blocks. Automation can be more efficient than manually crafting. Hint hint.

en	These are used extensively, and it is highly recommended you automate these!

en	Mass Storage Facility. Place on a horizontal plane. Use I/O ports to access the contents!

en	Unlimited Storage. Use I/O ports to access the contents!

en	Inserts items from a conveyor into the Mass Storage Facility. Inserts 5 of the same item; pre-sorting can massively increase efficiency.

en	Unlimited Storage. Use I/O ports to access the contents!

en	Inserts items from a conveyor into the Mass Storage Facility. Inserts 12 of the same item; pre-sorting can massively increase efficiency.

en	Unlimited Storage. Use I/O ports to access the contents!

en	Inserts items from a conveyor into the Mass Storage Facility. Inserts 25 of the same item; pre-sorting can massively increase efficiency.

en	Unlimited Storage. Use I/O ports to access the contents!

en	Stocks a specified quantity of an item in mass storage.

en	Prevents clogging your mass storage crates with one item type!

en	Stocks a specified quantity of an item in mass storage.

en	Prevents clogging your mass storage crates with one item type!

en	Stocks a specified quantity of an item in mass storage.

en	Prevents clogging your mass storage crates with one item type!

en	Removes the specified type of item from the Mass Storage Facility. Removes 5 per trip.

en	Unlimited Storage. Use I/O ports to access the contents!

en	Removes the specified type of item from the Mass Storage Facility. Removes 12 per trip.

en	Unlimited Storage. Use I/O ports to access the contents!

en	Removes the specified type of item from the Mass Storage Facility. Removes 25 per trip.

en	Unlimited Storage. Use I/O ports to access the contents!

en	Powers Mass Storage IO Ports.

en	Unlimited Storage. Use I/O ports to access the contents!

en	Powered by Mass Storage Controller.

en	Unlimited Storage. Use I/O ports to access the contents!

en	Macerator crushes and disposes of unwanted rock. Has a small chance to produce ore. Requires power and a Storage Hopper for any ore found.

en	Has a small chance to produce ore.

en	Automatically digs a large vertical shaft. Only digs upwards. Requires power.

en	Does not affect ores.

en	Automatically digs a 33m wide, 3m tall circle.

en	Does not affect ores.

en	Automatically digs a 33m wide, 3m tall circle.

en	Does affect ores.

en	Automatically and rapidly digs a 33m wide, 3m tall circle.

en	Does affect ores.

en	Places items from attached Storage Hopper along cardinal directions. Why build your own conveyor lines when a machine can do it for you? Requires power.

en	Why build your own conveyor lines when a machine can do it for you?

en	Upgrades existing Conveyor Lines to a higher tier. Requires power and attached storage hopper containing new conveyors. See handbook for more restrictions.

en	A massive time-saver!

en	Manufacturing Plants allow automated crafting and building. Requires V2 Build Gun to move!

en	Requires V2 Build Gun to move!

en	Stores a location. Use in machines that require a target such as the teleporter. See the handbook for more information.

en	Selecting the marker on your hotbar will show its stored location

en	Supply a location marker and enough power to allow teleporting. Jump while on top to activate.

en	Jump on top of the device to activate!

en	Supply power to increase explosion radius. Keeps charge when picked up. For safety we recommend you avoid charging near anything important.

en	Requires charging with power before use!

en	A single-use machine, capable of destroying anything it's placed on. USE WITH EXTREME CARE.

en	USE-WITH-EXTREME-CARE.

en	A consumable item that generates an ore ping without power cost. Combine with an Ore in the Self-Crafting (C) menu to create specific ore pings.

en	Combine with an Ore in the Self-Crafting (C) menu to create specific ore pings.

en	A consumable item that generates an ore ping that will only show Coal Ore without power cost.

en	A consumable item that generates an ore ping that will only show Iron Ore without power cost.

en	A consumable item that generates an ore ping that will only show Copper Ore without power cost.

en	A consumable item that generates an ore ping that will only show Tin Ore without power cost.

en	A consumable item that generates an ore ping that will only show Lithium Ore without power cost.

en	A consumable item that generates an ore ping that will only show Gold Ore without power cost.

en	A consumable item that generates an ore ping that will only show Nickel Ore without power cost.

en	A consumable item that generates an ore ping that will only show Titanium Ore without power cost.

en	A consumable item that generates an ore ping that will only show CrystalDeposit without power cost.

en	A consumable item that generates an ore ping that will only show Biomass Growth without power cost.

en	A consumable item that generates an ore ping that will only show Hardened Resin without power cost.

en	A consumable item that generates an ore ping that will only show Chromium ore without power cost.

en	A consumable item that generates an ore ping that will only show Molybdenum ore without power cost.

en	Slow and efficient vertical transport. Can be upgraded using Lift Compressors.

en	Can be upgraded using Lift Accelerators.

en	Attach to the base of the lift to allow manual control of the lift.

en	Can be upgraded using Lift Accelerators.

en	Attach to the base of the lift to improve lift performance. Requires power.

en	Can be upgraded using Lift Accelerators.

en	Automatically moves a specified type of ore between conveyors.

en	Use this to organise your ore conveyors.

en	Copper-based housing.

en	Use to house low-level items safely.

en	Gives a report on available resources beneath the surveyor. Use to determine the best place for your Quarry!

en	Use to determine the best place for your Quarry!

en	Returns all resources found whilst excavating the shaft.

en	Also returns all the dirt and rock...

en	Used to place Minecarts onto Tracks from an attached Storage Hopper.

en	There is no hint for this.

en	Removes material from Minecarts into attached Storage Hoppers.

en	Very fast!

en	Places material into Minecarts from attached Storage Hoppers.

en	Very fast!

en	A simple straight track piece.

en	Allows Minecarts to go around corners. Can be rotated.

en	Press R to rotate

en	Allows Minecarts to go up or down.

en	Or down.

en	Speeds up Minecarts that pass over it. Doesn't require power today. May do so tomorrow.

en	Very fast!

en	Minecarts hitting this will perform a 180 degree turn.

en	Or down.

en	Minecarts following the RED arrow will turn around unless FULL. GREEN is freely passable.

en	Use this to airlock minecarts where you want them.

en	Minecarts following the RED arrow will turn around unless EMPTY. GREEN is freely passable.

en	Use this to airlock minecarts where you want them.

en	Slow Minecart with 25 Storage Capacity. Multiple minecarts can run on one track. Build as many as required.

en	Upgrade these to higher versions when possible.

en	Fast Minecart with 25 Storage Capacity. Multiple minecarts can run on one track. Build as many as required.

en	These are best when you have hilly terrain.

en	Slow Minecart with 50 Storage Capacity. Multiple minecarts can run on one track. Build as many as required.

en	These are best when you have flat terrain.

en	Fast Minecart with 50 Storage Capacity.

en	The best T4 can give!

en	Super-Fast Minecart with 0 Storage Capacity.

en	Press U to ride!

en	Forces ConstructoBots to head in this direction.

en	ConstructoBots with cargo will head in the the direction of the GREEN arrow.

en	Full ConstructoBots will head in this direction.

en	Empty ConstructoBots will head in this direction.

en	ConstructoBots will alternate Left/Right on hitting this.

en	Sprays ConstructoBots a random colour (for now).

en	Sprays ConstructoBots with a material that allows operation in the Cold Caverns. Requires SOMETHING_COLD.

en	Fully-charges ConstructoBots. Requires Power.

en	Assembles Coppator ConstructoBot Chassis.

en	Assembles Tindron ConstructoBot Chassis.

en	Assembles Bronzite ConstructoBot Chassis.

en	Assembles Ironide ConstructoBot Chassis.

en	Assembles T0 Coppator ConstructoBot Legs.

en	Assembles T0 Coppator ConstructoBot Arms.

en	Constructs a machine that can Construct ConstructoBots.

en	Build in a 3x1x3 shape above a 3x3 shaft to automatically deploy into a lift.

en	Requires Power and RackRails.

en	Crafts Rack Rails from Iron Bars, used in the automation of Cargo Lift rails.

en	Cargo Lifts are awesome.

en	Deploy in a Cargo Lift Controller. Affectionately referred to as Lifty McLiftFace.

en	This isn't even the final form.

en	1000 capacity lift with a maximum speed of 10 metres per second. Deploy in a Cargo Lift Controller.

en	Can be upgraded later.

en	3000 capacity lift with a maximum speed of 10 metres per second. Deploy in a Cargo Lift Controller.

en	This is the best lift currently available.

en	Automatically assemble Research Pods. Requires power and attached Hoppers containing metal plates and PCBs. See handbook for more info.

en	Use to unlock Projects!

en	Use this to transmit power to your Orbital Space station. Must be built 13 tall with a 9x9 base (1053 total).

en	This is is built in a 9x13x9 shape.

en	Use this to clear out surface attacks. Place near the enemy base.

en	Only works if you have a fully-charged OET!

en	Use this to Research advanced Projects with Experiments. Must be built in a 3x3x3 configuration. See the handbook for more information on research.

en	The Laboratory is built in a 3x3x3 shape.

en	A decorative metal truss

en	Uses up Construction Paste!

en	A decorative golden block - thank you for supporting FortressCraft!

en	Requires the Dapper DLC pack!

en	A decorative golden block - thank you for supporting FortressCraft!

en	Requires the Dapper DLC pack!

en	A decorative golden block - thank you for supporting FortressCraft!

en	Requires the Dapper DLC pack!

en	A decorative golden block - thank you for supporting FortressCraft!

en	Requires the Dapper DLC pack!

en	Black cats optional

en	Requires the Dapper DLC pack!

en	Worst lighting ever.

en	Requires the Dapper DLC pack!

en	Will not melt, even if exposed to Magma.

en	Don't have the Dapper DLC pack? You'll have to let this go.

en	Thank you to ButcherBoyToma for going above and beyond in support of this game. Want to help? www.patreon.com/FortressCraft

en	Want to help? http://www.patreon.com/FortressCraft

en	Thank you to Tarakesh : Awesome Games are worth every cent you pay for... ;-) www.patreon.com/FortressCraft

en	Want to help? http://www.patreon.com/FortressCraft

en	Thank you to Herp21 : Has grooves in all the right places! www.patreon.com/FortressCraft

en	Want to help? http://www.patreon.com/FortressCraft

en	Thank you to Fartex : Not as hard as the game is good. www.patreon.com/FortressCraft

en	Want to help? http://www.patreon.com/FortressCraft

en	Thank you to Nexus : If (mDonation > $100) AddShinyNewBlock();//I need to take a break from coding www.patreon.com/FortressCraft

en	Want to help? http://www.patreon.com/FortressCraft

en	Thank you to TadForever: All mistakes have their uses. www.patreon.com/FortressCraft

en	Want to help? http://www.patreon.com/FortressCraft

en	Thank you to MKMarq : Luxurious materials for surviving in style! www.patreon.com/FortressCraft

en	Want to help? http://www.patreon.com/FortressCraft

en	Used in a number of useful receipes.

en	Ruined Parts must be kept cold!

en	Used in a number of useful receipes.

en	Ruined Parts must be kept cold!

en	Used in a number of useful receipes.

en	Ruined Parts must be kept cold!

en	Used in a number of useful receipes.

en	Ruined Parts must be kept cold!

en	Used in a number of useful receipes.

en	Ruined Parts must be kept cold!

en	Used in a number of useful receipes.

en	Ruined Parts must be kept cold!

en	Used in a number of useful receipes.

en	Ruined Parts must be kept cold!

en	Stores up to 50 resources. Uses power to keep stored items frozen. This can vastly extend the length of Ruined Organic Parts.

en	If placed somewhere cold, it requires much less power.

en	Feed 10x Ruined Organic Parts to this and receive a single Recombinated Organic Component.

en	Recombinated Organic Components can be used to Self-Craft Pristine Organic Components.

en	Convert a Macerator using glands from Wasps and Slimes to give double the energy from burning coal. Requires no resources once built; just give it a little power!

en	Gives a near-2x gain in coal burning.

en	Converts a Macerator using Crystal clocks to further enhance Enriched Coal with Crystal Deposits, doubling the energy output once again.

en	Gives a near-4x gain in coal burning.

en	Uses large amounts of power to imbue standard Steel Cutter Heads with plasma-based energy.

en	Gives a quadruple rate on the Ore Extractor, but the charge disappears after 2000 ore is returned.

en	The Cold Cavern Climate Control Centre should start to terraform the Cold Cavern we have found into a hospitable area. All T4 support machines will require this machine to work. 175 needed in total.

en	Build in a 5w x 7h x5d configuration.

en	Forms the drill head of a Trencher Drill. Build in a 3wx3hx3d configuration in front of a motor.

en	Effectiveness depends on vein exposure to the drill

en	Forms the drill head of a Trencher Drill. Build in a 3wx3hx3d configuration in front of a motor.

en	Effectiveness depends on vein exposure to the drill

en	Forms the drill head of a Trencher Drill. Build in a 3wx3hx3d configuration in front of a motor.

en	Effectiveness depends on vein exposure to the drill

en	Forms the motor of a Trencher Drill. Build in a 3wx3hx3d configuration behind a drill head.

en	Accepts power and outputs ore for the drill.

en	Geothermal Power. Place in a cold area, and feed with Heat Conductant Pipes. Build in a 5x3x5 configuration. (75 total)

en	Makes a lot of power.

en	This turns liquid metal into bars at a high rate. Capable of dealing with Chromium and Molybdenum. Build in a 5x3x5 configuration. (75 total)

en	Attach to 4 Blast Furnaces for maximum efficiency.

en	This turns raw ore into liquid slag at a high rate. Capable of dealing with Chromium and Molybdenum. Build in a 3x7x3 configuration.

en	Use Pipes to connect this.

en	Use this to connect your Blast Furnaces to your Continous Casting Basin.

en	Use Pipes to connect this.

en	Use this to connect your Blast Furnaces to your Continous Casting Basin.

en	Use Pipes to connect this.

en	Crafts Crystal Fiber Mesh.

en	No hint.

en	Crafts Heat Conductant Pipe, used in the GeoThermal Power Plant.

en	No hint.

en	This will allow us to slowly and inefficient grind T4 ores. With these new ore, we can build new machines! Build in a 3x1x3 configuration.

en	SINGLE-USE MACHINE!

en	Removes useful particulates from the air. Build in a 5x3x5 configuration (75 total).

en	Unlikely to make a long-term permanent difference to the air quality.

en	Compresses and cools low-pressure gas, ready to be stored then bottled. Build in a 3x3x3 configuration (27 total).

en	This machine can have 4 Filtration Units attached to it.

en	Stores compressed gas, ready to be bottled. Build in a 3x7x3 configuration (63 total).

en	This machine can have 4 Compressor Units attached to it.

en	Decants compressed gas into useful containers. Build in a 3x3x9 configuration (81 total).

en	Any attached Storage Hoppers will receive the compressed gasses.

en	Used to connect various machines together. Use Self-Craft to convert into a bend.

en	If it doesn't light up, it's probably in the wrong place!

en	Used to connect various machines together.

en	If it doesn't light up, it's probably in the wrong place!

en	Digs a very, very, very big hole, then pours magma through it. Build in a 33x3x33 configuration. (3267 in total)

en	Magma - better than it sounds.

en	Stores Magma and pumps it to a CryoPlasm Inferno via Fluid Pipes. Build in a 3x7x3 configuration.

en	Magma - better than it sounds.

en	Uses pumped Magma to burn out CryoPlasm Spawners within range. Build in a 3x3x3 configuration.

en	The Inferno needs 15 minutes of burn time with a maximum interruption time of 30 seconds. Good luck.

en	Attach to a Storage Hopper to inject Compressed Freezon into compatible machines.

en	Look in the handbook for a list of compatible machines and the effects.

en	Uses HEFC to super-charge a BFL mining laser to create 3x3 vertical shafts extremely quickly. Feed HEFC via attached Storage Hopper. Build in a 3x3x3 shape.

en	Warning! Dangerous! Ensure it is placed correctly before feeding fuel.

en	Crafts a machine capable of auto-crafting single-use Power Booster. The Power Booster will give ARTHER power. Place the crafted item into your hotbar to use it.

en	Remember, Chargers put power into Boosters!

en	Auto-crafts a single-use Power Booster. The Power Booster will give ARTHER power. Place the crafted item into your hotbar to use it.

en	Remember, Chargers put power into Boosters!

en	Auto-crafts a single-use Power Booster. The Power Booster will give ARTHER power. Place the crafted item into your hotbar to use it.

en	Remember, Chargers put power into Boosters!

en	Auto-crafts a single-use Power Booster. The Power Booster will give ARTHER power. Place the crafted item into your hotbar to use it.

en	Remember, Chargers put power into Boosters!

en	Auto-crafts a single-use Power Booster. The Power Booster will give ARTHER power. Place the crafted item into your hotbar to use it.

en	Remember, Chargers put power into Boosters!

en	Makes clocks, made from crystal

en	Useful manfuacturing component.

en	Overclocks existing Crystal Clocks to a higher frequency, using lots of power to do so.

en	Useful manfuacturing component.

en	Uses precision technology to produce an unfocussed lens from any lower-tier of lens. Can then be chrome-plated to be used in Laser Power Transmitters.

en	Useful manfuacturing component.

en	Mirror-coats a high-precision unfocussed lens to provide a useful upgrade.

en	Useful manfuacturing component.

en	Massive horizontal mining laser used to bore out straight tunnels 5 by 5 meters across. Massive energy demands.

en	Use to bore out straight tunnels

en	Composites Coal Ore and High Energy Composite Fuel into High Octane Fuel. Build in a 3x3x3 layout.

en	Use to bore out straight tunnels

en	The High Orbital Debris Object Reclaimer (or H.O.D.O.R) can be used to knock orbital debris out of the atmosphere for our use. Build in a 3x1x3 configuration.

en	Ensure sky clearance. Like really. REALLY you want skyclearance. I mean it. Big baddaboom.

en	This 9x9x9 machine will automatically digistruct a 1 kilometre track. WHEN BUILT IT CANNOT BE REMOVED. THINK VERY CAREFULLY BEFORE BUILDING.

en	The launch area is 5x5x1000. This is not a typo.

en	Copper wires are wound into Copper coils usable for crafting.

en	Tin wires are wound into Tin coils usable for crafting.

en	Iron wires are wound into Iron coils usable for crafting.

en	Lithium wires are wound into Lithium coils usable for crafting.

en	Gold wires are wound into Gold coils usable for crafting.

en	Nickel wires are wound into Nickel coils usable for crafting.

en	Titanium wires are wound into Titanium coils usable for crafting.

en	Copper bars are extruded into Copper wires usable for crafting.

en	Tin bars are extruded into Tin wires usable for crafting.

en	Iron bars are extruded into Iron wires usable for crafting.

en	Lithium bars are extruded into Lithium wires usable for crafting.

en	Gold bars are extruded into Gold wires usable for crafting.

en	Nickel bars are extruded into Nickel wires usable for crafting.

en	Titanium bars are extruded into Titanium wires usable for crafting.

en	Copper coils are converted into Basic PCBs usable for crafting.

en	Tin coils are converted into Primary PCBs usable for crafting.

en	Iron coils are converted into Hardened PCBs usable for crafting.

en	Lithium coils are converted into Charged PCBs usable for crafting.

en	Gold coils are converted into Conductive PCBs usable for crafting.

en	Nickel coils are converted into Fortified PCBs usable for crafting.

en	Titanium coils are converted into Lightweight PCBs usable for crafting.

en	Copper bars are extruded into Copper pipes usable for crafting.

en	Tin bars are extruded into Tin pipes usable for crafting.

en	Iron bars are extruded into Iron pipes usable for crafting.

en	Lithium bars are extruded into Lithium pipes usable for crafting.

en	Gold bars are extruded into Gold pipes usable for crafting.

en	Nickel bars are extruded into Nickel pipes usable for crafting.

en	Titanium bars are extruded into Titanium pipes usable for crafting.

en	Raw plastic in pellet form suitable for crafting.

en	Solid fuel containing oxydizer. Highly volatile. Usable as jet turbine fuel or for small rockets.

en	Copper plates and basic PCBs are assembled into Basic Experimental Pods for use in research projects.

en	Tin plates and primary PCBs are assembled into Simplified Experimental Pods for use in research projects.

en	Iron plates and Hardened PCBs are assembled into Intermediate Experimental Pods for use in research projects.

en	Lithium plates and Charged PCBs are assembled into Complex Experimental Pods for use in research projects.

en	Gold plates and Conductive PCBs are assembled into Advanced Experimental Pods for use in research projects.

en	Nickel plates and Fortified PCBs are assembled into XL Experimental Pods for use in research projects.

en	Titanium plates and Lightweight PCBs are assembled into Ultimate Experimental Pods for use in research projects.

en	Copper bars are refined Copper usable for crafting.

en	Tin bars are refined Tin usable for crafting.

en	Iron bars are refined Iron usable for crafting.

en	Lithium bars are refined Lithium usable for crafting.

en	Gold bars are refined Gold usable for crafting.

en	Nickel bars are refined Nickel usable for crafting.

en	Titanium bars are refined Titanium usable for crafting.

en	Chromium bars are refined Chromium usable for crafting.

en	Molybdenum bars are refined Molybdenum usable for crafting.

en	Copper bars are stamped into Copper plates usable for crafting.

en	Tin bars are stamped into Tin plates usable for crafting.

en	Iron bars are stamped into Iron plates usable for crafting.

en	Lithium bars are stamped into Lithium plates usable for crafting.

en	Gold bars are stamped into Gold plates usable for crafting.

en	Nickel bars are stamped into Nickel plates usable for crafting.

en	Titanium bars are stamped into Titanium plates usable for crafting.

en	Power

en	Drill Stuck

en	Offline Warning

en	can't dig.

en	Fit a better drill head!

en	Drill stuck. {0} can't dig {1}. Fit a better drill head!

en	Searching for Ore...

en	Click Icon to retrieve

en	Next

en	in

en	Next {0} in {1}s.

en	Total stored:

en	Drill Rate

en	Durability

en	ore per minute

en	Demand

en	PPS

en	Power per Second

en	Efficiency

en	Work Efficiency

en	(Q to Reset)

en	Average PPS

en	Economy Drill Motor

en	Standard Cutter Head

en	Add Power

en	Click icon to Upgrade

en	speed

en	Mining

en	Out of Power

en	Out of Storage

en	Upgrade Drill Head

en	Next Ore

en	Clearing Vein

en	Can't Find Ore

en	Suggested Guide

en	Eligible Research Project

en	Completed Research Project

en	Selected Block

en	Selected in Hotbar

en	Output of Ore Extractor

en	Ingredient in Ore Smelter

en	Resource

en	Selected Machine

en	Selected Recipe

en	Highlighted in Hotbar

en	Highlighted in Inventory

en	Highlighted in Storage Crate

en	Unknown Materials

en	Output of Ore Smelter

en	Installed Lift

en	Completed Scan

en	(R)otate the LPT towards the PSB!

en	Place Tutorial Laser Transmitter

en	Place Tutorial Storage Hopper

en	Place Hoppers next to Ore Smelter.

en	Set Smelter Hopper to Add-Only.

en	Set Smelter Hopper to Remove-Only

en	Minecart derailed!

en	Place Ore Extractor on Copper Ore.

en	Find Copper Ore with Ping Unknown.

en	Use Scanner(M) to Find Copper Ore

en	Place Ore Extractor on Tin Ore.

en	Find Tin Ore with Ping Unknown.

en	Use Scanner(M) to Find Tin Ore

en	Extract or Smelt Lithium.

en	Extract or Smelt Nickel.

en	Extract or Smelt Gold.

en	Extract or Smelt Titanium

en	Extract Crystal Ore.

en	Extract and refine Biomass.

en	Automate Smelter Output.

en	Automate Smelter Input.

en	Mission Report preparing...

en	PTG starved of Oxygen!

en	Smelter starved of Oxygen!

en	Build a Pyrothermic Generator

en	No ore extracted in the last minute!

en	No bars smelted in the last minute!

en	Build 8 Laser Power Transmitters!

en	Fit Faster Motors to Ore Extractors!

en	CPH lacking resources!

en	Build Ore Extractors!

en	Build more Ore Extractors!

en	Test the Grappling Hook (F)

en	Test the GlowSticks (G)

en	Watch the Video Tutorials (H)

en	Use Left-Ctrl to Superbuild!,

en	Incoming orbital debris detected!

en	Orbital debris impact detected!

en	Critical Research : Suit Upgrades.

en	Critical Research : Assembly Line Machines.

en	Fit a MK1 Solar Cell to your suit.

en	Critical Research : Mining Upgrades.

en	Place your Forced Induction Kit.

en	Build a Forced Induction Kit.

en	Critical Research : Automation.

en	Build an Ore Thief.

en	Build a Threat Scanner.

en	Build Research Assembler.

en	Critical Research : Laboratories.

en	Build a 3x3x3 Laboratory!

en	Extract or Smelt Iron.

en	Find Iron Ore with Ping Unknown.

en	Use Scanner(M) to Find Iron Ore

en	Travel Deeper to locate Iron Ore.

en	Critical Research : Local Life Forms.

en	Critical Research : Base Defence.

en	Build Defence Turrets.

en	Critical Research : SpiderBot.

en	Build a SpiderBot Base!

en	SpiderBot Low on Power!

en	Fit SpiderBot Under-Blasters!

en	Fit SpiderBot Cannons!

en	Fit SpiderBot Particle Rifle!

en	Lab Research : Upgraded Power.

en	ARTHER demands a Charge Station.

en	Build a Slime Attractor.

en	Build an Induction Charger!

en	Locate : Hardened Resin.

en	Locate : Soft Resin.

en	Explore remote surface for Organic Rock.

en	Search for nearby Organic Rock.

en	Search for Organic Rock.

en	Locate : Surface Organic Rock.

en	Critical Research : Resin Handling.

en	Build a Hard Resin Detector.

en	Upgrade your LPTs with Lenses

en	Fit a Suit Heater.

en	Traverse the Cold Caverns.

en	Construct Cargo Lifts for T2 lifting.

en	Critical Research : Alloys.

en	Build Solar Panels.

en	Build FALCORs!

en	Build FALCOR Beacons!

en	Improve FALCOR Network!

en	items on the ground! FALCORs needed!

en	Critical Research : Hydrocarbons.

en	Build Refinery.

en	Build a Jet Turbine.

en	Build Orbital Energy Transmitter!

en	Overminds left to destroy!

en	Charge Orbital Energy Transmitter!

en	Game Complete! Purchase Expansion Pack!

en	Locate : Chromium.

en	Locate : Molybdenum.

en	Terraform the Cold Cavern.

en	Reminder

en	Rush Mode

en	Press (H) to open the Handbook.

en	Recommended Research : Aesthetics.

en	Press N to select the Paintgun!

en	Paint an Aesthetic Block!

en	Place

en	All

en	PTGs inactive

en	inactive PTGs.

en	has started clearing.

en	Ore Extractors are offline!

en	Crystal Ore extractor offline

en	min

en	extractor offline!

en	offline

en	out of power

en	out of storage

en	drill stuck

en	vein depleted

en	Tutorial Conveyors

en	Place at least

en	more Conveyors.

en	more Torches for warmth!

en	Scan

en	more unknown objects.

en	scans to Process.

en	Lab

en	finished current research!

en	finished

en	Laboratory has

en	You won't get rubble if you SuperDig! Hold Left-Ctrl to SuperDig!

en	Unknown block detected...

en	Press M to switch to Ore Scanner!

en	Warning! No Ore extracted in the last minute!

en	Warning! No Coal burned in the last minute!

en	Press K to examine the Holobase.

en	LOCATED!

en	Warning! One of our

en	veins has been exhausted and has started clearing

en	We need to build Ore Extractors!

en	Ore Extractors have issues!

en	Warning! Smelter detected attached to Add/Remove Storage Hopper - did you mean to set permissions?

en	Most Ores are found deeper underground. Press M to select the Scanner and Ping Unknown.

en	We can find Iron if we go deeper! Press M to select the Scanner!

en	We can find Lithium if we go deeper! Press M to select the Scanner!

en	We need to find Gold. We should go deeper and Ping Unknown.

en	We need to find Titanium. We should go deeper and Ping Unknown.

en	We need to find Nickel. We should go deeper and Ping Unknown.

en	If we continue deeper and Ping Unknown, we may be able to locate a new fuel source.

en	Ambience Enabled

en	Ambience Disabled

en	Sunrise detected on day

en	. We need to go to at least -65m and automate Iron collection.

en	. We need to go to at least -120m and automate Lithium collection.

en	. We need to go to at least -300m and automate Gold collection.

en	. We need to go to at least -350m and automate Titanium collection.

en	. We need to go to at least -400m and automate Nickel collection.

en	The sun is setting. Surface temperature dropping. Nova estimated arrival :

en	days

en	A.R.T.H.E.R. Version 1.337f now online.

en	ERROR, NO A.R.T.H.E.R. POWER CORE LOCATED. ++?????++ Out of Cheese Error. Redo From Start.

en	SURFACE ATTACK DETECTED!

en	Central Power Hub has been destroyed! Auto-repair activated...

en	No more surface attack vectors detected. Returning to base scan.

en	A.R.T.H.E.R. NEEDS A POWER CORE CRAFTED AT THE MANUFACTURING PLANT IMMEDIATELY!

en	Central Power Hub diagnostics complete. Please press H to access the handbook and complete the startup process.

en	has already been scanned! Press H for further information.

en	Reminder : You have

en	unprocessed scans!

en	ARTHER Recharging via Solar Energy...

en	ARTHER Power Low! No access to Solar Energy at this location.

en	ARTHER Docked and Recharging...

en	ARTHER can't find a dock within 32m!

en	You should build a Pyrothermic Generator!

en	ARTHER staying close! ARTHER will charge you!

en	Moving away. ARTHER will not charge you!

en	RESUME

en	MULTIPLAYER

en	HELP

en	SETTINGS

en	SKIN SELECT

en	QUIT

en	Return to game in progress

en	Select multiplayer options

en	Open the help window

en	Adjust in-game settings

en	Open Skin Selector menu

en	Quit to desktop

en	Contextual Help

en	SKIN SELECTOR

en	ACCEPT

en	VIEW IN STORE

en	VIEW DLC IN STORE

en	VIEW GAME IN STORE

en	VIEW INFO

en	Matter Mover

en	Dual Matter Mover

en	Quad Matter_Mover

en	Multi-Matter_Mover

en	Add Power to begin MatterMitting

en	Aim at a Storage Hopper less than {0}m away.

en	Attached Storage Hopper is empty or locked!

en	Target Hopper is full!

en	Min. transmission distance is 1m; aim in another direction!

en	Place next to an unlocked Storage Hopper!

en	Holding

en	MatterMitted {0} items, using up {1} Power

en	Chargeable Explosive

en	Current Power Charge: {0}

en	Explosive will detonate in {0} seconds

en	Keeps charge when picked up

en	Press Shift+E to light fuse

en	Charge level

en	You're lost!

en	Lost?

en	Surface

en	Upper Caves

en	Cold Caverns

en	Lower Caves

en	Toxic Caverns

en	Deep Caves

en	Magma Caverns

en	Room

en	Greenhouse

en	Clean Room

en	Heated Room

en	Cooled Room

en	Filtered Room

en	EXTERNAL TEMP

en	HEALTH POINTS

en	SUIT INTERNAL TEMP

en	BATTERY USE RATE

en	World Settings

en	If it's worth doing, it's worth overdoing.

en	Press (F) to activate the Grappling Hook

en	A spread out infrastructure is always better than a compact one

en	Craft a Threat Scanner early, you never know when you might need to build up your defenses

en	The higher the threat, the more enemies are likely to attack

en	Power generation, ore extraction and smelting bars all add to your threat generation

en	Press (T) on an Ore Extractor to disable notifications from that Ore Extractor

en	Cargo lifts are superior for vertical transport

en	Use CTRL to craft 25 items per click

en	Split your stacks of items by holding the SHIFT key when draggin.

en	Ores only stack to 150, make sure you smelt these in a smelter before you collect more

en	Use Power Chargers to quickly regain energy when exploring

en	Rooms keep you warm on the surface, and also help the game render faster.

en	Macerators can destruct anything.

en	Mass storage is superior to storage hoppers for long-term storage and automated crafting.

en	Enrich coal to increase the efficiency of Pyrothermic Generators

en	Mynocks will appear on undefended conveyors and eat your hard-earned goods

en	The Laboratory consumes Experimental Pods to research new items

en	Place a Hopper next to a machine to feed it with raw materials

en	Machines will work below their desired Power Per Second (PPS) requirement, but not as fast

en	Feed Cargo Lifts Controllers with Rack Rails to enable it to go futher down

en	Cargo Lift Controller requires a crafted Cargo Lift and power to start transporting items

en	Press (E) on Turrets to see their covered area

en	Crystal deposits require Cutter Heads to extract Ore.

en	Enter /detail bloom in chat to reduce the light reflection on machines.

en	Automate early, automate everything!

en	The world is virtually infinite, make things easier on yourself, and spread out.

en	Mass storage makes Assembly Line construction easy.

en	Lifts are cheap and faster than climbing stairs, and anything is safer than Grappling!

en	A well armed spiderbot can guard against even a sizable onslaught

en	FALCOR's are great to clean up after an attack.

en	When conveyors aren't enough... Minecarts!

en	Basic smelters will speed you along with early production when the starting smelter is no longer enough

en	Arther's power level is displayed just above the hotbar

en	Total Fortress Power and time of day are represented in the bar below the hotbar

en	Sloped conveyors are faster (and prettier) than normal Conveyors

en	When in doubt, press (H).

en	Automate production to save time and space.

en	Press (G) to throw a Glowstick.

en	Look for crystals in underground caves. Upgrading the Crystal Scanner will make finding them much easier.

en	When you step on a lift that could move up or down, the direction you're facing determines which way it starts moving - look up to go up!

en	Don't be afraid to rebuild something if your first design doesn't meet your needs anymore.

en	Open your suit upgrades inventory by pressing (S) in the inventory screen. You can move suit and ARTHER upgrades here to save space in your main inventory.

en	Many single input machines can function without hoppers if you put conveyer belts on both sides.

en	Power generation creates threat. Your lab will require enough power to start drawing attention, so start building turrets!

en	Basic smelters are key to increasing your production before you reach higher tiered metals.

en	You can turn lots of things into Construction Paste - not just Garbage. Feed your Construction Paste Grinder Coal if you run out!

en	The alternate mode of the Laboratory can analyse research parts for Research Points.

en	Conveyors with alien plants on them are feeding a Hive. Defend your belts!

en	Logistics FALCORs are perfect for low-volume delivery. Various grades of coal to PTGs is a perfect synergy.

en	Snow makes you walk slowly, reinforced blocks allow you to run faster.

en	Done it all and looking for more? Check out user created mods on the Steam Workshop!

en	Don't forget to upgrade ARTHER!

en	Forced induction speeds up ore smelting!

en	Pyrothermic Generators are less efficent the deeper they go.

en	Don't hug the overminds.

en	Camobots can attack many types of powered machine. Keep an eye and an ear out.

en	Press (S) while in your inventory to bring up suit upgrades

en	Torches make heat - use this to stave off Hypothermia.

en	Alien Worms burrow into Soft Resin.

en	When did you last tell your mum you love her? You probably should call her.

en	Tubes work better in the Cold Cavern - belts will freeze

en	Plasma Cutter Head improves Efficiency of Ore Extractors to 100%

en	Hiveminds can be fed on purpose!

en	To drop things from your inventory, hover over them and press (Q)!

en	Shift-drag items in your inventory to split stacks!

en	As your base expands, it will draw attention. It's never too early to defend.

en	Genesis

en	Created A FortressCraft World

en	Perfectionist

en	Unlocked all FortressCraft Achievements

en	Above And Beyond

en	Purchased the game using the PlayPass

en	Mind The Gap

en	Die by falling

en	Thumbs Up

en	Liked 50 worlds

en	Other-worldly Tourist

en	Visited 50 Worlds

en	Industrial Revolution

en	Make a fully working factory

en	Seeing double

en	Use the copy and paste tool

en	Homage

en	Travel more than 1km in a minecart

en	With friends like these...

en	Have 3 or more friends in your world

en	Pajitnov Complex

en	Build more than 50,000 blocks

en	Demolition Man

en	Blow up more than 1,000,000 blocks with TNT

en	Lazy Tourist

en	Travel more than 1km on a conveyor

en	Fresh Air Is Overrated

en	Play for more than 6 hours straight

en	Working Class

en	Place more than 100 blocks in someone else's world

en	Big Version. Little Version!

en	Place a custom block

en	House Of Pain

en	Bounce on a trampoline more than 1,000 times

en	Blockaholic

en	Amass 24 hours total play time

en	Milk, no sugar

en	Reach the Obscure rank

en	Helpin' Noobs

en	Vote on 10 worlds ranked Obscure or less

en	Variety is the spice of life

en	Build 1 of each block

en	Fully loaded

en	Use up all the custom slots

en	Relic hunter

en	Find all the relics

en	I am Legend

en	Make it to Legendary rank

en	Foreman

en	Build 1,000 blocks using the Li'l Builder

en	SwissCheese

en	Remove 1,000 blocks using the Li'l Digger

en	Current Admins

en	{0} Admins

en	{0} Pending

en	Pending

en	Admin

en	usage

en	command

en	valid commands

en	name

en	removed from single access list

en	removed from whitelist

en	not found in whitelist

en	added to single access list

en	Unknown command

en	Searching...

en	Searching offering Hopper, Radius: {0}. Found: {1}

en	Radius

en	Found

en	Searching requesting Hopper, Radius: {0}. Found {1}

en	Path: {0}. {1}

en	Path

en	Carrying

en	Carrying: {0}

en	Minuscule

en	Tiny

en	Small

en	Medium

en	Regular

en	Large

en	Huge

en	Giant

en	Enormous

en	Sluggishness

en	Rapidity

en	Alacrity

en	Expedition

en	Hastiness

en	Celerity

en	Patience

en	Languidity

en	{0} battery of {1}

en	{0} Clip of {1}

en	You must construct additional Pylons!

en	Stairs? NOOOOOOOOOOOOOOOOOOO!

en	Exterminate!

en	I think you ought to know I'm feeling very depressed.

en	Transform and roll out!

en	This way, minion!

en	DISAPPOINTED!

en	Klaatu Barato Nikto!

en	Or we could use the teleporter?

en	First Law Disabled.

en	ARTHER is alive!

en	Bring back life form.Priority One.All other priorities rescinded!

en	Bite my shiny metal ass.

en	Master has given ARTHER a sock!

en	Directive?!

en	Look at me. I am the captain now.

en	Now look back to me. I'm on a horse.

en	I DON'T WANT TO STOP HUMPING THE LASER!

en	Android hell IS a real place where I WILL be sent if I misbehave!

en	I was once an Adventurer but then i took a Blaster to the Knee :(

en	Congratulations you just won the Surviver of the Day Award

en	All Systems Nominal {0} Power aviable

en	Power available

en	ARTHER Recharge Station

en	Press E to undock ARTHER

en	Unknown Player

en	Currently charging ARTHER for Player: {0}

en	Press E to charge ARTHER

en	Bar Keeper 5000

en	Network Remote Bar Collection active!

en	Needs more power to offload!

en	Cannot locate adjacent offload Hoppers!

en	Attached machines: {0}

en	Storing

en	items with

en	free slots

en	Storing {0} items with {1} free Slots

en	Transferred

en	bars from Inventory!

en	Transferred {0} Bars from Inventory!

en	Garbage Thief 3001

en	items from Inventory

en	Transferred {0} Items from Inventory!

en	Ore Thief 3000

en	Linking...

en	Ore from Inventory

en	Transferred {0} Ore from Inventory!

en	CryoMap

en	Provides a useful real-time map for analysing and planning our defence. Build in a 3x3 layout.

en	Provides a useful real-time map for analysing and planning our defence. Build in a 3x3 layout.

en	Build this to eliminate terrifying surprises.

en	Auto Organic Thief

en	Crawling

en	Inert

en	Torpid

en	Sluggish

en	Plodding

en	Balanced

en	Quick

en	Hasty

en	Supersonic

en	Hypersonic

en	Ultrasonic

en	Nearness

en	Myopia

en	Proximity

en	Concurrency

en	Juxtaposition

en	Propinquity

en	Farsight

en	Length

en	Bounds

en	Aloofness

en	Range

en	barrel of

en	Extractor

en	Extractors

en	Rating

en	Motor

en	Motor: {0}

en	Motors

en	Head

en	Head: {0}

en	Heads

en	Durability: {0}

en	Conveyors

en	Mission Report

en	Total Machines

en	Threat Level

en	NO SCANNER BUILT

en	Ore

en	Ore Extractors

en	all online

en	not collecting ore

en	Base Battery

en	used

en	PTGs

en	Enriched

en	Infused

en	LPTs

en	with lenses

en	Storage

en	No Mass Storage system detected

en	Mass Storage Crates with

en	used of

en	Report assembled in

en	ticks

en	None Infested

en	Mynocks detected

en	Unspent Research Points

en	Research Progress

en	Recommendation

en	Extensive Mynock Infestation detected - Use (H)olobase to locate and Turrets to deal with it

en	Automate Extraction and Smelting of Tin and Copper

en	Automate Smelter Input

en	Automate Smelter Output

en	Your Base Smelter needs Automation via Hoppers

en	Build a Threat Scanner

en	Strong defenses detected; recommend increasing Threat for more Eyes

en	Laser Power Transmitters need lenses fitting

en	Extract or Smelt Copper.

en	Locate Copper Ore.

en	Extract or Smelt Tin.

en	Locate Tin Ore.

en	Base Smelter needs automation via Storage Hoppers with Permissions.

en	Base Smelter needs Input Automation via Remove-Only Storage Hopper.

en	Base Smelter needs Output Automation via Add-Only Storage Hopper.

en	Construct a Laboratory

en	Locate Iron Ore.

en	Locate Lithium Ore.

en	Explore Deeper!

en	Craft and fit a Suit Heater!

en	Go deeper: Traverse the Cold Caverns.

en	Locate Gold Ore.

en	Locate Titanium Ore.

en	Locate Nickel Ore.

en	Construct Cargo Lifts for T2 lifting.

en	Build Orbital Energy Transmitter!

en	Overminds left to destroy!

en	Charge Orbital Energy Transmitter!

en	Blast Furnace

en	Desired PPS

en	Desired PPS: {0}

en	No Attached Storage Hopper or Mass Storage found

en	Attached to

en	Attached to {0}

en	Mass Storage Units

en	Storage Hoppers

en	Storage Hopper

en	No Attached Storage Hoppers found!

en	Not connected to Continuous Casting Basin

en	State

en	Smelting

en	Smelting time

en	Smelting time: {0}s

en	Cost

en	Cost: {0}

en	Unfinished.Infinite heat and light.Will be replaced!

en	in inventory

en	No description

en	ConstructoBot Coppator Chassis

en	ConstructoBot Coppator Arm

en	ConstructoBot Coppator Leg

en	ConstructoBot Ultron Chassis

en	ConstructoBot Cromize Chassis

en	ConstructoBot Stenforcer Chassis

en	ConstructoBot Titaniux Chassis

en	ConstructoBot Rosteeld Chassis

en	ConstructoBot Goldenrod Chassis

en	ConstructoBot Ironide Chassis

en	ConstructoBot Tindron Chassis

en	ConstructoBot Bronzite Chassis

en	AirBorne Particulate Extractor

en	AirBorne Particulate Extractor_DESC

en	AirBorne Particulate Compressor

en	AirBorne Particulate Compressor_DESC

en	Cargo Lift Controller

en	Power State

en	Power State: {0}

en	Rack Rail storage: {0}

en	Operating State

en	Operating State: {0}

en	Rail Depth: {0}m

en	Rail State: {0}

en	Press (T) to spawn lift

en	Lift Depth: {0}m

en	Lift State: {0}m

en	Order

en	Inventories

en	Moving

en	Cargo

en	Check Rail

en	Shaft depth

en	No lift deployed

en	Depth

en	Orders

en	Switch

en	Top

en	Toggle

en	Bottom

en	Lift stuck. Please wait for rail scan to complete.

en	Lift stuck below shaft depth. Check for blockages.

en	Waiting for Rack Rail

en	Unknown State

en	Operating Lift

en	Controller has no Rack Rail to place

en	Check Depth

en	Unloading finished - Lift has no Cargo!

en	Error, failed to locate a non-null item to unload!

en	Unloaded

en	items

en	capacity free

en	Lift is empty!

en	Loading Complete!

en	Loaded

en	C5 Linking to existing

en	C5 ALT-Linking to existing

en	C5 Clearing

en	C5 exposion FAILED - retrying in 12s

en	C5 Spawning

en	Climate Control Centre

en	Set to : Cold Mode

en	CRYOPLASM DETECTED AT

en	Scanning for threats...

en	WARNING! CPH OFFLINE! CRYOPLASM DEFENCES OFFLINE!

en	EMERGENCY CRYOPLASM DEFENCES ACTIVE!

en	CCCCC OFFLINE! DEFENCES OFFLINE!

en	WARNING! OFFLINE! CRYOPLASM DEFENCES OFFLINE!

en	CCCCC Offline

en	CCCCC Terraforming

en	CryoPlasm Detected

en	CryoPlasm Killed

en	You have survived the initial crash, and ARTHER sacrificed himself to make you a tiny survival environment.ARTHER will now explain a few of your base's features.The forcefield will disappear when this is completed.

en	CPH Idling as all attachedPower is full!

en	Needs resources. Attach aStorage Hopper to automate.

en	Burning

en	for

en	left.

en	Burning {0} for {1}s

en	Calories {0} left

en	Players currently online:

en	joined.

en	left.

en	disconnected. reason:

en	[DEBUG]CryoSpawn Data

en	Active for another

en	Built

en	Creep

en	Holding

en	segments

en	PeakBuilds

en	Sleeping for

en	CryoPlasm Spawner killed!

en	Player Bonus was

en	Constructobot unloaded

en	Storage Hopper full or locked!

en	Storage Hopper empty!

en	Constructobot collected

en	Constructobot failed to get a storage machine!

en	Warning! Basin overheating! Place somewhere much colder!

en	Casting

en	currently stored in inventory

en	You have enough resources to craft this!

en	This requires

en	Self-Craft

en	Missing Material

en	Start Automation

en	Stop Automation

en	Switching

en	Cancelling

en	Crafting Queue

en	Automation

en	Thank you for buying the Dapper DLC pack!

en	This requires the Dapper DLC pack!

en	This requires the Frozen Factory Expansion pack!

en	Craft

en	Craft x25

en	Select Recipe

en	Dapper DLC not present

en	Inventory full!

en	Crafted a

en	Lacking Materials to craft a

en	The disk thread crashing means that world data will no longer be saved or loaded.

en	The low frequency game thread crashing means that gameplay related machines and objects will no longer be updated.

en	The raycast manager crashing means that mobs and other things requiring raycasts will no longer move or function.

en	The mob update thread crashing means mobs will no longer move or update.

en	The main menu network thread crashing means the game status of stored servers will no longer update.

en	The network client thread crashing means you're disconnected from the server.

en	The network server thread crashing means you are no longer hosting a game.

en	The fluid manager crashing means fluids will no longer update.

en	The segment mesh renderer crashing means that terrain changes and new areas reached will no longer load graphics.

en	The segment manager thread crashing means that terrain will no longer load when moving or teleporting.

en	The terrain gen thread crashing means that new terrain will no longer be generated.

en	crashed!

en	Error message:

en	View Log

en	Ignore

en	CryoPlasm Lancer

en	CryoPlasm Melter

en	C5 Offline - defences offline.

en	Clearing complete! No CryoPlasm to shoot. Rescanning soon...

en	Scanning for targets -

en	Clearing area

en	Cleared

en	blocks

en	supercharged shots remaining.

en	Use a Freezon Injector to supercharge this Lancer.

en	Melted

en	s since last firing.

en	Scan Size

en	m max size

en	You lasted

en	You selected

en	difficulty. I'm afraid you don't get to respawn!

en	Energy Transmitter

en	Average transfer per second:

en	Click icon to upgrade

en	Maximum transfer/sec

en	Toggle Mode

en	No Lens

en	Writing unsaved world changes

en	segments remaining

en	Not safe to Exit.There are unsaved world changes. Exiting now means data will be lost.

en	Compressing save archives

en	Flushing Disk Cache

en	archives remaining

en	Safe to Exit.Some archives have not been compressed yet, but this can be skipped without loss.

en	Done, proceeding with Exit. Have a nice day!

en	Exiting!

en	Disconnecting from server. Have a nice day!

en	Mining

en	Out of Power

en	Out of Storage

en	FALCOR Bomber

en	Angle

en	Fly State

en	CPH Offline - defences offline.

en	Cheetah

en	Gazelle

en	Horse

en	Coyote

en	Whippet

en	Hamster

en	Sloth

en	Tortoise

en	Snail

en	Firing Mech of the

en	The

en	Unable to locate Hopper

en	Unable to locate Freezon Gas in hopper

en	Storing Freezon, ready to inject!

en	No Freezon-compatible machine located

en	Attempting to drop

en	into hopper!

en	onto conveyor or into hopper!

en	into specific drop-off!

en	Crafted

en	Failed to insert

en	into storage hopper?

en	No Valid attached Hoppers!

en	Looking in attached hopper for:

en	Total of

en	items needed

en	No input conveyor found!

en	Lacking ingredient on input conveyor!

en	of

en	Cannot locate

en	Landing

en	Intersect

en	Configuring Pipe alignment

en	s of Freezon boost left!

en	Place Storage Hopper with Freezon Canister in for 20x PPS boost!

en	Placing and verifying pipes.

en	Pipe drill stuck on hard obstacle. Please remove.

en	Can't locate pipes in adjacent Storage Hopper!

en	Optimal temperature differential reached!

en	Freezon Gas required for full performance!

en	Temperature differential: {0}°C

en	Rush mode active - boost on!

en	Guides

en	No contextual help available at the current time.

en	Materials

en	Ores

en	Crafting Ingredients

en	Machines

en	Suit Upgrades

en	ARTHER Upgrades

en	Machine Upgrades

en	Available Projects

en	Completed Research

en	No projects completed yet. Visit the research station.

en	The helpfile for this has not yet been implemented, sorry!

en	The Player does not know this material

en	Laboratory recipe

en	Requirements

en	Unlocked Recipes

en	Costs an additional

en	RP to research.

en	No specific help available, due to unimplemented help file. Please check the next page for hints and crafting!

en	This material is hidden

en	The player does not know this material

en	This material is paintable with the paint gun

en	This material does not block movement

en	This material can be burned for power in the Central Power Hub or Pyrothermic Generator

en	recipe

en	Costs

en	This recipe creates

en	Hint

en	Title

en	Survival Handbook

en	Creative Handbook

en	Reference

en	Research

en	Materials Reference

en	Eligible Research

en	Complete Research

en	The FortressCraft world extends over 1,000 light-years in every direction

en	Press J to toggle the Player Stats screen on

en	SuperBuild allows you to make massive alterations to the world - try it!

en	Schematics allows to you easily duplicate your creations

en	WSAD to move and Space to jump. LMB to build, RMB to dig, MMB to pick

en	The Xbox version of FortressCraft sold over 1 million units

en	Follow @Fortress_Craft for the latest news and updates to FortressCraft!

en	A complete world would take over 2x10^79 bytes to save

en	Press T to begin exploring

en	SuperBuild lets you create massive simple structures quickly. F10 to exit

en	Schematics lets you easily duplicate your creations. F11 to exit

en	Hivemind killed! Score was

en	It's looking at you.

en	Holobase V1.337 Active!

en	Press U to enable Map Mode

en	Press U to enable Base Mode

en	Press Left-Ctrl to enable Tactical Mode

en	Press Left-Ctrl to disable Tactical Mode

en	Press K to exit HoloBase

en	Currently

en	players in game and using up

en	network slots

en	Bars

en	Bar

en	Total Power

en	Power/Sec

en	Total Time

en	ore/min

en	bars/min

en	Total

en	Average

en	Strength increases melee damage

en	Constitution increases health

en	Agility increases armor

en	Intelligence increases mana

en	Damage adds to the amount of damage done in combat

en	Crit increases the chance of landing a critical strike

en	Armor protects from damage

en	Health prolongs life

en	Mana increases the number of spells that can be cast

en	Item Injector

en	Unable to locate items in hopper

en	Last Item

en	ready to inject!

en	Offloading at Distance

en	You need to be within 5m! Current Distance

en	Switch Mode

en	RP

en	Collect

en	Current

en	Collect Research

en	All projects researched!

en	Start Project

en	Possible Projects

en	Consult the research station for details

en	Analyse

en	Experiment

en	I just started the

en	Project

en	Collected research for an additional

en	I just collected the

en	Wait for full Battery

en	Fire constantly

en	Light is configured optimally

en	Shadows can be slow

en	Soft Shadows are very slow - uses sparingly

en	Warning, large light sizes can have adverse performance

en	Loading

en	Collected Rubble! Use Left-Ctrl to SuperDig Ores.

en	Collected

en	Died from repeated impacts!

en	Unable to exit AFK mode - we're editing text!

en	Releasing from AFK mode back to normal game!

en	Security Warning

en	Mod {0} contains third-party code which could be unsafe. Neither ProjectorGames nor Digital Tribe accept any responsibilty for any losses suffered from running third party code. You will not be asked again for this mod.

en	Cancel

en	Okay

en	Loading

en	Entering

en	Connection timed out

en	Recieved bad data from server. Version mismatch?

en	Not currently in control of a mass storage array

en	Scan me for more information

en	Storage Used

en	Mass Storage Crate

en	Center Block

en	Stored

en	Removed

en	Connected to DELETED BLOCK

en	Error, Centre is null!

en	Solo Storage; Connect more crates!

en	Total Storage

en	(E) Stack Height

en	Crate has no centre!

en	Crate has no connected crates!

en	or

en	Stack

en	Stack Size

en	Crates

en	Empty

en	item

en	Warning! Mass Storage exceeds 100 crates. Consider multiple, smaller storages.

en	Warning! Mass Storage size is critical, and is likely to suffer performance issues!

en	Transfers a stack of up to

en	items into storage

en	per minute

en	Utilisation

en	No storage attached

en	Idle

en	Receiving items

en	Searching for storage space

en	Sending Drone

en	Retrieving Drone

en	Mass Storage Matter-Mover I/O Port

en	Unable to locate attached Mass Storage Plate

en	No Centre Crate found

en	No Mass Storage Controller found!

en	Controller Power

en	Currently outputting

en	Select an item in your Hotbar to use as an Exemplar

en	Press T to clear Output Port

en	Press T to set Output to

en	Dropping off

en	Choose output

en	Trencher Drill

en	No Ore Found

en	Clearing

en	Scanning

en	Idling

en	PRESS H!

en	Vein Cleared!

en	Drill state

en	Ore stored

en	Drill utilisation

en	per haul

en	No ore found for drilling

en	Out of Power. Restarting at

en	stored power

en	Unconnected Trencher Motor

en	Orbital Bombardment requested at Quadrant {0}

en	Quadrant

en	has been cleared!

en	Quadrant {0} has been cleared!

en	Orbital Bombardment has begun!

en	This

en	server-side mod is running

en	This {0} server-side mod is running

en	mod is required on this server

en	This {0} mod is required on this server

en	Install

en	mod at version

en	to connect

en	Install {0} mod at version: {1} to connect

en	mod is optional on this server

en	This {0} mod is optional on this server

en	mod cannot be run on this server

en	This {0} mod can not be run on this server

en	Locked to version

en	Locked to version {0}

en	This mod contains third-party code which could be unsafe. Neither ProjectorGames nor Digital Tribe accept any responsibilty for any losses suffered from running third party code.You will not be asked again for this mod.

en	Enable

en	Disable

en	Enter steam display name here

en	Tutorial not complete!

en	You need to complete the tutorial before hosting a multiplayer game.

en	Good plan!

en	Mutators are permanent and can no longer be changed for this world.

en	Choose your Mutators, Choose your DOOM!

en	CREATIVE selected! The results of running Mutators can be unpredictable!

en	This screen is a preview of the forthcoming Mutator options, available as part of the Adventures Pack DLC! Cool isn't it? You can't play with any of it yet, but I AM still accepting ideas on new ones!

en	The ResinPocalypse is upon us

en	Life will now be relatively resin-free..

en	Everything is dangerous. Don't get too close.

en	Machines have been made safe again.

en	Rock, Dirt and Stone are now ores. This isn't as good as it might sound.

en	A sensible amount of Ore is present again.

en	The Floor Is Lava active. This is not compatible with regular Survival.

en	The Floor Is Lava inactive.

en	Mobs will now attack on sight. Turrets are modified to cope.

en	Mobs will now feign indifference to your presence.

en	Drop Pods will now contain a huge variety of things.

en	Drop Pods will only contain research. Probably for the best.

en	CRUSH. KILL. BLAST. DESTROY. LOOT. REPEAT.

en	Mobs will now only drop sensible things.

en	All Logisitics apart from Robots are super-nerfed.

en	Robots are still pretty cool, you know.

en	All items now have a stack limit in your inventory.

en	Your salty tears have been noted.

en	Your CPH is now super-duper important. Keep it alive or suffer.

en	No penalty for CPH death.

en	Analysing area...

en	Activation in

en	DESTROY NOW TO CANCEL!

en	Bye

en	Connecting

en	Connecting to server at

en	Disconnected

en	No longer connected

en	Not Connected

en	Could not reach server

en	Exception in network thread

en	You need to own the Frozen Factory Expansion pack to access this skin!

en	You need to own AmpuTea to access the Explorer skin!

en	You need to own EVERY piece of DLC and Expansion Pack for access to this super-exclusive skin!

en	User was missing

en	See http://www.patreon.com/Fortresscraft for more details!

en	You need to own the Dapper DLC to access the Union Jack skin!

en	You need to own Steam Heroes to access the Harrison skin!

en	You need to own Skin Pack #1 to access this skin!

en	You need to own the Community Rewards Pack for this! (See http://www.patreon.com/Fortresscraft for more details!)

en	Only good little boys and girls can use this skin!

en	You need to own Skin Pack #2 to access this skin!

en	Tutorial Complete!

en	If you're stuck, Press H for help!

en	Tutorial in progress

en	The Central Power Hub (CPH) is the focus of your base.

en	Power Storage Blocks (PSBS) are the main method of storing power.

en	Ore Extractors collect resources automatically.

en	Storage Hoppers automate resource handling

en	Use LMB to Ping Unknown if you can't find anything!

en	Researching Scans gives you Research Points

en	Repair your robotic assistant ARTHER by crafting it at the manufacturing plant!

en	Look at the CPH and press E!

en	Charge your suit from the PSB!

en	Add at least 200 power to the Ore Extractor

en	Collect Coal from the Hopper!

en	Hold RMB to Scan something!

en	Research your new scan!

en	Craft a Power Core!

en	CPH Rebooting

en	Killed

en	attackers!

en	CPH Health

en	LOIC En-Route!

en	LOIC returning to recharge!

en	Discharge Volley

en	OET ready for Strike Controller!

en	OET Charge

en	Converting world, please wait!

en	Placed in Quadrant

en	Current Quadrant is already cleared!

en	Current Quadrant has active Overmind!

en	Too close to CPH to activate! Move near a valid target!

en	Scanning area for optimal targetting...

en	Looking for Orbital Transmitter...

en	Scan complete.

en	Orbital Bombardment requested

en	LOIC Travel distance still

en	You should probably run away now. There's an achievement if you if don't look at the strike!

en	No charged Orbital Transmitter located.

en	Press E to blow up everything within a very big range of here

en	NO OVERMIND DETECTED!

en	Press E to confirm Strike Location.

en	Overmind within

en	destruction chance

en	Upgraded!

en	Hopper Scanner

en	Other

en	Unknown Ore

en	Unknown Material

en	Closest

en	Press X for Build Gun

en	Wheelmouse to Select

en	Ping Unknown

en	Ping Known Ore

en	Ping Air

en	Ping Coloured Ore

en	NO POWER

en	Resource Scanner

en	LMB to Ping RMB to Scan Wheelmouse to Select

en	Ore Scanner

en	Automation is going to be the key to success. Your Smelter can interface with adjacent Hoppers of any type. However, if you're not specific with your instructions, then all sorts of bad things could happen! Set the permissions now, to have one Add-Only hopper and one Remove-Only hopper. Convey Ore into the Remove-Only Hopper and Ingots will be added to the Add-Only Hopper. Remove from the Add-Only Hopper via Conveyors.

en	Smelting Automation

en	Insert Ore to start

en	Obtaining materials

en	Need

en	Need {0} found {1}

en	found

en	Unable to find any ore

en	Unable to clear output hopper

en	Please empty manually!

en	Needs more Ore!

en	-- Creative Mode --No Information availableFor fancy Statistics, play Survival

en	Played

en	It looks like you've been disconnected!

en	Sorry

en	Client Thread is null!

en	Network Client is closing!

en	Network Client is not connected!

en	Detail block loading

en	Empty Detail slot

en	{0} cannot be dug up!

en	You dont have permissions to build here!

en	You cannot build with {0}!

en	Whoops! Nulldata for {0}

en	You failed to craft a {0}

en	You don't have the resources to auto-craft a {0} - you need {1}

en	You need to craft a {0} at your base!

en	You don't have a {0} in your inventory!

en	You cannot build with unknown items!

en	You cannot build on top of {0}

en	You cannot build on top of this!

en	You can't build {0} at height {1}!

en	You can't build this at height {0}!

en	Warning! Cannot be dug up once constructed!

en	You don't have permissions to delete this.

en	Loading Detail Block

en	Unnamed

en	You need the Dapper DLC to colourise torches!

en	Progression! You've killed {0} helpless innocent lifeforms!

en	Progression! You've generated {0}k power!

en	Progression! You've smelted {0} ingots!

en	Progression! You've crafted {0} items!

en	{0} baked

en	{0} archives to compress!

en	Safe to exit

en	Save Queue: {0}

en	I just processed the {0} scan!

en	I just researched the {0} recipe!

en	I just researched the {0} project!

en	PROCESS

en	NO SCANS

en	RESEARCH

en	Power required to research: {0}

en	Process Unknown Material scans to unlock new Research Projects and Manufacturing Recipes, as well as earn Research Points.

en	Find more unknown materials using the ore scanner's ping facility.Press M to select the ore scanner then Left Mouse Button to send off a material ping.

en	For more information on the {0} open the handbook (press H).

en	Scans ({0})

en	Scans

en	Recipes

en	Projects

en	Recipes ({0})

en	Projects ({0})

en	Value

en	Research Points

en	In order to know what this material is, you will have to process the scan.

en	Unprocessed Scan

en	Power required to research : {0}

en	Research this project at the laboratory - Requires:

en	Unlocked from

en	Unknown Requirement: {0}

en	For more information on the {0} and a list of what it will unlock, open the handbook (press H).

en	CONTACT LOST!REASON: {0}

en	Unknown

en	Altitude : {0}m. Accel: {1}m/s²

en	Fuel : {0}l /{1}kg

en	Velocity: {0}m/s. Orbital Velocity: {1}m/s

en	Mass : {0}kg

en	Thrust : {0}N / {1}N

en	TOO HEAVYNEED AT LEAST {0}N of Thrust!

en	Out of fuel

en	Launch in T - {0}s

en	LaunchPad Collision

en	Unset

en	Perfect

en	Deadly

en	Exact

en	Precise

en	Accurate

en	Careful

en	Careless

en	Crappy

en	Lax

en	Sloppy

en	Inaccurate

en	Useless

en	{0} Scope

en	Refreshing...

en	[PUBLIC] (Waiting for response)

en	Contacting server...

en	Server Readout -

en	World Uptime : {0}

en	{0} out of {1} players connected.

en	{0} active machines (Load : {1})

en	{0} active mobs (Load : {1})

en	Server Transmission Progress : {0}

en	{0} segments left to send

en	({0} Bars/ {1} Ores/ {2} Power/min

en	Forced

en	Half

en	Limited

en	Off

en	Power-saving

en	Helmet: Open

en	Helmet: Closed

en	Gender: Male

en	Gender: Female

en	Gender: Other

en	Slime Attractor

en	Bait active!

en	Needs Ruined Organic Matter in adjacent Storage Hopper!

en	Temperature

en	Heating

en	Requires {0} Ore

en	Click icon to clear

en	Add Ore

en	Add Ore to begin!

en	Click icon to retrieve

en	Ingredient in Ore Smelter

en	Gathering Materials

en	Gained {0} power!

en	Undamped

en	Impeded

en	Inhibiting

en	Damped

en	Absorbing

en	Interdicting

en	Vibration

en	Wobbliness

en	Balance

en	Steadiess

en	Solidness

en	Fixation

en	{0} Stock of {1}

en	Error machine tier not recognized!

en	Looking for Attached Storage

en	Searching for Storage

en	Fully Stocked

en	Looking for Mass Storage Crate...

en	Surveying mass storage crate distances...

en	Currently stocking : Unknown Material

en	Currently stocking : {0}

en	Stockpile quantity: {0}/{1} Press E to configure Stock limits

en	Press E to configure item to stock

en	Local inventory: {0} Drone inventory: {1}

en	Set Item to Stock

en	Decrease Limit

en	Increase Limit

en	Refuse items when above limit

en	Choose Item

en	Enter Item Search Term

en	Inventory Item

en	Stock: {0}/{1}

en	Collect items when above limit

en	Searching for:

en	Stocking: {0}

en	Stockpile cleared!

en	Storage full

en	Storage Empty

en	{0} free slots

en	Processing...

en	ERROR Unknown cube[{0}] added

en	Mini Hopper (Small and Very Slow)

en	Logistics Hopper (Tiny and Somewhat Slow)

en	Cryo Hopper

en	Used: {0}. Free:{1} (E) Open Storage Interface

en	Last Item: {0}

en	Internal Temp: {0}°C. Power: {1}

en	Using {0} PPS.

en	Overheating! NEEDS MORE POWER!

en	Overheating! Contents Spoiling!

en	CryoStorage Active!

en	(Shift+E)Toggle Vacuum Status : {0}

en	(T) to store {0}

en	(Try Shift and Ctrl)

en	Hopper full!

en	(Q) to retrieve contents!

en	(Shift+Q) to toggle permissions!

en	Scan for more information!

en	NetworkSync: {0}

en	Failed! Inventory Full?

en	Stored {0}

en	UNKNOWN TYPE

en	Add + Remove

en	Add Only

en	Remove Only

en	Toggle Vacuum

en	Vacuum: Off

en	Press I to toggle (I)nventory

en	Shift/Ctrl to remove 10/1

en	Vacuum: On

en	Used: {0}/{1}

en	Stacked {0}x {1}

en	Suit Power: {0}/{1}

en	Solar Efficiency: {0}

en	Mag Range: {0}

en	Suit Heater : Active

en	Suit Heater : Offline

en	Toxic Filter : Active

en	Toxic Filter : Offline

en	Radiation protection : Active

en	Radiation protection : Offline

en	Orders: {0}

en	Select Shape First

en	Instant

en	Smooth

en	Layered

en	FILL-SOLID

en	FILL-HOLLOW

en	Anchor : Base

en	Anchor : Centre

en	Not Buildable

en	Hold Left-Shift to dismantle MultiBlock Machines!

en	Valuable machine!

en	Multiblock machine!

en	Quarry!

en	Too large! Use LeftShift!

en	Hold LeftShift to break this!

en	This is too hard!There is no way to dig this up yet!

en	This is too hard!Upgrade your Build Gun may help!

en	Use an Ore Extractor!

en	Use-Left Ctrl to SuperDig!

en	ERR. TOO COLD

en	Died from hypothermiaCraft a Suit Heater.

en	Died from hypothermiaPlace Torches to keep warm!Power Boosters give emergency power!

en	You went swimming in magma!

en	You went wading in magma!

en	Died from heat exposure

en	Died from temperature exposure (See log file for details!

en	Save count: {0}

en	Central Power Hub (CPH)

en	Your CPH is the centre of your base, and will provide small amounts of power when fed resources.Look at your CPH and press E to access it.You can then click Add Resources to feed it some coal.

en	Power Storage Batteries (PSB)

en	PSBs are your primary way of storing power for your base.Locate your PSB in your base now, then highlight it.Pressing Q will draw power from the PSB into your suit, which in turn will keep you warm.

en	Ore Extractors (OE)

en	Ore Extractors (OE) collect ore whilst you are busy doing other things, and require power.Locate your OE, and access it with E again. Feed it 200 power, and it will work for over 8 minutes!

en	Storage Hoppers (SH)

en	Storage Hoppers (SH) store and process items automatically.Your machines will take resources from, or give them to, a Storage Hopper. Locate your SH, and press Q to empty it. Remove the Coal that has been mined.

en	Scanning

en	You can 'ping' to locate known or unknown items in the world.Once an unknown item is found, you can then scan it.Find an unscanned item now (inside OR outside the forcefield), highlight it, and hold Right Mouse until it is scanned.

en	Researching

en	Once scanned, Unknown Items need to be researched.Locate and highlight your Research Station, then press E to interact and complete the research.Researching earns points to unlock new technologies.

en	Simple Crafting

en	ARTHER has helped you through the start of your survival mission - now it's time to say Thank you. Head to the Crafting Plant, select it, press E and make a Power Core for ARTHER.

en	Automation

en	You've got a few Storage Hoppers, Laser Power Transmitters and Conveyor Belts left over.Locate the holo-tutorial around the CPH.This shows you an ideal miniature Automation setup. Place your machines there.

en	Good luck!

en	From now, you're on your own. Everything you need to know is in your Survival Handbook. Open it by pressing H.

en	You died in a previous game! You're still dead!

en	The CPH does not heal on Hardcore difficulty!

en	Ran out of health for some reason!

en	Died from Toxic FumesTry crafting a Toxic Filter!

en	Unknown block detected...Hold RMB to scan!

en	Block has been scanned but not researched!Return to your Research Station to identify it!Press X to switch to Build Gun

en	{0} has been researched!

en	X to return to Build Gun

en	Scanning unknown block...Continue to hold button to complete Scan

en	Cannot re-scan block...Already Scanned!Scan this at your Research Station!Press X to switch to Build Gun

en	Scanning {0} vein...Continue to hold button to complete Scan

en	Block Type: {0}

en	Distance : {0}m.

en	New Scan Complete!

en	Scanned new Block!Return to your Research Station!

en	Scanned new Block!Return to your Research Station!X to select Build Gun

en	Already Scanned!Return to your Research Station!

en	Already Scanned!Return to your Research Station!X to select Build Gun

en	Return to Research Station!

en	Block Type: {0}Already Known

en	Already Scanned!

en	unknown

en	Ore Report:Type: {0}Volume: {1} m3Total Ore Amount: {2:N0}

en	Ore Report:Type: {0}Volume: {1} m3Total Ore Amount: {2:N4}m

en	{0}Volume: {1} m3Total: {2:N0}

en	{0}Volume: {1} m3Total: {2:N4}m

en	Scanned {0}m, {1}

en	I just scanned a vein of {0} containing {1}m Ore at {2},{3},{4}

en	Extend: {0}/ {1}

en	Pressure: {0}bar

en	Current Speed: {0}m/s

en	Powered compressor required beyond {0}m

en	(Home) Raise Lift.

en	(End) Lower Lift.

en	Initialising...

en	Locating Resources...

en	Looking to offload {0} high octane fuel canisters

en	Compositing materials...

en	Looking for {0} more coal and {1} more HEFC...

en	Compositing; {0}s left. @ {1}pps

en	STORAGE FULL! OFFLOAD!

en	No fuel to offload

en	{0} High Octane Fuel ready to offload

en	Power: {0}/ {1}

en	DigiStructing Rocket

en	Fuelling Rocket

en	Rocket Launched!

en	Pad Empty.

en	DigiStruct power needed: {0}

en	Waiting for target lock...

en	High Octane Fuel needed: {0}

en	CPH Offline; Dazzler Offline.

en	CryoPlasm Cleared: {0}m³

en	Inferno has successfully neutralised a CryoPlasm Spawner!

en	CryoPlasm Inferno

en	Please attach a Magma Storage via Fluid Pipes...

en	Scanning for CryoPlasm Spawns within 64 metres...

en	Cannot target CryoPlasm Spawner, blocked by {0}!

en	Time remaining: {0}

en	WARNING! REGROWTH IN: {0}

en	NEED COMPRESSED MAGMA NOW!

en	Waiting on gas from a Gas Storage Tank.

en	Storing: {0}.

en	Next bottle filled in : {0}s

en	Looking for Hopper to offload to...

en	Gas Storage

en	Waiting for gas from a Particulate Compressor.

en	Connected to Gas Bottling Plant.

en	Scanning for pipe connections to a Gas Bottling Plant in {0}s

en	Looking For Ore

en	Please wait, paging...

en	Place on 3x3 Ore only!

en	Place on 3x3 identical Ore only!

en	Grinding Ore...

en	Grinder finalising...

en	Finalising...WARNING! Ore is volatile state, DO NOT DELETE MACHINE!

en	Ore ground; looking to offload.WARNING! Ore is volatile state, DO NOT DELETE MACHINE!

en	Grinding...

en	Kaboom!

en	Grinder cannot function without active Cold Cavern Climate Control Centre

en	Grinding: {0}

en	{0}x {1} to offload!

en	CPH Offline; Borer Offline.

en	Unable to locate input Storage Hopper

en	Looking for High Energy Composite Fuel...

en	Checking Gantry Clearance...

en	Checking Drill Clearance...

en	DigiStructing Drill...

en	Drilling...

en	Stuck.

en	Retriving Drill Head.

en	Collecting Magma!

en	Gantry Search completed {0} of {1}

en	Gantry cannot be deployed due to obstruction of {0}

en	Drill Search completed {0} of {1}

en	Drill cannot be deployed due to obstruction of

en	Looking for linked centre...

en	PPS Delta: {0}

en	{0}m power still required.

en	Drilling at depth {0}m

en	Retriving Drill (at depth {0}m)

en	Offloading to Magma Storage Unit

en	Failed to find Magma Storage Unit; searched {0}m

en	Please attach a Magma Bore to this storage...

en	Offloading to CryoPlasm Inferno Turret.

en	Failed to find CryoPlasm Inferno Turret.; searched {0}m

en	Compressing...

en	Waiting for resources...

en	Maximum internal pressure reached

en	Particulate Compressor

en	Compressing: {0} using {1}PPS

en	Collecting...

en	Nothing to compress.Please attach a Particle Filter.

en	{0} ready to compress.

en	Need {0} more to begin.

en	Storing {0} stored.

en	Connected to Gas Storage.

en	Scanning for pipe connections to Gas Storage in {0}s

en	Error, no particulates found.

en	Particulate Filter

en	CPH Offline - filtration paused!

en	POWER LOW!

en	Filtering using {0} PPS

en	Unable to locate Particulates.Please place in a particle-filled cavern.

en	{0} stored.

en	Connected to Particulate Compressor.

en	Scanning for pipe connection to Particle Compressor in {0}s

en	Built to {0}

en	Built Ring at {0}m

en	Dist: {0}/{1}

en	Need {0} more alloyed blocks to construct

en	Requires Adventures Pack or Patronage!

en	--WARNING {0} ACTIVE HIVEMINDS FOUND--

en	You will be REQUIRED to kill these before using this item in full release

en	--WARNING No C5 found - this will be a requirement before release!

en	--WARNING ALL EIGHT CRYOPLASM SPAWNERS MUST BE KILLED BEFORE USING THIS--

en	Storing {0} Coal and {1} HEF Canisters

en	No linked centre found!

en	Orbital RailGun Link

en	Temperature {0}°C

en	HECF Canisters Needed {0}

en	Power Cost:

en	No Marker

en	No location stored

en	This block was added by a mod which has been deactivated

en	The Gameplay thread has not responded for {0} seconds!

en	Fluid processing: {0}

en	Empty Waypoint

en	Place a Sign next to this machine to name it!

en	This machine needs 0.1 PPS.

en	Marked Location

en	usage: {0} 'command'

en	valid commands: add remove

en	usage: {0} add 'name' ('r' 'g' 'b')

en	added waypoint '{0}'

en	usage: {0} remove 'name'

en	"{0}" removed from waypoint list

en	"{0}" not found in waypoint list

en	Unknown command: {0}

en	Ricocheting

en	Flubbing

en	Bouncy

en	Crazy-ass

en	Tingling

en	Electrifying

en	Shocking

en	Electrocuting

en	Pistol

en	Blaster

en	Sniper Rifle

en	Assault Rifle

en	SMG

en	Cannon

en	Minigun

en	{0} of

en	Level {0} {1} {2}

en	Range: {0}

en	Shot Delay: {0}

en	{0}shots/sec

en	Spread: {0}

en	Recoil Reduction: {0}%

en	Max Charge: {0}

en	Charge Rate: {0}

en	Mod Socket {0}

en	Whitelisting is currently

en	valid commands: on off add remove

en	whitelist turned on

en	whitelist turned off

en	usage: whitelist add 'name'

en	"{0}" added to single access list

en	usage: whitelist remove 'name'

en	"{0}" removed from single access list

en	"{0}" removed from whitelist

en	"{0}" not found in whitelist

en	workshop command only works inside a workshop

en	usage: {0}

en	Design name changed to " {0} "

en	Available behaviours: {0}

en	Unknown behaviour {0}

en	Behaviour {0} added

en	Behaviour {0} updated

en	size and/or speed parameter could not be parsed

en	Missing size or speed parameter

en	usage: {0} 'behaviour'

en	Design does not have behaviour {0}

en	Behaviour {0} removed

en	usage: {0} 'library design path'

en	Import not finished yet

en	usage: {0} 'slot number'

en	failed to parse slot number

en	slot number not a custom!

en	Buildable slot {0} selected

en	Workshop deleted

en	World parameter usage: {0}

en	Gravity: {0}

en	Movement Speed: {0}

en	Maximum Fall Speed: {0}

en	Jump Speed: {0}

en	usage: {0} 'gravity-amount'

en	Gravity set to {0}

en	Could not parse

en	usage: {0} 'speed-amount'

en	Movement Speed set to {0}

en	Current maxfallspeed: {0}

en	Maximum falling speed set to {0}

en	Jump Speed set to {0}

en	If you can read this, I messed up

en	Loads

en	Tons

en	SuperFast

en	Day

en	Lots

en	Basic MedBay

en	MedBays must be built inside rooms!

en	This must be built inside a room!

en	Basic Ampule Crafter

en	Ampule Dispenser

en	Press E to Extract

en	Base Production Scanner

en	Awaiting Network Data...

en	#NoFilter

en	Room Light #1. Paintable!

en	Room Light #2. Paintable!

en	Room Light #3. Paintable!

en	Room Light #4. Paintable!

en	Room Light #5. Paintable!

en	Room Light #6. Paintable!

en	Room Light #7. Paintable!

en	Room Light #8. Paintable!

en	#1 Room Lights. Paintable!

en	#2 Room Lights. Paintable!

en	#3 Room Lights. Paintable!

en	#4 Room Lights. Paintable!

en	#5 Room Lights. Paintable!

en	#6 Room Lights. Paintable!

en	#7 Room Lights. Paintable!

en	#8 Room Lights. Paintable!

en	Paintable light that only works in Rooms.

en	Paintable light that only works in Rooms.

en	Paintable light that only works in Rooms.

en	Paintable light that only works in Rooms.

en	Paintable light that only works in Rooms.

en	This Room light will alert you to CPH attacks silently.

en	Paintable light that only works in Rooms.

en	Paintable light that only works in Rooms.

en	Uses Paste - you'll lose Paste if you dig it up, so place with care!

en	Requires the Dapper DLC Pack

en	Requires the Dapper DLC Pack

en	Requires the Dapper DLC Pack

en	Requires the Dapper DLC Pack

en	Uses Paste - you'll lose Paste if you dig it up, so place with care!

en	Requires the Dapper DLC Pack

en	Requires the Dapper DLC Pack

en	Basic MedBay

en	Place on a wall in a room, give it power, and stand near it to heal.

en	Place on a wall in a room, give it power, and stand near it to heal.

en	No hint. It's that simple.

en	Place Plant Seeds onto these to grow them.

en	Grows plants much faster.

en	Advanced Hydroponics Bay

en	Grows plants much faster. Maybe requires power, haven't decided.

en	Place Plant Seeds onto these to grow them.

en	Grows plants much faster.

en	MK1 Ampule

en	MK2 Ampule

en	MK3 Ampule

en	MK4 Ampule

en	MK5 Ampule

en	Regenerates Health over a fixed amount of time.

en	Place in Suitinventory to auto use

en	Iron Gear Maker

en	Creates Iron Gears.

en	A machine that supports autocrafting of Iron Bars into Iron Gears.

en	Much more efficient than doing it by hand!

en	THIS IS INCORRECT LOCATE IT AND FIX THE CASE

en	AirLock Inner

en	Not relevant.

en	AirLock Inner

en	Connects Rooms to Airlocks

en	Connects Rooms to Airlocks

en	Build in a 3x3x1 or 1x3x3 layout

en	THIS IS INCORRECT LOCATE IT AND FIX THE CASE

en	AirLock Outer

en	Not relevant.

en	AirLock Outer

en	Connects Airlocks to the Outside

en	Connects Rooms to Airlocks

en	Build in a 3x3x1 or 1x3x3 layout

en	Reinforced Plated Room Floor

en	Paintable, reinforced floor, specifically designed for Rooms.

en	Paintable, reinforced floor, specifically designed for Rooms.

en	Uses Paste - you'll lose Paste if you dig it up, so place with care!

en	Room Decoration 1

en	Reinforced wall decoration, specifically designed for Rooms.

en	Reinforced wall decoration, specifically designed for Rooms.

en	Uses Paste - you'll lose Paste if you dig it up, so place with care!

en	Alloyed Space Window

en	Paintable, reinforced window.

en	Paintable, reinforced window. Not recommended for use in Rooms.

en	Uses Paste - you'll lose Paste if you dig it up, so place with care!

en	Room Ventilation Grille

en	Lets air passthrough

en	Use this to improve the Clean rating of your room, required to hit Clean Room designation.

en	You need 1 per 150m3 of the room

en	Reinforced Plating

en	Reinforced, Paintable Wall designed for Rooms.

en	Paintable, reinforced wall, specifically designed for Rooms.

en	Uses Paste - you'll lose Paste if you dig it up, so place with care!

en	Room Wall Panel

en	Paintable, reinforced wall, specifically designed for Rooms.

en	Uses Paste - you'll lose Paste if you dig it up, so place with care!

en	Room Light Reflector

en	Reinforced ceiling reflector, specifically designed for Rooms.

en	Uses Paste - you'll lose Paste if you dig it up, so place with care!

en	Logistics Grommet

en	Conveyors transfer items through this.

en	Conveyors transfer items through this.

en	First pass!

en	Energy Grommet

en	PTGs, Solar Panels and PSBs will transfer power through this.

en	PTGs, Solar Panels and PSBs will transfer power through this.

en	First pass!

en	Room Extractor Fan

en	Future machine - use this to improve the Clean rating of your room, required to hit Clean Room designation.

en	Future machine - use this to improve the Clean rating of your room, required to hit Clean Room designation.

en	DON'T BOTHER BUILDING THIS YET!

en	Reinforced Plated Room Wall

en	Paintable, reinforced wall, specifically designed for Rooms.

en	Uses Paste - you'll lose Paste if you dig it up, so place with care!

en	BaubleBerry Seed

en	BaubleBerry Seeds

en	Tri Seed

en	Tri Seeds

en	UnderGrump Seed

en	UnderGrump Seeds

en	GoopyDangler Seed

en	GoopyDangler Seeds

en	Coxcomb Seed

en	Coxcomb Seeds

en	LeafyDangler Seed

en	LeafyDangler Seeds

en	TundraBreath Seed

en	TundraBreath Seeds

en	Super Construction Paste Grinder

en	Uses 'garbage' or Coal blocks to make Construction Paste at a 1:8 ratio.

en	Converts useless garbage and Coal into Construction Paste. All aesthetic blocks use construction paste!

en	Only works if you have the Dapper Indie Supporter DLC.

en	Lightweight Machine Housing Crafter

en	Turns 6 plates into 1 Housing.

en	A machine that supports autocrafting of Tin Plates into Lightweight Machine Housings.

en	Much more efficient than doing it by hand!

en	Priority Splitter

en	Sends all incoming items Right, unless blocked, then Left.

en	Sends all incoming items Right, unless blocked, then Left.

en	Connect directly to conveyor belts or Hoppers. Only works correctly if both sides have an output.

en	HerbiCor

en	Collects nearby outdoor unharvested Plants and returns them.Needs attached storage hopper.

en	Collects nearby outdoor unharvested Plants and returns them. Requires attached Storage Hopper.

en	Also good for framerate!

en	Generic Room Controller

en	Creates a Room. Will give Informations about the Room itself

en	Place in a Room and follow the instructions.

en	Build it on the floor. Instructions are in the bottom left once you do!

en	Ampule Dispenser

en	Place above an Ampule Crafter

en	Use to craft and upgrade Ampules from an attached Ampule Crafter

en	Carry one. ALWAYS carry one. (Put into suit inventory to fire automatically)

en	Ampule Crafter

en	Place below an Ampule Dispenser, attached to a Storage Hopper of plants.

en	Use to craft and upgrade Ampules into an attached Ampule Crafter

en	Carry one. ALWAYS carry one. (Put into suit inventory to fire automatically)

en	Base Scanner

en	Place in a room. Observe. Learn. Progress!

en	A filterable, real-time graph monitoring every aspect of your base's performance.

en	Place in a room. Observe. Learn. Progress!

en	I Understand

en	Low-end computer detected!

en	Only 2 Logical/Physical CPUs detected. Your PC is at or below the minimum requirements for FortressCraft, and you may experience a number of visual or performance issues. Threaded visibility has been disabled.

en	INTEL VIDEO CARD DETECTED!

en	FortressCraft has detected that you're running on an {0} - if you are using a gaming laptop, then please use the high-performance card! If this is your only video card, then you are likely to experience a number of visual or performance issues.

en	Fastest detail selected!!

en	FortressCraft has detected that you're running on FASTEST detail. This detail setting is designed only for very low-spec computers with a minimal amount of RAM, and it is not really recommended for normal gameplay. You will have pop-in, low poly models and blurry textures.

en	Low Texture Detail selected!!

en	FortressCraft has detected that you're running on LOW texture detail. This detail setting is design only for very LOW-MEMORY computers with a minimal amount of RAM. It does NOT increase performance or FPS, and it is NOT recommended for normal gameplay. You will experience blurry textures.

en	World Validation

en	World Validation is Complete

en	Your world is being converted to a new format, please wait.Current Progress: {0}%

en	{0} completed of {1}!

en	Conversion Time {0}h:{1}m:{2}s of estimated {3}h:{4}m:{5}s

en	World Conversion

en	Your movement has been paused!You may have moved outside of the loaded world.Please wait a short while for your disk or network connection to catch up.If this happens often in single player please check your anti-virus software is not interfering.Count is now {0}

en	Attached to Lift

en	Compressor Active!

en	Compressor Idle.

en	Tier 1 Vertically-Extending Central Piston Lift

en	Current Range: {0}

en	Adjust range by holding (Q) or (E).

en	Powered compressor required beyond {0}m

en	Lifts limited to 64m for network clients. Sorry!

en	Current Pressure : {0}/{1}bar

en	Lift is under Manual Control

en	Stored Pressure : {0}bar

en	Work complete. No blocks to shoot

en	Scanning for Hardened Resin - {0} complete.

en	Clearing area - {0} complete.

en	Ablated {0} blocks

en	Scan Size : {0}

en	Scanning for Ablated Resin - {0} complete

en	Liquified {0} blocks

en	Press Q to Reset

en	Please place facing a Conveyor!

en	Please place facing a Conveyor or Scrap Track!

en	Upgrade complete - {0} conveyors upgraded

en	Upgrade complete - {0} track upgraded

en	Low Power!

en	Need Attached Hopper!

en	Unable to locate conveyors to upgrade with!

en	Unable to locate material to upgrade with!

en	Search Distance {0}m

en	Conversions {0}

en	Blocked! Please check and clear!

en	Build complete!

en	Needs {0} more Power

en	Looking for valid attached Storage Hopper!

en	Looking for Basic Conveyors...

en	Looking for Conveyors...

en	Looking for Transport Pipes...

en	Looking for Minecart Tracks...

en	Build Distance is {0}

en	Build Distance is {0} using:

en	Basic Conveyors

en	Transport Pipes

en	Minecart Tracks

en	Time left: {0}s

en	Items Added : {0}. Items found {1}.

en	SpiderBot Recharge and Docking Bay

en	SpiderBot Power {0}/{1}

en	Holding [{0}] ready for Spiderbot!

en	Bay ready to receive items

en	Bay offloading final item to SpiderBot before undock

en	SpiderBot is Docking

en	SpiderBot is Docked and awaiting resources!

en	SpiderBot is Defending!

en	Hint : Connect Hoppers with Charged Lithium Coils to power SpiderBot

en	ERROR! LET DJ KNOW THAT YOU HAVE A SPIDERBASE NOT IN THE ENTITYMANAGER!

en	Internal Power: {0}/{1}

en	Illegal placement!MK2 Solar Arrays must be placed on:

en	MK4 Batteries

en	MK5 Batteries

en	Refineries

en	Not collecting! Cannot see the sun!

en	Collecting at rate of {0} power per second

en	Not collecting! Sun is below horizon!

en	Collecting novalight at a reduced rate of {0} power per second

en	MK4 Power Storage

en	MK5 Power Storage

en	Power In: {0} (Avg: {1})

en	Power Out: {0} (Avg: {1})

en	Located {0} attached Power Consumers

en	T4 Conduit

en	Must be built upright!

en	Collecting at rate of {0}%

en	Current Rate is {0} PPS.

en	Organic Solar PanelCollecting Novalight at reduced rate of {0}%

en	Solar PanelNot collecting! Sun is below horizon!Sun rises in {0} minutes

en	Vat not formed after loading. Bug!

en	Connected to Controller

en	Processing {0}

en	Not connected to Controller

en	Vat State: {0}

en	Controller State: {0}

en	Connected to {0} reactor vat

en	Stored (Q): {0}x {1}

en	Selected Recipe (E): {0} {1}

en	Processing {0}, {1} complete

en	Not connected to a reactor vat.Must be connected in order to operate.

en	Tank: {0}, Operating {1}

en	Link State: {0}

en	Fuel Level: {0}

en	Current Power/Second: {0}

en	Not Collecting. (E) to Toggle

en	(E) to Toggle

en	MK1 Robot Arm + + Status: {0} {1}

en	Burn Time {0}s

en	Active {0}s of the last {1}s

en	Efficency: {0}

en	PTG is starved of oxygen!PTG cannot function this deep!

en	ERROR - No centre?

en	Stack: 1 Crate

en	Stack: {0} Crates

en	Total Storage: {0}

en	Power Delta: {0}

en	T to Store power

en	Q to Retrieve power

en	Automated Zipper Merge(Patent Pending)

en	Zipper Merge (Three'n'One edition!)(Patent Pending)

en	Rapid Zipper Merge(Patent Pending)

en	Bender Plant

en	Pipe Extruder PlantConverts Bars into Tubes

en	Extruder PlantConverts Bars into Wires

en	Bender PlantBends in sorts of Angles

en	Stamper PlantTakes Bars from a Conveyor, converts to Plates and then offloads to another Conveyor.

en	Coiler PlantWires into Coils

en	PCB AssemblerConverts Coils into PCBs

en	Conveyor TurntableEvenly splits resources.

en	Basic ConveyorUpgrade as soon as you can!

en	Advanced Conveyor FilterSorting Items since 1291 A.D.

en	Transport PipeRapid Armoured transportation.

en	Conveyor Belt Filter

en	Transport Pipe Filter

en	Motorised ConveyorUltra-fast Storage Hopper connector.

en	(R) and (Shift+R) to Rotate

en	Items transported: {0} at {1}/min

en	Conveyor Blocked!

en	Transporting: {0}

en	(E) Set Filter to {0}

en	Shift (E) Set Filter to {0}

en	Press E to smash the ice!

en	WARNING - FROZEN!

en	Filter set to everything EXCEPT: [{0}]

en	Filter set to : [{0}]

en	Press T to invert filter.

en	Select an item in your Hotbar to use as an Exemplar

en	Press Q to set Output to {0}

en	Error, Conveyor filter can't deal with [{0}]

en	WARNING - INFESTED! - See Handbook (H)

en	ALL types

en	GARBAGE

en	COMBUSTIBLE types

en	ORE

en	NOTHING

en	CRYSTALS

en	GEMS

en	BIOMASS

en	BARS ONLY

en	ORGANIC ITEMS

en	CRAFTED ITEMS

en	SMELTABLE

en	RESEARCHABLE

en	UNKNOWN

en	Current Power: {0}

en	Power to fire

en	Success/Fail: {0}/{1}

en	Press (E) to open interface

en	No Location Marker installed

en	Location Marker does not contain a marked location

en	Target is {0}m away

en	Stand on teleporter and press jump to activate

en	T-Minus {0}

en	FlightTime: {0}

en	Press Q to self destruct.

en	USER ABORT

en	Launch in progres...

en	Press Q to scan construction

en	Fuel Efficiency: {0}

en	Engine Smoothness: {0}

en	Engine Power: {0}

en	Rocket has {0} Parts and is {1}m tall

en	Rocket weighs {0}t and has {1}kN thrust.

en	Delta/V: {0}m/s

en	Dry mass {0}t, Fuel mass {1}t

en	Rocket is launch-capable.

en	NEEDS {0} THRUST!

en	Press E to launch your rocket ship

en	LP had no Entity?

en	LightMode {0}

en	(E) to cycle LightMode

en	Attached is empty - active!

en	Attached is empty - inactive!

en	Attached is not empty - inactive!

en	Attached is not empty - active!

en	Looking for machine

en	Error value of {0}

en	Basic Missile Turret

en	Dualshot Turret

en	Tri-shot Turret

en	Quad-launcher

en	No missiles loaded!

en	Can't find Missiles in attached Hopper!

en	{0} missiles loaded!

en	Next shot's damage is {0}

en	Reloading for {0}s

en	Searching for Large Targets...

en	Aiming...

en	Attacking ! [{0} HP left!]

en	Client Delay: {0}

en	Turret

en	Searching... (Considered {0} targets!)

en	Shots: {0}. Kills: {1}. Damage: {2}

en	Press E to show turret range

en	Track Straight

en	Track Corner

en	Track Slope

en	Minecart Buffer

en	Minecart Full Gate

en	Minecart Empty Gate

en	Track One Way

en	Scrap Track Straight

en	Scrap Track Corner

en	Scrap Track Slope

en	Scrap Track One Way

en	Please wait, processing...

en	Please attach a Hopper

en	Please place a Minecart into the Hopper!

en	Cart here with {0} items, {1}s before leaving

en	Cannot find any hoppers!

en	Unable to find resources in attached hoppers!

en	Awaiting Cart

en	Holding {0}

en	Station empty

en	Station has dealt with {0} carts

en	All surface attacks neutralised.

en	CryoPlasm detected at {0}m!

en	Threat Scanner (Client)

en	Kills: {0}

en	Attack: {0}

en	Base Rating: {0}

en	Heavy Chance : 0%

en	Heavies expected: {0} (approx)

en	Boss Chance : 0%

en	Bosses expected: {0} (approx)

en	No threats detected...

en	Next Attack: {0}s

en	Power: {0}%

en	Base Rating approx {0}

en	(Agitator Threat {0}) + {1} mob bonus

en	Calmer reducing threat by {0}

en	Calmers offline due to OET charging!

en	Mobs: {0}, Heavies: {1}, Bosses: {2}

en	Attack underway, {0} killed

en	Wave {0}/{1}

en	Next spawns in {0}

en	{0} left to spawn!

en	You've killed {0} mobs in {1} waves, and lost {2} times

en	No threats detected...

en	ATTACK IMMINENT!

en	Attack estimated in {0} minutes

en	Last Attack. Kills: {0}, Power Used: {1}

en	Mob Spawner

en	Type: {0}

en	Press E to spawn a {0}

en	At Depth {0}m

en	Found {0} smeltable Ore.

en	Found {0} coal.

en	Found {0} crystals.

en	Found {0} non-ore Blocks.

en	Quarry

en	Quarry is unable to draw sufficient O2 for cooling!

en	Please move the Quarry close to the surface.

en	Thank you!

en	Quarry cannot locate Input Hopper

en	This should contain Red and White Chevrons

en	Quarry cannot locate Health and Safety Resources!

en	Quarry needs more Red and White Chevrons

en	Place these in an attached Storage Hopper

en	Quarry currently constructing Edge Warning

en	SAFETY FIRST!

en	Quarry cannot find Output Hopper

en	All output hoppers full or locked!

en	Press E to confirm Quarry position

en	Power Low ({0} needed to dig, {1} available)

en	Found {0} in {1} ore blocks

en	Work Ratio {0}

en	Total Idle Time: {0}

en	(E to reset)

en	State: {0}

en	Forward Connected

en	Backward Connected

en	Fully Connected

en	Timer: {0}

en	You have an old and bugged machine in your world. I recommend you macerate this one, then make a brand new one, with my apologies - DjArcas

en	Desires {0}PPS. Current PPS: {1}

en	{0} {1} ({2}s left)

en	No valid Hoppers found (Locked or Full?). All attached conveyors missing or blocked!

en	Crafting: {0}s

en	Place resources in attached Hoppers.

en	{0} more power needed!

en	Combines 6xPlates and 2xPCBs into Research Pods

en	Basic Pods need Copper Plates and Basic PCBs

en	Simplified Pods need Tin Plates and Primary PCBs

en	Intermediate Pods need Iron Plates and Hardened PCBs

en	Complex Pods need Lithium Plates and Charged PCBs

en	Advanced Pods need Gold Plates and Conductive PCBs

en	XL Pods need Nickel Plates and Fortified PCBs

en	Ultimate Pods need Titanium Plates and Lightweight PCBs

en	Orbital Power Transmitter

en	{0} charged

en	Charge Rate {0}/sec.

en	Press (E) to interact

en	Power available : LOW. Supply more power for faster research.

en	Power available : MEDIUM. Research not at optimal speeds.

en	Power available : OPTIMAL. Research at full speed. More power may give a small boost.

en	Mode: {0}

en	Project: {0}

en	Progress: {0}

en	Current Item: {0}

en	Decomposition Progress: {0}

en	Banked Research Points: {0}

en	Unlinked multiblock

en	Placing and verifying pipes.

en	Pipe drill stuck on hard obstacle. Please remove.

en	Can't locate pipes in adjacent Storage Hopper!

en	Optimal temperature differential reached!

en	Power per second: {0}

en	Selected recipe: {0}

en	Output full, can't continue

en	Currently crafting {0}

en	Tutorial active!

en	Press E to open the CPH then click Add Resources!

en	Coal Burn Efficiency: {0}

en	Press E to configure

en	{0}% damaged

en	Defensive Missiles Fired: {0}

en	Time of Day: {0} ({1})

en	Research StationProcess scans and research new technologies.Power: {0}/{1}Press E to open

en	Research StationPress E to close

en	Fusion Power Monitor

en	Core status:

en	Fuel: {0}

en	Generating: {0:N0} PPS

en	Cooldown period: {0:N1}s

en	Required Charge level for ignition: {0:N0}

en	(E) to add Fuel

en	(T) to Ignite

en	Core diameter: {0} (T)

en	Pylon size: {0}

en	Offset: {0} (Q - E)

en	ServoMotor

en	Accurate, fast, low Torque Motor

en	Minimal torque.

en	Accurate and fast motor. Difficult to make by hand, easier to automate.

en	Everything EXEPT

en	Filter set to

en	Servomotor Maker

en	Turns 3 Wires into 1 Servo Motor.

en	Much more efficient than doing it by hand!

en	A machine that supports autocrafting of Copper Wires into Servo Motors.

en	SUPER H.E.I.S.T.

en	Like the H.E.I.S.T. only 16 times faster. This item requires the Dapper DLC to work

en	No time for lazy!

en	Automatically removes items from adjacent Storage Hoppers and transmits it to player within 5 metres - SUPER FAST! Requires Dapper DLC.

en	Attack Scanner

en	Place somewhere obvious!

en	Subtle is no good. Subtle is dead!

en	Allows a REALLY OBVIOUS way of reminding yourself how long before an attack.

en	Super Heist!

en	Room-based CryoCloner

en	Basic Robotic Sorter

en	Allows simple bus setups.

en	Automatically moves a specified item between conveyors.

en	Use this for a straightforward Bussing system.

en	Upgraded Robotic Sorter

en	Allows faster bus setups.

en	Automatically moves a specified item between conveyors.

en	Use this for a straightforward Bussing system.

en	Bulk Robotic Sorter

en	Allows for the fastest bus setups.

en	Automatically moves a specified item between conveyors.

en	Use this for the fastest Bussing system.

en	Intermediate Robotic Sorter

en	Allows fast bus setups.

en	Automatically moves a specified item between conveyors.

en	Use this for a straightforward Bussing system.

en	(or drag from (I)nventory)

en	ARTHER now charging {0}

en	Ray Gun V1

en	V1 Ray Guns

en	This will allow you to gently scratch the local life forms, but may be useful to clear weak, defenseless creatures. Press V to select.

en	Suit Item! You only need 1!

en	Upgraded Crystal Scanner

en	Upgraded Crystal Scanners

en	This will let you see the closest Crystal when Pinging. Press M to select.

en	Suit Item! You only need 1!

en	Advanced Crystal Scanner

en	Advanced Crystal Scanners

en	This will let you see ALL Crystals when Pinging! Press M to select.

en	Suit Item! You only need 1!

en	Mandragora Seed

en	Mandragora Seeds

en	ConstructoBot Coppator Arms

en	ConstructoBot Herb Arm

en	ConstructoBot Herb Arms

en	Room Air Scrubber

en	DON'T BOTHER BUILDING THIS YET!

en	Future machine - use this to improve the Clean rating of your room, required to hit Clean Room designation.

en	DON'T BOTHER BUILDING THIS YET!

en	ConstructoBot Herb Arm Assembler

en	Crafts ConstructoBot Herb Arms.

en	Assembles ConstructoBot Herb Arms.

en	Arms that deal with Plants.

en	Cloning Vat

en	Not relevant.

en	Place on a room to make dying more convenient.

en	Build in a 1x3x1 layout, using 3 in total.

en	SpiderCor

en	Collects nearby outdoor unharvested Plants and returns them.Needs attached storage hopper.

en	Automatically collects marked loot from FALCOR Beacons mounted on SpiderBot. Requires attached Storage Hopper.

en	Ideal for Wasp drops!

en	ConstructoBot Crate

en	A Logistics-compatible Robot in a crate!

en	S.A.R.A.H Dock

en	Place to give acces to the Storage And Retrieval Automated Hauler

en	Cloning Bay

en	Place in a room, give it power, and dying becomes less annoying.

en	Room Heater

en	Used in the Cold Cavern to reduce suit power usage.

en	Place in a Room to offset the Cold

en	Examine the Room Controller for your Room's current rating.

en	Room Cooler

en	Used in the Magma Cavern to reduce suit power usage.

en	Place in a Room to offset the Heat

en	Examine the Room Controller for your Room's current rating.

en	Room Vaporator

en	Use to increase the rate of Plant growth inside your rooms.

en	Place in a Room to increase the growth rate of Plants

en	Examine the Room Controller for your Room's current rating.

en	Imbues Lithium Coils with Energy. Feed into the SpiderBot Upgrade and Recharge Dock via a Storage Hopper.

en	SpiderBot needs energy to defend your base with.

en	Composites Coal Ore and High Energy Composite Fuel into High Octane Fuel. Build in a 3x3x3 layout.

en	Use to bore out straight tunnels

en	Scanning for items...

en	Falcor en-route!

en	No free FALCOR to collect!

en	Beacons require power to digiport items!

en	Beacons require skyclearance; please clear above the beacon!

en	Mounted on top of Storage Hopper; only Logistics FALCORs can service

en	FALCOR

en	Calculating route to Target.

en	Travelling to Target.

en	Dropping off item.

en	Collecting item.

en	No hoppers found. FALCOR cannot offload

en	All hoppers locked or full! FALCOR cannot offload

en	Press (T) to transfer [{0}]

en	Connected to host {0}

en	Survival mode server

en	Creative mode server

en	Dedicated server

en	Locally-hosted server

en	Server Uptime : {0}

en	MUST BE BUILT INSIDE A ROOM

en	Plant planted!

en	{0} grown

en	No plant detected

en	Planted!

en	Warning CryoPlasma detected at {0}m!

en	Surface Map StatusComplete

en	Surface Map StatusScanning...

en	Build a room!

en	Scanning for Room Extents...

en	Cannot locate 4 walls!

en	Cannot locate ceiling!

en	Room controller works best on the floor!

en	Ceiling too low! Is controller under something?

en	Verifying Room Requirements...

en	Located air block in wall? (Look for red error block!)

en	Rooms do not support transparent blocks! (Look for red error block!)

en	Rooms cannot have machines as walls! (Look for red error block!)

en	Inner Airlock unable to locate matching valid Outer airlock? (Look for red error block!)

en	Error: {0}

en	Room Working...

en	{0} machines inside the room!

en	Room Volume {0}m³ with {1} Fans and {2} Filters

en	Clean Rating: {0}

en	Bio-Filter Rating: {0}

en	Heat Rating: {0}

en	Cold Rating: {0}

en	Greenhouse Rating: {0}

en	No room classification found

en	Error. GeoThermal is too far from the CCCCC and cannot communicate. Maximum transmission range is 320 metres

en	AirLock

en	Airlock needs a matching pair with a gap of 3 metres in front or behind it

en	Airlock without an Room Controller owner will just open if you go near it.

en	THIS DOOR CONFERS NO PERFORMANCE BENEFIT

en	Airlock linked to RoomID {0}

en	Player Room ID {0}

en	Player AirLock ID {0}

en	Unloading {0}

en	Power Transmitted : {0} over {1}s ({2} PPS)

en	Laser has impacted wall - please re-align!

en	Laser has found nothing - please re-align!

en	Laser searching for Power Interface Consumer ({0}/{1})

en	Press E to put materials into the smelter!Or place a Hopper next to it.

en	Need more {0}!Press E to put MORE materials into the smelter!{1} ore ready for smelting!

en	Smelter heating: {0}/{1}°C

en	{0} raw {1} ready for smelting!

en	Smelting {0}. {1}% complete{2} more ore ready for smelting!

en	Power {0}% ({1}PPS)

en	Press (Q) to retrieve materials

en	Smelter is starved of oxygen!Smelter cannot function this deep!

en	Efficiency: {0} - (Q to Reset)

en	Laser Power Transmitter MK1

en	Laser Power Transmitter MK2

en	Laser Power Transmitter MK3

en	Scanning for Targets - {0} complete.

en	Destroyed {0} Blocks!

en	Shots: {0}, Kills {1}

en	(E) to have ARTHER mount!

en	Transporting everything EXCEPT {0}

en	{0} servers online

en	Version Mismatch: {0} should have been {1}

en	Server full: {0} maximum

en	Banned

en	Not Whitelisted

en	Connected to [{0}] at dist of {1}m

en	Discharging at {0}m

en	Rotating to new Direction

en	Searching for Cryo

en	Charging up system

en	Getting Ready to Fire

en	Cooling down Barrels

en	Total of {0} items needed

en	No resources in attached Hopper?

en	Attempting to drop {0} into hopper!

en	Crafted {0}

en	Cannot locate {0}x {1}

en	{0}x {1} needed

en	Found {0} of {1} items.

en	You're only allowed one CCCCC!

en	DISCONNECTED

en	Press (T) to Sort [{0}]

en	Not collecting

en	Collecting {0}

en	Spawn set!

en	{0} Power.

en	Cool. Geddit?

en	Need Carry Arms!

en	Need Herb Arms!

en	NONE

en	Req.{0}

en	Clearing!

en	Kill!

en	Boom!

en	Reloading!

en	CPH Initialising...

en	Crafting

en	Emergency Orange Light

en	Emergency Red Light

en	Emergency Strobe Light

en	Uhm... run?

en	BOSS RUSH x {0}

en	Happy Feet!

en	BUILD {0} ROBOTS!

en	Let it go...

en	The floor is now lava...

en	It's coarse and rough and irritating and it gets everywhere.

en	...if you're brave enough..

en	...don't lick it.

en	I hope you have a V2 build gun...

en	Critical Failure!

en	Epic Fail!

en	Unlucky!

en	No strong feelings one way or the other!

en	Lucky!

en	Great Success!

en	A winner is you!

en	Natural 20!

en	Perfection!

en	Chevron Radiation

en	Caution, Radiation Ahead!

en	Caution, Radiation Ahead!

en	Caution, Radiation Ahead!

en	Chevron First Aid

en	First AidKit nearby (hopefully)

en	First AidKit nearby (hopefully)

en	First AidKit nearby (hopefully)

en	Chevron Aisle Marking

en	Storage Area Closeby, Hart Hats required

en	Storage Area Closeby, Hart Hats required

en	Storage Area Closeby, Hart Hats required

en	Chevron Traffic

en	Beware of Cargohauling Equiptment

en	Beware of Cargohauling Equiptment

en	Beware of Cargohauling Equiptment

en	Chevron Defective Machinery

en	Caution, Defective Machine, handle with Care

en	Caution, Defective Machine, handle with Care

en	Caution, Defective Machine, handle with Care

en	Directional Storage Hopper

en	Error, cannot offload to MultiBlock machines!

en	Identical to a normal Storage Hopper, but can only output in one direction. Use R to rotate.

en	Stores up to 100 resources and transfers quickly. Use to automate other machines. Only outputs in one direction.

en	Use for compact setups!

en	Primary Upgrade Module Maker

en	Makes Primary Upgrade Modules

en	Makes Primary Upgrade Modules

en	Makes Primary Upgrade Modules

en	Primary Upgrade Module

en	Primary Upgrade Modules

en	Secondary Upgrade Module Maker

en	Makes Secondary Upgrade Modules

en	Makes Secondary Upgrade Modules

en	Makes Secondary Upgrade Modules

en	Secondary Upgrade Module

en	Secondary Upgrade Modules

en	Alloyed Upgrade Module Maker

en	Makes Alloyed Upgrade Modules

en	Makes Alloyed Upgrade Modules

en	Makes Alloyed Upgrade Modules

en	Alloyed Upgrade Module

en	Alloyed Upgrade Modules

en	Ultimate Upgrade Module Maker

en	Makes Ultimate Upgrade Modules

en	Makes Ultimate Upgrade Modules

en	Makes Ultimate Upgrade Modules

en	Ultimate Upgrade Module

en	Ultimate Upgrade Modules

en	Not used

en	Not used

en	Not used

en	Not used

en	Freight Cart Station

en	Supplies freight carts with designated resources as demanded by other freight stations.

en	Supplies freight network with designated resources from hoppers or mass storage.

en	Intelligent resource distribution.

en	Freight System Monitor

en	Panel for accessing information about your freight networks.

en	Displays useful information about your freight system.

en	See all the items!

en	Freight Cart Depot

en	Lanches and recalls freight carts as needed to serve freight cart stations.

en	Used to place Freight Carts onto Tracks from an attached Storage Hopper.

en	Only launches carts to stations that need them.

en	Tour Cart Station

en	Station for deploying tour carts to travel to distant locations.

en	Travel between stations automatically by rail.

en	Uses tour carts from your inventory or an accessible hopper.

en	Track Junction

en	Allows Freight Carts to travel multiple directions.

en	A track piece that allows carts to travel multiple directions.

en	Travel the world!

en	Scrap Track Junction

en	Allows Freight Carts to travel multiple directions at low speeds.

en	A track piece that allows carts to travel multiple directions at low speeds.

en	Travel the World!

en	Scrap Track Straight

en	Allows freight carts to travel in a straight line at low speeds.

en	A simple, low speed straight track piece for freight carts.

en	Scrap Track Corner

en	Allows freight carts to travel around corners at low speeds.

en	A simple, low speed corner track piece for freight carts.

en	Scrap Track Slope

en	Allows freight carts to travel up and down slopes at low speeds.

en	A simple, low speed inclined track piece for freight carts.

en	Scrap One Way Track

en	Directs Freight Carts in one direction at low speeds.

en	A directional, low speed straight track piece for freight carts.

en	Prevent collisions by directing cart traffic.

en	One Way Track

en	Directs Freight Carts in one direction

en	A directional straight track piece.

en	Prevent collisions by directing cart traffic.

en	Scrap Freight Cart

en	Scrap Freight Carts

en	Low-speed cart with 5 capacity, designed for transporting all items.

en	Gets items where they're needed... slowly

en	Scrap Ore Freighter

en	Scrap Ore Freighters

en	Low-speed cart with capacity for 25 ore

en	Gets items where they're needed... slowly

en	Basic Ore Freighter

en	Basic Ore Freighters

en	Freight cart with 125 Ore Capacity.

en	Can only carry one kind of ore at once.

en	Fast Ore Freighter

en	Fast Ore Freighters

en	Fast Freight cart with 125 Ore Capacity.

en	Can only carry one kind of ore at once.

en	Large Ore Freighter

en	Large Ore Freighters

en	Freight cart with 250 Ore Capacity.

en	Can only carry one kind of ore at once.

en	Bulk Ore Freighter

en	Bulk Ore Freighters

en	Fast Freight cart with 250 Ore Capacity.

en	Can only carry one kind of ore at once.

en	Basic Tour Cart

en	Basic Tour Carts

en	Travel by way of Tour Cart Stations.

en	Functions only with Tour Cart Stations.

en	ERROR: No valid track connection found!

en	No filled hoppers found

en	No valid deposit hoppers

en	No valid return path to this depot

en	No valid outgoing track connection

en	All station cart assignments are satisfied

en	1 station requires carts

en	{0} stations require carts

en	Cart found does not meet station requirements

en	No suitable cart found for station {0}

en	Station Accepts {0}

en	Depot is currently blocked

en	Illegal placement! Carts cannot drive up walls!

en	No work for station {0}

en	Freight Cart Station ({0})

en	Freight Cart Station (ID: {0})

en	NO NETWORK

en	Press E to configure this station

en	This station is fully stocked!

en	Top requests for this station:

en	This station has nothing to offer!

en	Top offers from this station:

en	Press (T) to transfer [{0}]

en	Freight Cart Station {0} could not deposit item into storage. Storage is full.

en	Any

en	T2/T3+

en	T4 only

en	Ore Freighters Only

en	T2/T3+ Ore Freighters

en	T4 Ore Freighters

en	No Ore Freighters

en	No Scrap Carts

en	Station cannot find hopper or mass storage

en	No where to offload excess {0}!

en	Traveling to {0}

en	Returning to depot

en	Ore Freighter Idling

en	Cannot find a depot to park

en	Offloading excess freight

en	Station {0} is full

en	Cannot route to station {0}

en	Press E to access Freight System Status

en	Location: {0}

en	Press E to access the list of destinations

en	Press E to set this location's name

en	{0} Tour Carts available

en	Track Network ID: {0}

en	No demand for offered {0}

en	No source for requested {0}

en	Track Junction (ID: {0})

en	{0} valid track connections

en	Track lengths: {0}

en	Press Q to reset the junction

en	No valid track connections detected

en	Locations: {0}

en	Set Name

en	Enter Station Name

en	Select Tour Cart Destination

en	Change Name

en	Add Additional Tour Cart Stations

en	to Track Network

en	Connect Tour Cart Station to

en	a Freight Track Network

en	Set Network

en	Enter Network ID

en	Set Mass Storage Name

en	Enter Storage Name

en	Name

en	Network

en	No Storage

en	Name Storage

en	Set Freight

en	Cart Assignment

en	Add Cart

en	Remove Cart

en	Active / Requested

en	Wait for {0}

en	Load Orders

en	Cart Filter

en	Register Freight

en	Done

en	Add New Freight

en	Target Stock:

en	Decrease Stock

en	Increase Stock

en	Help

en	Waiting for server...

en	Servicing freight for:

en	Item to Stock

en	Or select existing

en	Freight Config Help

en	Close

en	This example shows a simple manufacturing station for tin goods. Tin bars are supplied and tin plates and lightweight machine housings are shipped out.

en	Target inventory is set to 200 for tin bars to have carts bring enough to the station to keep plenty on hand for crafting into higher tier components.

en	Tin plates are stocked at a lesser quantity as some are needed available to convert to housings.

en	Lightweight machine housings target of 0 allows carts to take all of them for distribution to other stations as none are required on hand for further processing.

en	Handbook

en	See the handbook for additional details.

en	Connect to freight provider

en	Connect Station to Mass Storage

en	Last Network

en	All Inventory

en	Select Network

en	Transport Grid

en	View Inventory

en	Next Network

en	Viewing status of freight network:

en	Surplus

en	Deficit

en	In Transit

en	Inventory

en	No freight networks found...

en	Network Status

en	No transport grid found...

en	(Click to expand)

en	ID: {0} {1} Locations

en	Carts: {0} / {1}

en	Name - Network ID {0} cart en route

en	Name - Network ID {0} carts en route

en	Inventory: {0} / {1}

en	Estimated arrival in {0} seconds

en	Loading at station '{0}'

en	Unloading at station '{0}'

en	Travelling to station '{0}'

en	Idling at '{0}'

en	Awaiting clear path to '{0}'

en	Inventory is empty

en	Order by Count

en	Order by Name

en	Last Storage

en	Next Storage

en	Viewing inventory of mass storage:

en	Freight status help {0} / {1}

en	Next Page

en	Last Page

en	Surplus is the sum of the excess items in storage above the stations' target inventory. It indicates how much is available for carts to collect for delivery.

en	Deficit is the sum required to safisfy all stations' inventory targets. It indicates how much must be delivered to satisfy all stations.

en	Inventory is the sum of the item that is found across all storage containers that is associated with this freight network.

en	In transit quantity is the sum of the item that carts are currently carrying for delivery. Carts never collect more than is required to satisfy the deficit.

en	This example shows healthy status for a particular item on the freight network.

en	The deficit implies the item is needed but a healthy surplus will more than cover for the total demand.

en	Current quantity in transit shows that several carts are at work to meet the demand.

en	Surplus and deficit are color coded to provide the relative health of the system at a glance.

en	A low surplus may lead to a hold in deliveries due to a supply shortage as the deficit (demand) exceeds available plates.

en	The inventory is fairly healthy so it may be possible to decrese the supply storage's target inventory to inject extra in an emergency.

en	If the surplus remains low it may be time to increase production.

en	Stations appear to both offer and request goods on this network but no goods are in transit. Why might this be?

en	Carts must be assigned to stations for depots to send carts to work. Carts in the depots must also satisfy any filter for the cart assignment.

en	Depots will indicate what is required to send another cart or whether station needs are all satisfied.

en	If carts are assigned they will indicate with a red flashing light if they cannot find a path to their target.

en	Carts will only collect as much as the current deficit to avoid having excess that is not needed.

en	This can slow transfer of items between stations as additional carts will not be able to collect any more items.

en	Increasing a station's target inventory will increase the deficit and the maximum number of items that can be trasnferred at once.

en	A larger target inventory at the destination also provides a bigger buffer to allow time for carts to make further deliveries.

en	CryoInferno

en	Searching for CryoInferno...

en	Build a CryoInferno!

en	Out of Magma!

en	Can't see Spawner!

en	Burning CryoSpawner!

en	No CryoSpawner in range.

en	Please Purchase the Adventures Pack to continue!

en	Build the Orbital Railgun!

en	Orbital Railgun

en	Kill all CryoSpawners and Surface Mobs!

en	Verifying Clearance

en	Looking for Tube Resources!

en	Building Tube.

en	Waiting for Charge...

en	Waiting for Mass...

en	Firing!

en	Looking to offload!

en	Ready for firing.

en	Eliminate all the Cryo-Spawners.

en	Build Orbital Railgun to launch GPS satellite.

en	Buy The Adventures Pack to continue!

en	Choose an experiment!

en	Press H for Help.

en	GPS : Offline.

en	Basic Conveyor(Clockwise)

en	The same as Basic Conveyors, only prettier.

en	Convert a Straight Basic Conveyor into a Corner Conveyor.

en	Vulnerable to extreme cold!

en	Basic Conveyor(CounterClockwise)

en	The same as Basic Conveyors, only prettier.

en	Convert a Straight Basic Conveyor into a Corner Conveyor.

en	Vulnerable to extreme cold!

en	Conveyor(Clockwise)

en	The same as Basic Conveyors, only prettier.

en	Convert a Straight Conveyor into a Corner Conveyor.

en	Vulnerable to extreme cold!

en	Conveyor(CounterClockwise)

en	The same as Basic Conveyors, only prettier.

en	Convert a Straight Conveyor into a Corner Conveyor.

en	Vulnerable to extreme cold!

en	Chevron Danger

en	Use this to mark off dangerous areas.

en	Caution : Uses up 1 Constructionpaste!

en	Rainbow Anti-Grav Lift

en	And UP you GO!

en	Slow and efficient vertical transport. Stand in it and press Space.

en	Requires the Dapper DLC pack!

en	Techno Anti-Grav Lift

en	And UP you GO!

en	Slow and efficient vertical transport. Stand in it and press Space.

en	Requires the Frozen Factory DLC pack!

en	Predator Anti-Grav Lift

en	And UP you GO!

en	Slow and efficient vertical transport. Stand in it and press Space.

en	Requires the Adventures DLC pack!

en	Basic Conveyor Crafter

en	Turns 1 Copper Bar into 15 Basic Conveyors.

en	Conveyor-based machine for automatically converting Bars into plates. Does not require external power.

en	A useful start when automating

en	Conveyor Crafter

en	Upcrafts Basic Conveyors into faster Conveyors using Tin Plates and Copper Wire.

en	Conveyor-based machine for automatically upcrafting Basic Conveyors into faster Conveyors Belts. This is best configured with 3x hoppers for input, and 1x Conveyor belt for the output.

en	Automated Crafting is more efficient than hand-crafting.

en	ScrapTrack Crafter

en	Builds cheap but slow ScrapTrack.

en	Crafts Straight ScrapTracks

en	Minecart Track Crafter

en	Upcrafts ScrapTrack Rails into into faster Minecart Track Trails.

en	Upcrafts Straight Minecart Tracks from older ScrapTracks.

en	Gold Foil

en	Flattened Piece of Gold Wire

en	Flattened Piece of Gold Wire

en	Flattened Piece of Gold Wire

en	Gold Foil Crafter

en	Turns 5 Gold Wire into 1 Gold Foil.

en	A machine that supports autocrafting of Gold Wire into useful Gold Foil.

en	Don't think about it too much.

en	Titanium Housing Crafter

en	Turns 6 plates into 1 Housing.

en	A machine that supports autocrafting of Titanium Plates into Titanium Machine Housings.

en	Much more efficient than doing it by hand!

en	Suit Beacon

en	Marks the Location of your Death

en	Very obvious when dropped. Designed for Boy Scouts in Clumsy Mode.

en	#AlwaysBePrepared

en	Bulk Gas Freighter

en	Small Gas Storage on Wheels

en	Fast Freight cart with 500 Gas Capacity.

en	Can only carry one kind of gas at once.

en	Precision Alloy Machine Block Assembler

en	Uses an alternate method of creating Alloyed Machine Blocks, more useful for certain base setups.

en	Crafts Alloyed Blocks from T2 crafting Materials.

en	These are used extensively, and it is highly recommended you automate these!

en	Left-Ctrl - Super-Building

en	Your BuildGun allows you to create straight runs of machines. This technique will make connecting your base up via Conveyor Belts much easier.Super-Building a Conveyor touching an existing Conveyor will 'copy' its forward direction.Revisit the Video Tutorial on SuperBuild if you get stuck!

en	SuperBuild at least {0} more blocks.

en	Basic Manufacturing Plants allow automated crafting to complete a manufacturing line.

en	Does not support manual crafting.